\begin{table}%t1
\caption{\label{tab1}List of the 16 brightest compact sources (the first 11 sources are within G65.1+0.6) and their integrated flux densities within box A.}
%\setlength{\tabcolsep}{1mm}
\small%\centering
\begin{tabular}{cccccccc}
\hline \hline
 No.&RA(2000) & Dec(2000)& GLON&GLAT & $S_{408~{\rm MHz}}$&$S_{1420~{\rm MHz}}$& Sp. Index\\
\hline 
& [h m s]&[$^{\circ}\ ' \ ''$]&deg &deg &mJy&mJy&$\alpha$\\
\hline
1& 19 53 46.53& 27 52 56.6& 64.566&0.109 &1388~$\pm$~42&533~$\pm$~17&0.77 (0.73 to 0.80)\\
2& 19 55  3.77& 28 35 43.2& 65.323&0.234 &1044~$\pm$~34&318~$\pm$~10&0.95 (0.92 to 0.99)\\
3& 19 53  3.10& 29 10 30.2& 65.593&0.910 & 610~$\pm$~19&261~$\pm$~9&0.68 (0.65 to 0.72)\\
4& 19 52 53.01& 28 17 43.0& 64.819&0.490 & 267~$\pm$~20&111~$\pm$~4&0.71 (0.64 to 0.78)\\
5& 19 57  2.74& 28 39 52.6& 65.608&$-0.102$& 229~$\pm$~16& 37~$\pm$~3&1.45 (1.36 to 1.55)\\
6& 19 52  3.14& 28 29 46.9& 64.898&0.750 & 191~$\pm$~37& 31~$\pm$~7&1.46 (1.12 to 1.80)\\
7& 19 56 11.84& 27 59 46.5& 64.940&$-0.290$& 147~$\pm$~9& 61~$\pm$~6&0.70 (0.61 to 0.81)\\
8& 19 51 57.62& 28 41 48.9& 65.060&0.870 & 137~$\pm$~30& 44~$\pm$~3&0.91 (0.66 to 1.13)\\
9& 19 54 31.32& 28 55 59.3& 65.551&0.510 & 127~$\pm$~10& 49~$\pm$~3&0.76 (0.69 to 0.84)\\
10& 19 57 7.54& 28 58 25.4& 65.881&0.044 &  94~$\pm$~10& 46~$\pm$~2&0.58 (0.49 to 0.67)\\
11& 19 56 51.73& 28 46 24.5& 65.680&$-0.011$&  83~$\pm$~13& 60~$\pm$~4&0.26 (0.13 to 0.41)\\
\hline
12& 19 56 46.80& 28 21 33.9& 65.317&$-0.211$& 765~$\pm$~25&577~$\pm$~340&0.23(--0.15 to 0.94)\\
13& 19 49 27.70& 28 55 57.2& 64.984&1.461 & 290~$\pm$~12&135~$\pm$~7&0.62 (0.57 to 0.67)\\
14& 19 49 39.44& 28 40 27.0& 64.783&1.293 & 281~$\pm$~12&100~$\pm$~4&0.83 (0.78 to 0.87)\\
15& 19 55  3.55& 29 36  6.0& 66.184&0.755 & 117~$\pm$~6& 56~$\pm$~2&0.75 (0.70 to 0.80)\\
16& 19 52 22.96& 29 56  1.9& 66.170&1.424 &  48~$\pm$~6& 42~$\pm$~1&0.11 (0.01 to 0.21)\\
\hline
\end{tabular}
\end{table}