\begin{table}%t4
 \caption{Multi-wavelength spectral fits of the prompt phase of GRB~060124.}
 \label{grb060124:multispectab}
\small%\centerline
{
 \begin{tabular}{lllccccccc}
 \hline
 \hline
 \noalign{\smallskip}
  Time/Instrument &  Model &$N_{\rm H}^{z}$ & Photon index & $E_{\rm p}$ & Normalization & $\chi^{2}_{\rm red}$ (d.o.f.)  & Start & End\\
  Selection$^{{a}}$  &         & (10$^{22}$ cm$^{-2}$) & & (keV) & (ph cm$^{-2}$ s$^{-1}$ keV$^{-1}$) & & (s)    & (s) \\
 \hline
 \noalign{\smallskip}
BAT Precursor 		   & PL &          		& $1.8 \pm$ 0.2 &  & (3.4 $\pm$ 0.4)  $\times$ 10$^{-3}$ $^b$ & 0.88 (57)& $-1.5$ &  13.5 \\
 XRT-BAT Bin 1 		   & PL & $<$$4.0$ & $1.17 \pm 0.07$ &   & (7.2  $\pm$  1.1) $\times$ 10$^{-3}$ $^b$  & 0.96 (70) & 301.2 & 361.2 \\
 XRT-BAT Bin 2 		   & PL & 2.8$_{-0.8}^{+0.9}$ 	& $1.44  \pm 0.03$ &  & (1.26  $\pm$  0.09) $\times$ 10$^{-3}$ $^b$ & 0.97 (137)& 361.2 & 451.2\\
 XRT-BAT-Konus Bin 3 	   & CPL& 3.5$_{-0.4}^{+0.5}$ 	& $1.36 \pm 0.02$ & 132$_{-18}^{+29}$ & (3.0 $\pm$ 0.2) $\times$  10$^{-3}$ $^c$ & 1.09 (404)& 451.2 & 571.2 \\
 XRT-BAT-Konus Bin 4 	   & CPL& 1.6 $\pm$ 0.3 	& $1.45 \pm 0.02$ & 237$_{-69}^{+153}$ & (1.7 $\pm$ $0.1$) $\times$  10$^{-3}$ $^c$ & 0.99 (431)& 571.2 & 691.2 \\
 XRT-BAT-Konus Bin 5 	   & CPL& $1.9_{-0.4}^{+0.3}$ 	& $1.78^{+0.03}_{-0.08}$ & 28$_{-8}^{+10}$ & 4.1$_{-0.5}^{+1.4}$ $\times$ 10$^{-4}$ $^c$ & 0.83 (393)& 691.2 & 811.2\\
XRT-BAT-Konus (1--5) 	   & CPL& 1.9 $\pm$ 0.2 	& $1.48 \pm$ 0.02 & 193$_{-39}^{+78}$ & $(1.19 \pm 0.07) \times 10^{-3}$ $^c$ & 1.06 (618)& 301.2 & 811.2 \\
 \noalign{\smallskip}
 \hline
 \end{tabular}}
\medskip
$^{{a}}$ See Fig.~\ref{grb060124:multispectra}. $^{{b}}$~Normalization ($K$) at 50~keV. $^{{c}}$~Normalization ($K$) at 100~keV.
\end{table}