\begin{table}%t1
%\centering
\par
 \caption{\label{cuttable}Summary of applied cuts. The cut in image 
                          amplitude is given in photoelectrons (ph.e.).}
	      \small%\centering
\par
 \begin{tabular}{ll}
 \hline\hline
  Cut			&	Value	\\\hline
  Distance		&	2~deg		\\
  Image amplitude	&	$>$60~ph.e.	\\
  \# of telescopes  &	$\ge$3	\\	
  Core impact position	&	$\le$300~m	\\
Mean reduced scaled width&	--		\\
Mean reduced scaled length&	--		\\
  Reduced 3D width $\omega$&	$<$0.002	\\
  $\theta^2$		&	$<$0.01~deg$^2$\\\hline
 \end{tabular}
\end{table}