\begin{table}%T1
\caption {CO(1--0) measurements obtained using the 45~m NRO
dish, ${\rm d}v=10$~km~s$^{-1}$, $T_{\rm mb}=T^*_{\rm A}/0.40$. The
identification of the measurement, alphabetically as used elsewhere in
this paper, and as a position offset from (0,0), which is RA~=\hms 09h
50m 44.0s, Dec~=\dms 69d17m30s (B1950), is given in Cols.~1 and 2;
the integrated intensity in K~\kms\ is in Col.~3; the peak position
and width of the profile, corresponding to velocity and velocity
dispersion, are given in Cols.~4 and 5; and the peak main beam
temperature is in Col.~6, where the error quoted is the rms of the
spectrum (the number in parentheses is the ratio of the two, hence
spectrum A is considered a $90/24=3.7\sigma$ detection).  }
\label{data}
%\centering
\small
\begin{tabular}{lccccc}
\hline\hline\noalign{\smallskip}
Pos. & Offset & $\int T_{\rm mb}\delta v$ & $v_{\rm peak}$ & d$v$
& $T_{\rm mb, peak}$ \\
        & (\sec) & (\kkms) & (\kms) & (\kms) & (mK) \\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
A & 5.5 $-$27.5	       & 2.32 & $-6.3$  & 25.3 & 90  $\pm$ 24 (3.7)\\
B & $-$5.5 $-$27.5     & 2.73 & $-4.0$  & 18.2 & 145 $\pm$ 23 (6.3)\\
C & 5.5 $-$38.5	       & 2.52 & $-14.6$ & 14.7 & 187 $\pm$ 24 (7.8)\\
D & $-$5.5 $-$38.5     & 1.86 & $-6.6$  & 15.6 & 155 $\pm$ 32 (4.8)\\
E & $-$16.5 27.5       & 1.20 & 20.6    & 7.7  & 125 $\pm$ 24 (5.2)\\
F & $-$38.5 $-$5.5     & 1.40 & 20.6    & 14.3 & 87  $\pm$ 25 (3.5)\\
G & $-$38.5 $-$27.5    & 1.47 & 10.5    & 14.4 & 85  $\pm$ 26 (3.2)\\
H & $-$5.5 $-$16.5     & 1.07 & $-9.1$  &  8.6 & 75  $\pm$ 23 (3.3)\\
I & 16.5 $-$49.5       & 2.50 & $-29.0$ & 19.5 & 100 $\pm$ 45 (2.2)\\
J & $-$5.5 $-$49.5     & 3.19 & $-38.8$ & 26.4 & 90  $\pm$ 46 (2.0)\\
\hline
\end{tabular}
\end{table}