\begin{table}%t1
%\centering
\par
\caption{The integrated flux density of OA~184 at four radio
frequencies. All values are calculated for this paper from original data. 
Fluxes of small diameter sources and the synchrotron ridge that the object 
sits atop (Leahy \& Tian 2005) were removed prior to the integration of the 
continuum brightness temperature. The 151~MHz flux density is an upper limit (see text).
\label{radioflux}}
\small
\begin{tabular}{cc}
\hline\hline
$\nu $ &
$S$\\
(MHz)&
(Jy)\\
\hline
151&
$13.7\pm 3.0$\\
408&
$9.9\pm 1.3$\\
1420&
$8.2\pm 1.0$\\
2695&
$7.7\pm1.0$\\
4800&
$5.7\pm 0.8$\\
\hline
\end{tabular} 
\end{table}