\begin{table}%t1
%\centering
\par
\caption{The input parameters of the four mSUGRA benchmark models we consider here. The
units for the mass parameters are GeV, and the universal trilinear coupling $A_0$ is set
to 0 for all models (see Battaglia et~al.  \cite{Battaglia:2003ab}, for details). \label{tab:models}}
\begin{tabular}{lccccc}
\hline\hline
{Model}&$M_{1/2}$&$m_0$&$\tan\beta$&${\rm sign}~(\mu)$&$m_t$\\ \hline ${\rm B}^\prime$
({Bulk})& 250 & 57 & 10  & $>$0 & 175\\ ${\rm D}^\prime$ ({Coann.})& 525 & 101 &
10  & $>$0 & 175\\ ${\rm E}^\prime$ ({Focus P.})& 300 & 1653 & 10  & $>$0 & 171\\
${\rm K}^\prime$ ({Funnel})& 1300 & 1070 & 46  & $<$0 & 175\\ \hline
\end{tabular}
\end{table}