\begin{table}%t2	
 \caption{Multi-wavelength $T_{90}$ and $T_{50}$.} 	
 \label{grb060124:tabt90s} 	
\small%\centerline
{
 \begin{tabular}{lcrr} 
 \hline 
 \hline 
Obs/mode & Energy range  & $T_{90}$	 & $T_{50}$ 	    \\
	&  (keV)        & (s)	 & 	(s)    \\
 \hline 
XRT/WT & 0.2--1	&	338 $\pm$ $2$	&	160 $\pm$ $2$	\\
XRT/WT & 1--4	&	302 $\pm$ $1$	&	158 $\pm$ $1$	\\
XRT/WT & 4--10	&	291 $\pm$ $1$	&	138 $\pm$ $1$	\\
BAT    & 15--25	&	321 $\pm$ $2$	&  	 60 $\pm$ $2$	\\
BAT    & 25--50	&	324 $\pm$ $2$	&	 54 $\pm$ $2$	\\
BAT    & 50--100	&	298 $\pm$ $2$	&	 50 $\pm$ $2$	\\
Konus  & 300--1160 &	 $47\pm9$	&	 $15\pm3$	\\
  \hline
  \end{tabular}}
\medskip
Note: errors on $T_{90}$ and $T_{50}$ are the time-resolution of the light curve used for the calculation. The Konus values are probably lower limits, due to low S/N~effects. 
\end{table}