\begin{table}%t2
   %\centering
\par
      \caption{Wavelength ranges that were not used for the spectral fit.
      \label{cutouts}}
\small
         \begin{tabular}{ll}
            \hline\hline
            \noalign{\smallskip}
 Range (\AA) & "Contamination'' source \\
            \hline
 3960--3975 & H$\epsilon$+[NeIII]3967 \\
 4095.25--4106.5 & H$\delta$ \\
 4331--4370 & H$\gamma$+[OIII]4363 \\
 4465--4479 & HeI 4471 \\
 4848--4871 & H$\beta$ \\
 4943--5020 & [OIII]4959+5007 \\
 5446--5574 & telluric lines \\
 5867--6320 & HeI 5876, [OI]6300, [SIII]6312 \\
 6375--6470 & telluric lines \\
 6520--6600 & H$\alpha$+[NII] \\
 6700--6740 & [SII] 6717, 6731 \\
            \hline
         \end{tabular}
   \end{table}