\begin{table}%TF.6
%\centering
\small
\caption{\label{tbl-iuenotes}
Comments and notes to the Tables~1$-$5.
The first number of the image denotes IUE camera: 3 = SWP, 2 = LWR, 1 = LWP,
images not observed on the same run, but combined as they have acomparable
magnitude, are marked with (*).
The "notes'' refer to images used to complete the spectrum and applied flux
normalisation factors.
} %% end-caption
\begin{tabular}{c l}\hline\hline\\[-3.2mm]
\fnaa &LWP LAP replaced with SAP starting at 2600~\AA \\
\fnbb &SWP LAP replaced with SAP starting at 1700~\AA \\
\fncc &LWP30188 upto 2375~\AA\ followed by LWP30354   \\
      &\ \ \ \  upto 2565~\AA\ and completed with LWP17586 \\
\fndd &LWP16704 upto 2618.239~\AA\ followed by LWP16705 \\
\fnee &LWP30679 LAP replaced by SAP from 2500 to 3060~\AA \\
\hline \end{tabular} 
\end{table}