\begin{table}%[!h]%t3
%\centering
\par
\caption{Individual \ubv\ observations of \vc.
Data from individual stations are identified by their numbers
in column "station'', identical to those given in Table~\ref{jou},
and filters are coded as follows: $3 = V$, $4 = B$, and 
$5 = U$.
Original (O) observations, smoothed values derived by the HEC13
program (C) and residuals after smoothing (\oc) are all tabulated.
\label{ubvobs}}
\begin{tabular}{crcccc}
\hline \hline
\noalign{\smallskip}
RJD         &  \oc     & Weight  &Station\ /&   O   &  C  \\
            &  (mag.)  &         &Filter  & (mag.)& (mag.)\\
\noalign{\smallskip}\hline \noalign{\smallskip}
41132.8955  & -.0332  &  1.0  &  13/3  &  5.913 &   5.9462\\
41132.9023  & -.0202  &  1.0  &  13/3  &  5.926 &   5.9462\\
41133.9282  & -.0062  &  1.0  &  13/3  &  5.940 &   5.9462\\
41133.9341  & -.0092  &  1.0  &  13/3  &  5.937 &   5.9462\\
41139.9194  &  .0242  &  1.0  &  13/3  &  5.970 &   5.9458\\
41139.9241  &  .0282  &  1.0  &  13/3  &  5.974 &   5.9458\\
41160.9246  &  .0324  &  1.0  &  13/3  &  5.977 &   5.9446\\
41160.9348  &  .0244  &  1.0  &  13/3  &  5.969 &   5.9446\\
41161.9265  &  .0034  &  1.0  &  13/3  &  5.948 &   5.9446\\
41161.9319  & -.0086  &  1.0  &  13/3  &  5.936 &   5.9446\\
\hline
\end{tabular}
\end{table}