\begin{table}%T3
\caption{Results: disk type and exponential disk parameters.
{\scriptsize{(1)}} Principal name in LEDA, 
{\scriptsize{(2)}} profile classification (\cf\sec\ref{classi}),  
{\scriptsize{(3)}} fitting boundaries for the inner and outer exponential
disk region, 
{\scriptsize{(4)}} break radius in units of arcsec and kpc, 
{\scriptsize{(5)}} inner scalelength in units of arcsec and kpc
{\scriptsize{(6)}} inner scalelength in relation to the outer scalelength,    
{\scriptsize{(7)}} the central surface brightness of the inner/outer disk,
{\scriptsize{(8)}} the surface brightness at the break radius (estimated 
at the crossing point of the two exponential fits),  
{\scriptsize{(9)}} galactic extinction according to \cite{schlegel}. 
%\newline
For each galaxy two rows of values are given. The results obtained for 
the $r^{\prime}$ band in the upper row, for the $g^{\prime}$ band in 
the lower row. For galaxies with mixed classification both disk fits 
are shown. 
%   
\label{resultstab} 
} 
%\centerline
 {\small
\begin{tabular}{ l c | rrrrr r r r r r r r r}
\hline\hline
%    
Galaxy
&\multicolumn{1}{c}{Break}
&\multicolumn{1}{c}{$b_1$}
&\multicolumn{1}{c}{$b_2$}
&\multicolumn{1}{c}{$b_3$}
&\multicolumn{1}{c}{$b_4$}
&\multicolumn{2}{c}{\rbr}
&\multicolumn{2}{c}{\hin}
&\multicolumn{1}{c}{\hin}
&\munin
&\munout
&\mubr
&$A_{r^{\prime}/g^{\prime}}$
\\[+0.1cm]
%    
& \multicolumn{1}{c}{type}
& \multicolumn{1}{c}{[\arcsec]}
& \multicolumn{1}{c}{[\arcsec]}
& \multicolumn{1}{c}{[\arcsec]}
& \multicolumn{1}{c}{[\arcsec]}
& \multicolumn{1}{c}{[\arcsec]}
& \multicolumn{1}{c}{[kpc]}
& \multicolumn{1}{c}{[\arcsec]}
& \multicolumn{1}{c}{[kpc]}
& \multicolumn{1}{c}{[\hout]}
& \multicolumn{1}{c}{[\magsqarcsecfrac]}
& \multicolumn{1}{c}{[\magsqarcsecfrac]}
& \multicolumn{1}{c}{[\magsqarcsecfrac]}
& \multicolumn{1}{c}{[mag] }
\\
%
\rule[-3mm]{0mm}{5mm}
{\scriptsize{\raisebox{-0.7ex}{(1)}}}
&\multicolumn{1}{c}{{\scriptsize{\raisebox{-0.7ex}{(2)}}}}
&\multicolumn{4}{c}{{\scriptsize{\raisebox{-0.7ex}{(3)}}}}
&\multicolumn{2}{c}{{\scriptsize{\raisebox{-0.7ex}{(4)}}}}
&\multicolumn{2}{c}{{\scriptsize{\raisebox{-0.7ex}{(5)}}}}
&\multicolumn{1}{c}{{\scriptsize{\raisebox{-0.7ex}{(6)}}}}
&\multicolumn{2}{c}{{\scriptsize{\raisebox{-0.7ex}{(7)}}}}
&\multicolumn{1}{c}{{\scriptsize{\raisebox{-0.7ex}{(8)}}}}
&\multicolumn{1}{c}{{\scriptsize{\raisebox{-0.7ex}{(9)}}}}
\\
\hline\\[-0.3cm]
\raisebox{-0.7ex}{NGC~0450}   &   \raisebox{-0.7ex}{II.o-CT}   &   16&   79&   88&  120&   80&       9.5&   31.3&     3.7&  2.7 &21.0 &16.0 &24.0    &0.11 \\[-0.09cm] 
            &        &   16&   78&   89&  128&   79&       9.4&   34.5&     4.1&  2.9 &21.5 &16.3 &24.2    &0.15 \\[+0.02cm] 
\raisebox{-0.7ex}{PGC~006667} &   \raisebox{-0.7ex}{II-AB}   &   10&   70&   77&  108&   74&       9.7&   22.6&     2.9&  1.9 &21.1 &18.0 &24.7    &0.14 \\[-0.09cm] 
            &        &   10&   72&   78&   96&   73&       9.5&   22.7&     3.0&  1.8 &21.5 &18.7 &25.1    &0.19 \\[+0.02cm] 
\raisebox{-0.7ex}{NGC~0701}   &  \raisebox{-0.7ex}{II-i}  &   19&  129&    *&    *&    *&         *&   15.4&     1.8&    * &19.0 & 0.0 &19.0    &0.07 \\[-0.09cm] 
            &        &   19&  115&    *&    *&    *&         *&   16.2&     1.9&    * &19.8 & 0.0 &19.8    &0.10 \\[+0.02cm] 
\raisebox{-0.7ex}{NGC~0853}   &   \raisebox{-0.7ex}{III}  &    0&   43&   48&  100&   45&       4.4&   11.0&     1.1&  0.6 &19.3 &20.9 &23.3    &0.07 \\[-0.09cm] 
            &        &    0&   42&   46&  100&   44&       4.3&   10.3&     1.0&  0.6 &19.6 &21.2 &23.7    &0.10 \\[+0.01cm] 
\raisebox{-0.7ex}{NGC~0941}   &   \raisebox{-0.7ex}{II-CT}   &    5&   77&   84&  120&   81&       8.6&   19.1&     2.0&  1.4 &20.4 &18.5 &25.0    &0.10 \\[-0.09cm] 
            &        &    5&   76&   80&  107&   77&       8.2&   19.5&     2.1&  1.6 &20.8 &18.0 &25.3    &0.13 \\[+0.01cm] 
\raisebox{-0.7ex}{UGC~02081}  &   \raisebox{-0.7ex}{II-CT}   &   11&   48&   69&   85&   53&       9.4&   21.0&     3.7&  2.6 &21.6 &16.1 &25.2    &0.07 \\[-0.09cm] 
            &        &   11&   45&   74&   85&   46&       8.1&   22.3&     3.9&  2.8 &22.2 &15.9 &25.6    &0.10 \\[+0.01cm] 
\raisebox{-0.7ex}{NGC~1042}   &   \raisebox{-0.7ex}{II-AB}   &   39&  122&  122&  219&  122&      10.7&   48.0&     4.2&  1.4 &20.9 &19.9 &23.0    &0.08 \\[-0.09cm] 
            &        &   39&  101&  119&  212&  119&      10.4&   63.9&     5.6&  2.2 &21.7 &19.7 &23.4    &0.11 \\[+0.01cm] 
\raisebox{-0.7ex}{NGC~1068}   &   \raisebox{-0.7ex}{II.o-OLR}  &  105&  184&  188&  362&  188&      13.9&  118.0&     8.7&  2.0 &21.6 &19.9 &23.4    &0.09 \\[-0.09cm] 
            &        &  105&  183&  187&  384&  189&      14.0&  128.2&     9.5&  2.2 &22.4 &20.4 &24.0    &0.13 \\[+0.01cm] 
\raisebox{-0.7ex}{NGC~1084}   &   \raisebox{-0.7ex}{III}  &   27&   91&   97&  179&   95&       8.5&   18.5&     1.7&  0.4 &18.3 &21.4 &23.2    &0.08 \\[-0.09cm] 
            &        &   27&   91&  100&  194&   96&       8.6&   17.9&     1.6&  0.4 &18.7 &21.7 &23.7    &0.11 \\[+0.01cm] 
\raisebox{-0.7ex}{NGC~1087}   &   \raisebox{-0.7ex}{III}  &   49&  139&  142&  238&  140&      14.0&   24.5&     2.4&  0.6 &19.0 &21.4 &24.7    &0.10 \\[-0.09cm] 
            &        &   49&  137&  142&  231&  139&      13.9&   23.6&     2.4&  0.6 &19.4 &22.0 &25.4    &0.13 \\[+0.01cm] 
\raisebox{-0.7ex}{NGC~1299}   &   \raisebox{-0.7ex}{III}  &   22&   45&   46&   75&   46&       7.0&    8.7&     1.3&  0.7 &18.9 &20.5 &24.5    &0.13 \\[-0.09cm] 
            &        &   22&   47&   52&   77&   49&       7.5&    8.6&     1.3&  0.5 &19.4 &22.5 &25.4    &0.18 \\[+0.01cm] 
\raisebox{-0.7ex}{NGC~2543}   &  \raisebox{-0.7ex}{II-i}  &   34&  108&    *&    *&   74&      13.3&   15.7&     2.8&    * &19.1 & 0.0 &19.1    &0.19 \\[-0.09cm] 
            &        &   34&  108&    *&    *&   75&      13.5&   14.3&     2.6&    * &19.3 & 0.0 &19.3    &0.27 \\[+0.01cm] 
\raisebox{-0.7ex}{NGC~2541}   &   \raisebox{-0.7ex}{II-CT}   &   48&  141&  143&  216&  142&       7.2&   51.2&     2.6&  1.6 &21.3 &19.3 &24.5    &0.14 \\[-0.09cm] 
            &        &   48&  143&  147&  223&  145&       7.4&   55.2&     2.8&  2.1 &21.9 &18.6 &25.0    &0.19 \\[+0.01cm] 
\raisebox{-0.7ex}{UGC~04393}  &   \raisebox{-0.7ex}{I}     &   30&  125&    *&    *&    *&         *&   22.4&     3.6&    * &21.6 & 0.0 &21.6    &0.12 \\[-0.09cm] 
            &        &   30&  114&    *&    *&    *&         *&   21.7&     3.4&    * &21.9 & 0.0 &21.9    &0.16 \\[+0.01cm] 
\raisebox{-0.7ex}{NGC~2684}   &   \raisebox{-0.7ex}{II-CT}   &    4&   23&   25&   42&   24&       5.1&   10.6&     2.2&  1.9 &19.6 &17.5 &22.1    &0.07 \\[-0.09cm] 
            &        &    4&   23&   25&   42&   24&       5.1&   10.8&     2.3&  2.0 &20.2 &18.0 &22.4    &0.10 \\[+0.01cm] 
                               &                           &   16&   37&   42&   71&   38&       6.7&   24.1&     4.2&  2.9 &20.2 &16.5 &22.1    &0.05 \\[-0.09cm] 
\raisebox{-0.7ex}{NGC~2701}            &   \raisebox{-0.7ex}{II-AB + III}     &   42&   71&   71&   93&   73&      12.8&    8.3&     1.4&  0.4 &16.5 &22.4 &25.8    &0.05 \\[+0.01cm] 
            &        &   16&   37&   41&   74&   38&       6.7&   27.8&     4.9&  3.3 &20.7 &17.1 &21.9    &0.07 \\[-0.09cm] 
            &        &   41&   74&   76&  102&   75&      13.1&    8.5&     1.5&  0.4 &17.1 &22.1 &26.1    &0.07 \\[+0.01cm] 
\raisebox{-0.7ex}{NGC~2776}   &   \raisebox{-0.7ex}{I}     &   29&  149&    *&    *&    *&         *&   19.6&     3.8&    * &20.0 & 0.0 &20.0    &0.04 \\[-0.09cm] 
            &        &   29&  134&    *&    *&    *&         *&   20.1&     3.9&    * &20.5 & 0.0 &20.5    &0.05 \\[+0.01cm] 
\raisebox{-0.7ex}{NGC~2967}   &   \raisebox{-0.7ex}{III-d}  &   10&   59&   90&  156&   73&       9.4&   16.3&     2.1&  0.5 &19.4 &22.0 &24.8    &0.28 \\[-0.09cm] 
            &        &   10&   59&   90&  143&   73&       9.4&   16.9&     2.2&  0.5 &20.1 &22.6 &25.3    &0.38 \\[+0.01cm] 
\raisebox{-0.7ex}{NGC~3055}   &   \raisebox{-0.7ex}{II.o-CT}   &   10&   53&   57&   88&   54&       6.8&   17.1&     2.1&  1.9 &19.6 &16.3 &23.1    &0.14 \\[-0.09cm] 
            &        &   10&   52&   56&   88&   53&       6.7&   17.5&     2.2&  2.0 &20.1 &16.7 &23.4    &0.20 \\[+0.01cm] 
\raisebox{-0.7ex}{NGC~3246}   &   \raisebox{-0.7ex}{II-AB}   &    7&   59&   64&   96&   61&       9.0&   20.2&     3.0&  2.0 &20.8 &17.1 &24.3    &0.10 \\[-0.09cm] 
            &        &    7&   60&   62&   93&   60&       8.9&   22.0&     3.3&  2.2 &21.3 &17.3 &24.5    &0.14 \\[+0.01cm] 
\raisebox{-0.7ex}{NGC~3259}   &   \raisebox{-0.7ex}{III-d}  &    7&   59&   64&  122&   63&       8.4&   11.4&     1.5&  0.4 &19.4 &22.8 &24.7    &0.04 \\[-0.09cm] 
            &        &    7&   59&   63&  138&   63&       8.4&   12.2&     1.6&  0.4 &20.0 &23.1 &25.0    &0.05 \\[+0.01cm] 
\raisebox{-0.7ex}{NGC~3310}   &   \raisebox{-0.7ex}{III}  &   10&   52&   53&  172&   53&       4.4&   10.6&     0.9&  0.3 &18.2 &21.6 &23.2    &0.06 \\[-0.09cm] 
            &        &   10&   52&   54&  141&   53&       4.4&   10.3&     0.9&  0.3 &18.4 &21.7 &23.3    &0.09 \\[+0.01cm] 
\raisebox{-0.7ex}{NGC~3359}   &   \raisebox{-0.7ex}{II-AB}   &   29&  183&  204&  266&  184&      16.1&   51.1&     4.5&  1.8 &20.5 &16.9 &24.9    &0.03 \\[-0.09cm] 
            &        &   29&  180&  192&  266&  181&      15.8&   53.0&     4.6&  1.8 &20.9 &17.7 &25.0    &0.04 \\[+0.01cm] 
\raisebox{-0.7ex}{NGC~3423}   &   \raisebox{-0.7ex}{II-CT}   &   30&   76&   93&  175&   85&       6.1&   52.2&     3.7&  2.8 &20.9 &17.7 &22.6    &0.08 \\[-0.09cm] 
            &        &   30&   88&   97&  160&   95&       6.8&   51.2&     3.7&  3.2 &21.2 &17.1 &23.1    &0.12 \\[+0.01cm] 
\raisebox{-0.7ex}{NGC~3488}   &   \raisebox{-0.7ex}{II.o-CT}   &   10&   32&   52&   70&   44&       9.8&   16.8&     3.8&  2.5 &20.3 &16.0 &23.2    &0.04 \\[-0.09cm] 
            &        &   10&   29&   53&   72&   43&       9.6&   20.6&     4.6&  3.0 &21.0 &16.3 &23.3    &0.05 \\[+0.01cm] 
\raisebox{-0.7ex}{NGC~3583}   &   \raisebox{-0.7ex}{III-d}  &   13&   82&   84&  147&   83&      13.5&   16.3&     2.7&  0.7 &19.0 &21.0 &24.7    &0.04 \\[-0.09cm] 
            &        &   13&   81&   82&  138&   82&      13.3&   17.0&     2.8&  0.7 &19.7 &21.4 &25.7    &0.05 \\[+0.01cm] 
%
\hline
\raisebox{-0.7ex}{NGC~3589}   &   \raisebox{-0.7ex}{II-CT}   &    0&   37&   38&   72&   38&       5.8&   18.6&     2.9&  1.7 &21.1 &19.7 &23.1    &0.03 \\[-0.09cm] 
            &        &    0&   33&   38&   84&   36&       5.5&   20.5&     3.1&  1.8 &21.5 &20.3 &23.0    &0.04 \\[+0.01cm] 
\raisebox{-0.7ex}{UGC~06309}  &  \raisebox{-0.7ex}{II-i}  &   23&   74&    *&    *&    *&         *&    9.8&     2.1&    * &18.9 & 0.0 &18.9    &0.05 \\[-0.09cm] 
            &        &   25&   88&    *&    *&    *&         *&   11.1&     2.4&    * &19.9 & 0.0 &19.9    &0.07 \\[+0.01cm] 
\raisebox{-0.7ex}{NGC~3631}   &   \raisebox{-0.7ex}{I}     &  140&  233&    *&    *&    *&         *&   37.8&     3.6&    * &20.8 & 0.0 &20.8    &0.05 \\[-0.09cm] 
            &        &  140&  226&    *&    *&    *&         *&   36.7&     3.5&    * &21.2 & 0.0 &21.2    &0.06 \\[+0.01cm] 
\raisebox{-0.7ex}{NGC~3642}   &   \raisebox{-0.7ex}{III-d}  &   30&   75&   79&  229&   79&      10.0&   20.9&     2.6&  0.5 &20.3 &22.3 &24.0    &0.03 \\[-0.09cm] 
            &        &   30&   71&   73&  236&   73&       9.3&   19.7&     2.5&  0.4 &20.6 &22.7 &24.3    &0.04 \\[+0.01cm] 
\raisebox{-0.7ex}{UGC~06518}  &  \raisebox{-0.7ex}{II-i}  &   10&   43&    *&    *&    *&         *&    6.4&     1.4&    * &19.3 & 0.0 &19.3    &0.04 \\[-0.09cm] 
            &        &   10&   45&    *&    *&    *&         *&    6.1&     1.3&    * &19.6 & 0.0 &19.6    &0.05 \\[+0.01cm] 
\raisebox{-0.7ex}{NGC~3756}   &   \raisebox{-0.7ex}{II.o-CT}   &   11&   92&  103&  154&   97&      10.2&   33.7&     3.6&  2.0 &20.0 &16.6 &23.2    &0.03 \\[-0.09cm] 
            &        &   11&   78&  104&  149&  100&      10.6&   38.6&     4.1&  2.2 &20.8 &17.7 &23.4    &0.04 \\[+0.01cm] 
\raisebox{-0.7ex}{NGC~3888}   &   \raisebox{-0.7ex}{I}     &   13&   81&    *&    *&    *&         *&   10.1&     1.9&    * &18.7 & 0.0 &18.7    &0.03 \\[-0.09cm] 
            &        &   13&   84&    *&    *&    *&         *&    9.9&     1.8&    * &19.1 & 0.0 &19.1    &0.04 \\[+0.01cm] 
\raisebox{-0.7ex}{NGC~3893}   &   \raisebox{-0.7ex}{III-d}  &   15&  134&  134&  184&  134&      11.1&   29.1&     2.4&  0.6 &19.2 &21.7 &24.7    &0.06 \\[-0.09cm] 
            &        &   15&  139&  139&  184&  139&      11.5&   28.3&     2.3&  0.5 &19.6 &22.6 &25.5    &0.08 \\[+0.01cm] 
\raisebox{-0.7ex}{UGC~06903}  &   \raisebox{-0.7ex}{II.o-CT}   &   21&   59&   72&   98&   60&       8.0&   31.8&     4.2&  3.6 &21.6 &15.8 &23.9    &0.06 \\[-0.09cm] 
            &        &   21&   56&   63&   92&   57&       7.6&   35.0&     4.6&  3.6 &22.2 &17.1 &24.2    &0.08 \\[+0.01cm] 
\raisebox{-0.7ex}{NGC~3982}   &   \raisebox{-0.7ex}{III}  &   13&   51&   54&   91&   52&       4.9&   10.2&     1.0&  0.7 &18.3 &19.8 &23.8    &0.04 \\[-0.09cm] 
            &        &   13&   49&   51&   99&   50&       4.7&   10.2&     1.0&  0.8 &18.7 &19.8 &23.6    &0.05 \\[+0.01cm] 
\raisebox{-0.7ex}{NGC~3992}   &   \raisebox{-0.7ex}{II.o-OLR}  &   44&  133&  139&  324&  137&      12.2&   84.0&     7.5&  2.3 &20.5 &18.1 &22.3    &0.08 \\[-0.09cm] 
            &        &   44&  129&  133&  280&  133&      11.8&   96.4&     8.6&  2.7 &21.3 &18.4 &22.9    &0.12 \\[+0.01cm] 
\raisebox{-0.7ex}{NGC~4030}   &   \raisebox{-0.7ex}{III}  &   37&  147&  164&  266&  152&      15.5&   26.2&     2.7&  0.5 &19.2 &22.1 &25.4    &0.08 \\[-0.09cm] 
            &        &   37&  147&  151&  230&  148&      15.1&   25.5&     2.6&  0.6 &19.6 &22.3 &26.0    &0.11 \\[+0.01cm] 
\raisebox{-0.7ex}{NGC~4041}   &   \raisebox{-0.7ex}{III-d}  &   26&   76&   80&  192&   80&       8.2&   18.6&     1.9&  0.6 &19.7 &21.8 &24.6    &0.05 \\[-0.09cm] 
            &        &   26&   81&   84&  186&   83&       8.5&   18.2&     1.9&  0.5 &20.1 &22.6 &25.2    &0.07 \\[+0.01cm] 
   & &   40&   57&   57&  116&   57&       4.3&   23.3&     1.7&  1.5 &19.1 &17.8 &21.7    &0.06 \\[-0.09cm] 
\raisebox{-0.7ex}{NGC~4102}            & \raisebox{-0.7ex}{II.o-OLR + III}       &   57&  116&  119&  165&  118&       8.8&   15.8&     1.2&  0.6 &17.8 &20.9 &26.0    &0.06 \\[+0.01cm] 
            &        &   40&   59&   59&  107&   59&       4.4&   21.6&     1.6&  1.4 &19.5 &18.4 &22.4    &0.08 \\[-0.09cm] 
            &        &   59&  107&  109&  151&  108&       8.1&   15.7&     1.2&  0.7 &18.4 &20.4 &26.1    &0.08 \\[+0.01cm] 
\raisebox{-0.7ex}{NGC~4108}   &   \raisebox{-0.7ex}{II-AB}   &    7&   44&   46&   66&   44&       8.6&    9.1&     1.8&  1.5 &18.9 &16.2 &24.5    &0.05 \\[-0.09cm] 
            &        &    7&   43&   45&   68&   44&       8.6&    9.8&     1.9&  1.6 &19.5 &16.5 &24.5    &0.07 \\[+0.01cm] 
\raisebox{-0.7ex}{NGC~4108B}  &   \raisebox{-0.7ex}{I}     &    7&   67&    *&    *&    *&         *&   11.4&     2.2&    * &20.8 & 0.0 &20.8    &0.05 \\[-0.09cm] 
            &        &    7&   71&    *&    *&    *&         *&   11.0&     2.2&    * &21.0 & 0.0 &21.0    &0.07 \\[+0.01cm] 
\raisebox{-0.7ex}{NGC~4123}   &   \raisebox{-0.7ex}{I}     &   20&  220&    *&    *&    *&         *&   35.5&     3.4&    * &20.6 & 0.0 &20.6    &0.06 \\[-0.09cm] 
            &        &   20&  207&    *&    *&    *&         *&   36.5&     3.5&    * &21.2 & 0.0 &21.2    &0.08 \\[+0.01cm] 
   &  &   15&   35&   37&   50&   36&       7.5&   16.3&     3.4&  1.6 &19.9 &18.6 &22.1    &0.05 \\[-0.09cm] 
\raisebox{-0.7ex}{NGC~4210}    &  \raisebox{-0.7ex}{II.o-OLR + CT}      &   37&   50&   55&   76&   51&      10.6&   10.2&     2.1&  1.5 &18.6 &15.6 &24.1    &0.05 \\[+0.01cm] 
            &       &   15&   32&   38&   50&   37&       7.7&   19.5&     4.1&  2.0 &20.7 &19.0 &22.4    &0.07 \\[-0.09cm] 
            &        &   38&   50&   52&   73&   51&      10.6&   10.0&     2.1&  1.6 &19.0 &15.6 &24.9    &0.07 \\[+0.01cm] 
  &  &   12&   43&   48&   78&   47&       7.9&   24.5&     4.1&  2.1 &19.8 &17.6 &21.7    &0.05 \\[-0.09cm] 
\raisebox{-0.7ex}{NGC~4273}             &  \raisebox{-0.7ex}{II-AB + III}      &   48&   78&   79&  119&   78&      13.2&   11.5&     1.9&  0.6 &17.6 &20.3 &25.4    &0.05 \\[+0.01cm] 
            &        &   12&   45&   47&   84&   47&       7.9&   29.7&     5.0&  2.6 &20.5 &17.9 &22.1    &0.07 \\[-0.09cm] 
            &        &   47&   84&   89&  106&   84&      14.2&   11.2&     1.9&  0.7 &17.9 &20.0 &25.6    &0.07 \\[+0.01cm] 
\raisebox{-0.7ex}{NGC~4480}   &   \raisebox{-0.7ex}{II.o-CT}   &    8&   53&   58&   90&   54&       9.3&   18.8&     3.2&  2.3 &19.8 &15.8 &23.0    &0.06 \\[-0.09cm] 
            &        &    8&   54&   57&   88&   54&       9.3&   21.4&     3.7&  2.6 &20.5 &16.1 &23.3    &0.09 \\[+0.01cm] 
  &   &   25&   76&   77&  139&   77&       8.3&   53.3&     5.8&  1.3 &22.0 &21.4 &23.6    &0.06 \\[-0.09cm] 
\raisebox{-0.7ex}{NGC~4517A}            &  \raisebox{-0.7ex}{II.o-CT + AB}      &   77&  139&  159&  192&  140&      15.1&   39.7&     4.3&  2.3 &21.4 &15.7 &25.7    &0.06 \\[+0.01cm] 
            &        &   25&   76&   77&  139&   77&       8.3&   59.3&     6.4&  1.4 &22.5 &21.8 &23.9    &0.09 \\[-0.09cm] 
            &        &   77&  139&  159&  192&  140&      15.1&   41.1&     4.4&  2.5 &21.8 &15.5 &26.0    &0.09 \\[+0.01cm] 
\raisebox{-0.7ex}{UGC~07700}  &   \raisebox{-0.7ex}{II.o-CT}   &   12&   45&   52&   94&   50&      11.2&   26.4&     5.9&  2.2 &22.2 &20.2 &23.8    &0.05 \\[-0.09cm] 
            &        &   12&   49&   58&   74&   50&      11.2&   29.1&     6.5&  3.7 &22.6 &17.5 &24.5    &0.07 \\[+0.01cm] 
\raisebox{-0.7ex}{NGC~4545}   &   \raisebox{-0.7ex}{II.o-CT}   &    7&   56&   58&   97&   56&      11.6&   17.7&     3.7&  2.0 &20.0 &16.3 &23.8    &0.03 \\[-0.09cm] 
            &        &    7&   49&   57&   89&   55&      11.4&   19.2&     4.0&  2.1 &20.6 &16.7 &24.0    &0.04 \\[+0.01cm] 
\raisebox{-0.7ex}{NGC~4653}   &   \raisebox{-0.7ex}{II-AB}   &   11&  102&  109&  142&  103&      19.0&   23.0&     4.2&  1.7 &20.7 &17.1 &25.9    &0.06 \\[-0.09cm] 
            &        &   11&  101&  107&  130&  102&      18.8&   24.5&     4.5&  1.8 &21.2 &17.1 &26.0    &0.09 \\[+0.01cm] 
%
\hline
\raisebox{-0.7ex}{NGC~4668}   &   \raisebox{-0.7ex}{III}  &    0&   60&   71&  110&   66&       7.6&   11.8&     1.4&  0.5 &19.6 &22.2 &25.5    &0.07 \\[-0.09cm] 
            &        &    0&   65&   71&  104&   68&       7.8&   11.7&     1.3&  0.5 &20.0 &23.2 &25.9    &0.10 \\[+0.01cm] 
\raisebox{-0.7ex}{UGC~08041}  &   \raisebox{-0.7ex}{II.o-CT}   &   14&   69&   73&  148&   71&       6.8&   36.9&     3.5&  1.4 &21.1 &20.2 &23.1    &0.06 \\[-0.09cm] 
            &        &   14&   69&   75&  157&   70&       6.7&   39.9&     3.8&  1.6 &21.6 &20.5 &23.4    &0.09 \\[+0.01cm] 
\raisebox{-0.7ex}{UGC~08084}  &   \raisebox{-0.7ex}{II.o-OLR}  &    9&   38&   44&   71&   42&       8.2&   29.0&     5.7&  3.4 &22.4 &18.8 &23.9    &0.08 \\[-0.09cm] 
            &        &    9&   35&   45&   78&   43&       8.4&   31.3&     6.1&  3.9 &22.8 &18.7 &24.2    &0.11 \\[+0.01cm] 
   & &   13&   38&   48&  103&   39&       3.3&   27.6&     2.3&  2.2 &20.2 &18.2 &21.9    &0.07 \\[-0.09cm] 
\raisebox{-0.7ex}{NGC~4904}            &  \raisebox{-0.7ex}{II.o-OLR + III}      &   48&  103&  116&  157&  104&       8.7&   12.5&     1.0&  0.5 &18.2 &22.4 &26.2    &0.07 \\[+0.01cm] 
            &        &   13&   40&   40&   99&   40&       3.4&   32.7&     2.7&  2.6 &20.9 &18.8 &22.2    &0.10 \\[-0.09cm] 
            &        &   40&   99&   99&  135&   99&       8.3&   12.7&     1.1&  0.3 &18.8 &25.1 &27.4    &0.10 \\[+0.01cm] 
\raisebox{-0.7ex}{UGC~08237}  &   \raisebox{-0.7ex}{II.o-OLR}  &   14&   25&   29&   50&   26&       5.6&   14.8&     3.2&  2.6 &20.6 &17.8 &22.4    &0.05 \\[-0.09cm] 
            &        &   14&   27&   31&   48&   30&       6.5&   14.0&     3.0&  2.5 &21.1 &18.4 &23.0    &0.06 \\[+0.01cm] 
   & &    5&   29&   32&   72&   30&       2.4&   20.3&     1.6&  1.8 &19.8 &18.3 &21.7    &0.08 \\[-0.09cm] 
  \raisebox{-0.7ex}{NGC~5147}          &   \raisebox{-0.7ex}{II.o-OLR + III}     &   32&   72&   77&  122&   73&       5.8&   11.0&     0.9&  0.5 &18.3 &22.0 &25.8    &0.08 \\[+0.01cm] 
            &        &    5&   26&   29&   75&   29&       2.3&   22.8&     1.8&  2.2 &20.4 &18.5 &22.0    &0.11 \\[-0.09cm] 
            &        &   29&   75&   79&  108&   76&       6.1&   10.5&     0.8&  0.6 &18.5 &21.6 &26.2    &0.11 \\[+0.01cm] 
\raisebox{-0.7ex}{UGC~08658}  &   \raisebox{-0.7ex}{II-CT}   &   12&   57&   61&  102&   61&       9.7&   22.4&     3.5&  1.4 &21.0 &20.0 &23.9    &0.05 \\[-0.09cm] 
            &        &   12&   57&   61&  122&   61&       9.7&   24.4&     3.9&  1.5 &21.6 &20.3 &24.4    &0.06 \\[+0.01cm] 
\raisebox{-0.7ex}{NGC~5300}   &   \raisebox{-0.7ex}{II.o-CT}   &   12&   80&   85&  155&   83&       7.2&   37.1&     3.2&  2.1 &20.8 &18.2 &23.2    &0.06 \\[-0.09cm] 
            &        &   12&   75&   82&  142&   77&       6.6&   41.8&     3.6&  2.6 &21.4 &18.1 &23.5    &0.09 \\[+0.01cm] 
\raisebox{-0.7ex}{NGC~5334}   &   \raisebox{-0.7ex}{II.o-CT}   &   13&   80&  102&  152&   92&       9.1&   40.2&     4.0&  2.6 &21.0 &16.7 &23.8    &0.13 \\[-0.09cm] 
            &        &   13&  101&  103&  156&  103&      10.2&   40.3&     4.0&  2.8 &21.5 &16.4 &24.4    &0.18 \\[+0.01cm] 
\raisebox{-0.7ex}{NGC~5376}   &   \raisebox{-0.7ex}{II.o-OLR}  &   10&   34&   35&   97&   35&       5.6&   17.0&     2.7&  1.4 &19.4 &18.6 &21.2    &0.04 \\[-0.09cm] 
            &        &   10&   34&   39&   95&   37&       5.9&   17.9&     2.8&  1.7 &20.1 &18.7 &22.2    &0.05 \\[+0.01cm] 
\raisebox{-0.7ex}{NGC~5430}   &   \raisebox{-0.7ex}{II.o-OLR}  &   10&   69&   72&  105&   70&      15.7&   15.8&     3.5&  1.4 &19.4 &17.8 &23.9    &0.05 \\[-0.09cm] 
            &        &   10&   69&   71&  102&   69&      15.5&   16.2&     3.6&  1.6 &20.1 &17.6 &24.4    &0.06 \\[+0.01cm] 
\raisebox{-0.7ex}{NGC~5480}   &   \raisebox{-0.7ex}{III-d}  &    9&   65&   74&  129&   67&       9.8&   13.9&     2.0&  0.5 &19.6 &22.1 &24.9    &0.05 \\[-0.09cm] 
            &        &    9&   67&   76&  122&   68&      10.0&   13.5&     2.0&  0.5 &20.1 &22.6 &25.4    &0.07 \\[+0.01cm] 
\raisebox{-0.7ex}{NGC~5584}   &   \raisebox{-0.7ex}{II.o-CT}   &   14&   75&  107&  165&   90&      10.6&   39.8&     4.7&  2.0 &20.9 &18.4 &23.3    &0.11 \\[-0.09cm] 
            &        &   14&   68&   92&  155&   84&       9.9&   45.4&     5.4&  2.4 &21.5 &18.7 &23.4    &0.15 \\[+0.01cm] 
\raisebox{-0.7ex}{NGC~5624}   &   \raisebox{-0.7ex}{III}  &    0&   46&   50&   87&   48&       7.3&    9.9&     1.5&  0.5 &20.1 &22.6 &24.9    &0.05 \\[-0.09cm] 
            &        &    0&   37&   47&   80&   42&       6.4&    8.9&     1.3&  0.4 &20.3 &23.2 &25.4    &0.07 \\[+0.01cm] 
\raisebox{-0.7ex}{NGC~5660}   &   \raisebox{-0.7ex}{II-CT}   &   12&   63&   70&   90&   67&      12.0&   17.8&     3.2&  1.6 &19.9 &17.3 &24.1    &0.06 \\[-0.09cm] 
            &        &   12&   64&   71&  105&   69&      12.4&   18.5&     3.3&  1.7 &20.4 &17.8 &24.2    &0.08 \\[+0.01cm] 
   & &    *&    *&    *&    *&    *&         *&      *&       *&    * &   * &   * &   *    &0.03 \\[-0.09cm] 
 \raisebox{-0.7ex}{NGC~5667}           &   \raisebox{-0.7ex}{II-i + III}     &   28&   64&   66&   96&   64&       9.8&   11.0&     1.7&  0.6 &19.1 &21.9 &25.7    &0.03 \\[+0.01cm] 
            &        &    *&    *&    *&    *&    *&         *&      *&       *&    * &   * &   * &   *    &0.04 \\[-0.09cm] 
            &        &   28&   62&   65&  111&   63&       9.7&   10.3&     1.6&  0.4 &19.2 &23.7 &26.4    &0.04 \\[+0.01cm] 
\raisebox{-0.7ex}{NGC~5668}   &   \raisebox{-0.7ex}{I}     &   20&  178&    *&    *&    *&         *&   26.7&     3.1&    * &20.6 & 0.0 &20.6    &0.10 \\[-0.09cm] 
            &        &   20&  162&    *&    *&    *&         *&   24.3&     2.8&    * &20.7 & 0.0 &20.7    &0.14 \\[+0.01cm] 
\raisebox{-0.7ex}{NGC~5693}   &   \raisebox{-0.7ex}{II-AB}   &    9&   28&   50&   71&   29&       5.1&   16.7&     2.9&  2.1 &20.9 &17.9 &23.7    &0.10 \\[-0.09cm] 
            &        &    9&   26&   51&   71&   32&       5.6&   20.5&     3.6&  2.2 &21.6 &19.4 &23.5    &0.14 \\[+0.01cm] 
\raisebox{-0.7ex}{NGC~5713}   &   \raisebox{-0.7ex}{III}  &    8&  102&  114&  164&  103&      14.0&   18.1&     2.5&  0.7 &19.1 &21.0 &25.6    &0.11 \\[-0.09cm] 
            &        &    8&  112&  139&  159&  112&      15.2&   18.1&     2.5&  0.7 &19.6 &21.5 &25.9    &0.15 \\[+0.01cm] 
\raisebox{-0.7ex}{NGC~5768}   &   \raisebox{-0.7ex}{I}     &    6&   95&    *&    *&    *&         *&   13.1&     1.8&    * &19.9 & 0.0 &19.9    &0.25 \\[-0.09cm] 
            &        &    6&   98&    *&    *&    *&         *&   13.2&     1.8&    * &20.4 & 0.0 &20.4    &0.35 \\[+0.01cm] 
\raisebox{-0.7ex}{ IC~1067}   &   \raisebox{-0.7ex}{II.o-OLR}  &    *&    *&   40&   99&    *&         *&      *&       *&    * &   * &19.8 &   *    &0.14 \\[-0.09cm] 
            &        &    *&    *&   40&   80&    *&         *&      *&       *&    * &   * &20.0 &   *    &0.19 \\[+0.01cm] 
   & &   43&   81&   86&  116&   86&       9.9&   50.2&     5.8&  2.3 &22.1 &19.9 &23.9    &0.12 \\[-0.09cm] 
 \raisebox{-0.7ex}{NGC~5774}           &   \raisebox{-0.7ex}{II.o-OLR + III}     &   86&  116&  118&  182&  116&      13.3&   22.2&     2.5&  0.7 &19.9 &21.3 &25.1    &0.12 \\[+0.01cm] 
            &        &   47&   74&   77&  124&   77&       8.8&   60.8&     7.0&  2.7 &22.7 &20.5 &24.1    &0.16 \\[-0.09cm] 
            &        &   77&  124&  125&  182&  124&      14.2&   22.9&     2.6&  0.6 &20.5 &22.3 &25.7    &0.16 \\[+0.01cm] 
\raisebox{-0.7ex}{NGC~5806}   &   \raisebox{-0.7ex}{III}  &   60&  116&  118&  242&  118&      11.8&   29.9&     3.0&  0.5 &20.3 &22.3 &24.6    &0.14 \\[-0.09cm] 
            &        &   60&  123&  124&  257&  124&      12.4&   31.4&     3.1&  0.5 &21.1 &23.0 &25.3    &0.20 \\[+0.01cm] 
\raisebox{-0.7ex}{NGC~5850}   &   \raisebox{-0.7ex}{II.o-OLR}  &   96&  136&  140&  233&  137&      25.0&   92.2&    16.8&  2.7 &22.3 &19.7 &23.8    &0.16 \\[-0.09cm] 
            &        &   96&  133&  138&  240&  138&      25.2&  127.1&    23.2&  3.9 &23.3 &20.0 &24.4    &0.21 \\[+0.01cm] 
%
\hline
\raisebox{-0.7ex}{UGC~09741}  &   \raisebox{-0.7ex}{III}  &   17&   24&   29&   62&   25&       4.7&    6.8&     1.3&  0.6 &19.8 &21.2 &23.5    &0.06 \\[-0.09cm] 
            &        &   17&   27&   29&   62&   27&       5.1&    6.9&     1.3&  0.7 &20.4 &21.6 &24.0    &0.09 \\[+0.01cm] 
\raisebox{-0.7ex}{UGC~09837}  &   \raisebox{-0.7ex}{II-CT}   &    8&   45&   53&   69&   46&       9.4&   17.1&     3.5&  2.4 &21.4 &16.6 &24.6    &0.05 \\[-0.09cm] 
            &        &    8&   44&   46&   69&   46&       9.4&   18.2&     3.7&  2.6 &21.8 &17.0 &24.8    &0.06 \\[+0.01cm]
\raisebox{-0.7ex}{NGC~5937}   &   \raisebox{-0.7ex}{III}  &   12&   62&   75&  117&   63&      12.5&   12.6&     2.5&  0.6 &19.1 &21.1 &24.6    &0.50 \\[-0.09cm] 
            &        &   12&   68&   70&   98&   68&      13.5&   12.8&     2.5&  0.6 &19.8 &22.2 &25.8    &0.69 \\[+0.01cm] 
\raisebox{-0.7ex}{ IC~1125}   &   \raisebox{-0.7ex}{I}     &    4&   77&    *&    *&    *&         *&   11.4&     2.3&    * &19.9 & 0.0 &19.9    &0.43 \\[-0.09cm] 
            &        &    4&   68&    *&    *&    *&         *&   11.6&     2.3&    * &20.5 & 0.0 &20.5    &0.59 \\[+0.01cm] 
\raisebox{-0.7ex}{ IC~1158}   &   \raisebox{-0.7ex}{II.o-CT}   &   14&   53&   67&   98&   65&       9.1&   30.5&     4.3&  2.9 &21.2 &16.9 &23.4    &0.32 \\[-0.09cm] 
            &        &   14&   50&   67&  101&   61&       8.5&   34.8&     4.9&  3.3 &21.9 &17.5 &23.8    &0.44 \\[+0.01cm] 
\raisebox{-0.7ex}{NGC~6070}   &   \raisebox{-0.7ex}{II.o-CT}   &   20&   87&  108&  162&   97&      14.0&   37.2&     5.4&  2.0 &20.1 &17.3 &22.8    &0.41 \\[-0.09cm] 
            &        &   20&   87&  108&  157&   88&      12.7&   43.4&     6.3&  2.6 &21.0 &17.4 &23.3    &0.56 \\[+0.01cm] 
\raisebox{-0.7ex}{NGC~6155}   &   \raisebox{-0.7ex}{II-AB}   &    4&   33&   36&   71&   34&       6.3&   12.2&     2.3&  1.5 &19.4 &18.2 &21.9    &0.04 \\[-0.09cm] 
            &        &    4&   33&   37&   63&   34&       6.3&   13.1&     2.4&  1.8 &20.0 &17.9 &22.7    &0.05 \\[+0.01cm] 
\raisebox{-0.7ex}{UGC~10721}  &   \raisebox{-0.7ex}{III}  &   16&   38&   48&   80&   41&       8.9&    8.3&     1.8&  0.5 &19.3 &21.7 &24.6    &0.10 \\[-0.09cm] 
            &        &   16&   38&   46&   78&   41&       8.9&    7.9&     1.7&  0.6 &19.5 &21.8 &24.8    &0.13 \\[+0.01cm] 
\raisebox{-0.7ex}{NGC~7437}   &   \raisebox{-0.7ex}{II-CT}   &   12&   39&   47&   91&   43&       6.5&   26.4&     4.0&  1.9 &21.3 &19.7 &23.1    &0.11 \\[-0.09cm] 
            &        &   12&   40&   43&  147&   41&       6.2&   27.1&     4.1&  1.9 &21.8 &20.4 &23.3    &0.15 \\[+0.01cm] 
\raisebox{-0.7ex}{NGC~7606}   &   \raisebox{-0.7ex}{II-CT}   &   20&   96&  113&  195&   97&      14.7&   43.4&     6.6&  1.9 &19.6 &17.3 &22.3    &0.10 \\[-0.09cm] 
            &        &   20&   92&  114&  187&   93&      14.1&   49.9&     7.6&  2.2 &20.5 &17.7 &22.9    &0.14 \\[+0.01cm] 
\raisebox{-0.7ex}{UGC~12709}  &   \raisebox{-0.7ex}{II-CT}   &    5&   65&   72&  102&   69&      12.8&   29.8&     5.5&  2.2 &22.4 &19.3 &25.1    &0.11 \\[-0.09cm] 
            &        &    5&   64&   66&  108&   66&      12.2&   33.0&     6.1&  2.4 &23.0 &19.8 &25.2    &0.15 \\[+0.01cm] 
\hline                   
\end{tabular}
}
\end{table}