\begin{table}%t5
\caption{Initial conditions for XSPEC models.}
\label{tab:models}
%\centerline
{\begin{tabular}{l c c c}
  \hline
  Model name &  $N_{\rm H}$ [cm$^{-2}$]                & $kT_1/kT_2$                 & Abund.\\
  \hline
   1T   & 0.0, $10^{22}$ &    0.5/--, 1.0/--, 2.0/--, 10.0/--       & {\em 0.3} \\
   %1Tab & 0.0, $10^{22}$ &    0.5/--, 1.0/--, 2.0/--, 10.0/--        & 0.3 \\
   2T   & 0.0, $10^{22}$ &    0.4/1.0, 1.0/3.0, 0.5/2.0	& {\em 0.3} \\ 
   2Tab & 0.0, $10^{22}$ &    0.4/1.0, 1.0/3.0, 0.5/2.0	& 0.3 \\ 
   1T$_{A{\rm v}}$  & {\em 1.6 $\times$ 10}$^{21}A_{\rm V}$ 	 &    0.5/--, 1.0/--, 2.0/--, 10.0/--        & {\em 0.3} \\
   %1Tab$_{A{\rm v}}$ & $A_{\rm V}$ 	 &    0.5/--, 1.0/--, 2.0/--, 10.0/--        & 0.3 \\
   2T$_{A{\rm v}}$   & {\em 1.6 $\times$ 10}$^{21}A_{\rm V}$   &    0.4/1.0, 1.0/3.0, 0.5/2.0 & {\em 0.3} \\
   2Tab$_{A{\rm v}}$ & {\em 1.6 $\times$ 10}$^{21}A_{\rm V}$ 	 &    0.4/1.0, 1.0/3.0, 0.5/2.0	& 0.3 \\ 
  \hline
\end{tabular}}
 \medskip
\par
Multiple values indicate that all combinations of initial values were
adopted.
Values in italic indicate that fit parameters were fixed to those
values.
\end{table}