\begin{table}%t3   
 \caption{UVOT multicolour data.}   
 \label{grb060124:uvot_mag}   
\small%\centerline
{
 \begin{tabular}{lrlll} 
 \hline 
 \hline 
& & & & \\[-8pt]
  Filter& $T$(mid)  & $T$(expo)   &  Magnitude$^{{a}}$ &   Flux density$^{{b}}$        \\
 &   (s)   &  (s)   & (mag)    \\
 \hline 
$V$ &    183.40 &  153.31 & $16.96 \pm  0.08$ & $0.522 \pm 0.038$ \\
$V$ &    632.99 &  725.22 & $16.79 \pm  0.04$ & $0.610 \pm 0.022$ \\
$B$ &  11~477.47 &  139.43 & $18.60 \pm  0.12$ & $0.220 \pm 0.024$ \\
$B$ &  17~915.40 &  884.89 & $19.05 \pm  0.06$ & $0.145 \pm 0.008$ \\
$B$ &  23~674.52 &  884.87 & $19.51 \pm  0.08$ & $0.095 \pm 0.007$ \\
$B$ &  29~314.24 &  884.85 & $19.53 \pm  0.09$ & $0.093 \pm 0.008$ \\
$V$ &  35~202.82 & 1573.78 & $19.30 \pm  0.09$ & $0.060 \pm 0.005$ \\
$V$ &  41~022.66 & 1575.25 & $19.44 \pm  0.10$ & $0.053 \pm 0.005$ \\
$V$ &  46~782.58 & 1575.15 & $19.52 \pm  0.10$ & $0.049 \pm 0.005$ \\
$V$ &  58~332.60 & 4725.17 & $19.62 \pm  0.07$ & $0.045 \pm 0.003$ \\
$V$ &  75~672.93 & 4752.29 & $19.86 \pm  0.08$ & $0.036 \pm 0.003$ \\
$V$ &  99~028.58 & 7947.60 & $20.15 \pm  0.08$ & $0.028 \pm 0.002$  \\
 \hline
  \end{tabular}}
\medskip
$^{{a}}$ Vega magnitudes. $^{{b}}$ In units of $10^{-16}$~erg~cm$^{-2}$~s$^{-1}$~$\AA^{-1}$. \\
Note. Errors are 1-$\sigma$ values. rms~errors in the photometric zero~points have not been included. UVOT~magnitudes were not corrected for Galactic extinction. Mid~times are measured 	since the BAT~trigger.
\end{table}