\begin{table}%t1
%\centering
\par
\caption{Equivalent width of the H cells. \label{equiwid}} 
\begin{tabular}{c|cccccc}
\hline\hline
Year (starts in June)   & 1996 & 1997 & 1999 & 2000 & 2001 & 2002 \\
Equivalent Width (km~s$^{-1}$) &  $5.5 \pm 0.1 $ & $4.9\pm 0.1$ & $3.68 \pm 0.18$ &
 $3.61 \pm 0.18$ & $3.50 \pm 0.12$ & $3.26 \pm 0.13$ \\
Equivalent Width (m\AA) &  $22.3 \pm 0.4$ & $19.9 \pm 0.4$ & $14.9 \pm 0.7$ & $14.6 \pm 0.7$ & 
$14.2 \pm 0.5$ & $13.2 \pm 0.5$ \\\hline
\end{tabular}
\label{caliplus}
\end{table}