\begin{table}
%\centering
\par
 \caption{Gas temperature, non-thermal broadening and abundance of each 
 molecule for the best-fit model. The peak opacity of each modeled transition 
 is also given, as well as an estimation of the total opacity of the hyperfine
 multiplets if they had been modeled.}
 \label{t:results}
 \begin{tabular}{lclccccc}
 \hline\hline
 Molec. & \hspace*{-0.40cm} Line & \multicolumn{1}{c}{\hspace*{-0.32cm} Frequency$^{(1)}$} & \hspace*{-0.32cm} $T_{\rm k}$ & \hspace*{-0.32cm} $\Delta V_{{\rm NT}}$ & \hspace*{-0.32cm} $\chi^{(2)}$ & \hspace*{-0.32cm} $\tau_{{\rm peak}}$ & \hspace*{-0.32cm} $\tau_{{\rm tot}}$ \\
  & \hspace*{-0.40cm} & \multicolumn{1}{c}{\hspace*{-0.32cm} {\scriptsize (MHz)}} & \hspace*{-0.32cm} {\scriptsize (K)} & \hspace*{-0.32cm} {\scriptsize (km~s$^{-1}$)} & \hspace*{-0.32cm} & \hspace*{-0.32cm}  & \hspace*{-0.32cm} \\
 \hline
 HCO$^+$    & \hspace*{-0.40cm} 4-3 & \hspace*{-0.32cm} 356734.134(50) & \hspace*{-0.32cm} 8.8 & \hspace*{-0.32cm} 0.35 & \hspace*{-0.32cm} 8.4($-$10)  & \hspace*{-0.32cm} 44 & \hspace*{-0.32cm} - \\
 H$^{13}$CO$^+$ & \hspace*{-0.40cm} 4-3 & \hspace*{-0.32cm} 346998.338(89) & \hspace*{-0.32cm} 8.8 & \hspace*{-0.32cm} 0.35 & \hspace*{-0.32cm} 1.2($-$11) & \hspace*{-0.32cm} 0.46 & \hspace*{-0.32cm} - \\
 DCO$^+$    & \hspace*{-0.40cm} 4-3 & \hspace*{-0.32cm} 288143.858(7) & \hspace*{-0.32cm} 8.8 & \hspace*{-0.32cm} 0.35 & \hspace*{-0.32cm} 2.1($-$11) & \hspace*{-0.32cm} 1.2 & \hspace*{-0.32cm} - \\
            & \hspace*{-0.40cm} 5-4 & \hspace*{-0.32cm} 360169.778(7) & \hspace*{-0.32cm}   &  \hspace*{-0.32cm}     & \hspace*{-0.32cm}          & \hspace*{-0.32cm} 0.25 & \hspace*{-0.32cm} - \\
 N$_2$H$^+$ & \hspace*{-0.40cm} 3-2 & \hspace*{-0.32cm} 279511.858(11) & \hspace*{-0.32cm} 7.3 & \hspace*{-0.32cm} 0.50 & \hspace*{-0.32cm} 2.2($-$10) & \hspace*{-0.32cm} 15 & \hspace*{-0.32cm} 16 \\
            & \hspace*{-0.40cm} 4-3 & \hspace*{-0.32cm} 372672.560(13) & \hspace*{-0.32cm}   & \hspace*{-0.32cm}      & \hspace*{-0.32cm}          & \hspace*{-0.32cm} 3.4 & \hspace*{-0.32cm} 3.6 \\
 N$_2$D$^+$ & \hspace*{-0.40cm} 4-3 & \hspace*{-0.32cm} 308422.322(10) & \hspace*{-0.32cm} 7.3 & \hspace*{-0.32cm} 0.50 & \hspace*{-0.32cm} 2.5($-$11) & \hspace*{-0.32cm} 0.49 & \hspace*{-0.32cm} 0.51 \\
 o-H$_2$D$^+$ & \hspace*{-0.40cm} {\scriptsize 1$_{10}$-1$_{11}$} & \hspace*{-0.32cm} 372421.385(10) & \hspace*{-0.32cm} 8 & \hspace*{-0.32cm} 0.50 & \hspace*{-0.32cm} 4.3($-$11) & \hspace*{-0.32cm} 0.19 & \hspace*{-0.32cm} - \\
 \hline
 \end{tabular}
 \begin{list}{}{}
  \item[$^{(1)}$] from the CDMS catalog as of Feb. 2006 
    \citep[see][]{Mueller05}. The uncertainties in parenthesis are 
    given in units of the last digit.
  \item[$^{(2)}$] $X$($p$) means $X \times 10^{p}$.
 \end{list}
\end{table}