\begin{table}%tc1
\caption{Monomer volumes $V_{\rm 0,s}$ of solid materials from
  (L\"uttke \cite{Luttkeluet2002}) and fit coefficients $c_i$ for the calculation of
  the saturation vapour pressures and difference Gibbs free
    energies. (*): Paper~III -- (**): Sharp \& Huebner
  (\cite{Sharpsh1990}).}
\label{tab:V0ci}
%\centering
\par
\begin{tabular}{lcrrrrrlr}\hline\hline\noalign{\smallskip}
Condensate & $V_{\rm 0,s}$ [$10^{-23}$ cm$^{3}$] 
           & $c_1$ & $c_2$ & $c_3$ & $c_4$ & $c_5$ & Fit of & \\
\hline
%TiO$_2$[s]    & 3.135 & 36.9190  & $-74734.6$ & 0.0 & 0.0 & 0.0 -- Marcus Werte!
TiO$_2$[s]     & 3.136 & 35.8027  & $-74734.7$ & 0.0 & 0.0 & 0.0 
                    & $\ln p_{\rm sat}$ & (*)\\
SiO$_2$[s]     & 3.768 & 0.0 & $-4.44364$E+5 & 1.08531E+2 
                    & $-6.59213$E-4 & 0.0 & $\Delta G^\prime$ & (**)\\
Fe[s]          & 1.178 & 7.37828E+5 & $-4.22183$E+5 & 1.71919E+2 
                    & $-1.76037$E-2 & 2.31459E-6& $\Delta G^{\prime}$& (**)\\
Mg$_2$SiO$_4$[s]   & 7.278 & 7.52334E+4 & $-9.38369$E+5   & 2.47581E+2
                    & $-3.14980$E-3 & 0.0 & $\Delta G^{\prime}$ & (**)\\
Al$_2$O$_3$[s] & 4.265 & 0.0 & $-7.32976$E+5 & 1.84782E+2 & $-2.57313$E-3 
                    & 0.0 & $\Delta G^{\prime}$ & (**)\\\hline
\end{tabular}
\end{table}