\begin{table}%t5
\par
   \caption{\label{tab:fitpars}Parameters for the single component model to SGP\_8884
    before convolution with the instrumental profile. We also include
    the parameters for the single component and the two double
    component models of the previously confirmed LAE S11\_5236
    \citep{Westra05}. These parameters differ slightly from
    \citeauthor{Westra05}, since we have subsequently corrected the
    spectrum of S11\_5236 for slit-losses.  
    }  
  \newcommand{\thistabwidth}{0.35cm}
  %\centerline
{\begin{tabular}{c@{\hspace{\thistabwidth}}c@{\hspace{\thistabwidth}}c@{\hspace{\thistabwidth}}c@{\hspace{\thistabwidth}}c@{\hspace{\thistabwidth}}c@{\hspace{\thistabwidth}}c}
    \hline
    \hline
    Component & $\lambda_{\rm c}$ & $f_{\rm peak} $ &
    \multicolumn{2}{c}{{\it FWHM}} & \multicolumn{2}{c}{$\Delta v$}\\
    (1) & (2) & (3) & (4) & (5) & (6) & (7)\\
    \hline
    \multicolumn{7}{l}{SGP\_8884 single component}\\
    Single peak & 8086.2 & 1.2~$\times$~10$^{-17}$ & 15.7 & 580 & & \\
    %\hline
    \multicolumn{7}{l}{S11\_5236 single component}\\
    Single peak & 8172.2 & 8.3~$\times$~10$^{-18}$ & 13.5 & 495 & & \\
    %\hline
    \multicolumn{7}{l}{S11\_5236 double component, "broad''}\\
    Main peak & 8173.1 & 8.0~$\times$~10$^{-18}$ & 11.3 & 413 & & \\
    Red peak & 8184.1 & 1.9~$\times$~10$^{-18}$ & 2.3 & 85 & +11.1 & +406\\
    %\hline
    \multicolumn{7}{l}{S11\_5236 double component, "narrow''}\\
    Main peak & 8173.1 & 8.1~$\times$~10$^{-18}$ & 11.2 & 413 & & \\
    Red peak & 8184.1 & 4.8~$\times$~10$^{-18}$ & 0.5 & 18 & +11.0 & +403\\
    \hline
  \end{tabular} }
\par
  \medskip
  {Notes}: (1) component of the fit; (2) central wavelength of
    the fitted component in \AA; (3) peak flux density in \ergsPerAng;
    (4)~and~(5) {\it FWHM} of full Gaussian of the profile in \AA\ and \kms,
    respectively; (6)~and~(7) velocity shift of the second component
    in \AA\ and \kms.
   % \vspace*{-4mm}
\end{table}