\begin{table}%t3
%\centering
\par
\caption{Parameters of the brigthest CO(2--1) emission lines plotted in
  Fig. \ref{Hmap}. The first and second columns give the region number as used in
  the related plots and the corresponding position offset in arcsec
  relative to the cD coordinates. The 3rd, 4th, 5th, 6th, 7th columns
  list the line parameters of fitted Gaussian profiles. The center of
  the lines is taken by comparison with the cD rest frame
  ($z=0.01756$). In Col.~8, we computed the cold molecular mass for each
  region, as explain in the text. Finally, the last column list the
  H$\alpha$ flux in 10$^{-15}$~erg~s$^{-1}$~cm$^{-2}$ found by Conselice et~al. (2001) in the region identified in the Fig.~\ref{Hmap}.
\label{tab1}}
\begin{tabular}{ccccccccc}
\hline
\hline
\noalign{\smallskip}
Number & Position & Peak & $S/N$ & Area & Center & Width & $M_{\rm gas}$ & $F$(H$\alpha$)\\ & ("$\times$'' ) &  (mK) &   & (K~km~s$^{-1}$) & (km~s$^{-1}$) & (km~s$^{-1}$) & (10$^8$~$M_\odot$) & 10$^{15}$~erg~s$^{-1}$~cm$^{-2}$\\
\hline
1& (--70, --9) &2.4 $\pm$ 0.4 & 5.9 &0.9 $\pm$ 0.2 &--78.0 $\pm$ 58.0 &374.0 $\pm$ 63.4 &1.8 & 7.2 \\
2& (--70, 15) &10.5 $\pm$ 1.3 & 7.5 &4.7 $\pm$ 0.4 &--88.1 $\pm$ 20.1 &422.1 $\pm$ 42.3 &8.7 & \\
3 &(--70, 21) &5.1 $\pm$ 1.0 & 4.7 &0.2 $\pm$ 0.2 &245.6 $\pm$ 21.6 &52.9 $\pm$ 59.7 &0.5 & 6.6\\
4 &(--70, 45) &4.1 $\pm$ 0.4 & 9.1 &0.8 $\pm$ 0.2 &209.2 $\pm$ 21.2 &201.3 $\pm$ 39.1 &1.6 & \\
5 &(--70, 51) &8.1 $\pm$ 1.8 & 4.4 &0.8 $\pm$ 0.3 &--367.0 $\pm$ 18.1 &94.5 $\pm$ 45.1 &1.5 & \\
6 &(--63, --58) &7.1 $\pm$ 1.6 & 4.3 &0.4 $\pm$ 0.1 &--357.3 $\pm$ 7.2 &52.9 $\pm$ 132.0 &0.7 & \\
7 &(--63, 57) &6.5 $\pm$ 0.9 & 6.9 &0.4 $\pm$ 0.2 &--335.4 $\pm$ 22.0 &65.6 $\pm$ 40.4 &0.8 & 3.7\\
8 &(--58, 69) &9.5 $\pm$ 0.9 & 10.0 &0.7 $\pm$ 0.2 &402.5 $\pm$ 8.4 &72.3 $\pm$ 20.4 &1.3 & \\
9 &(--52, --70) &6.6 $\pm$ 1.1 & 5.8 &1.4 $\pm$ 0.3 &35.7 $\pm$ 21.5 &201.1 $\pm$ 48.7 &2.6 & \\
10& (--52, 57) &4.1 $\pm$ 0.8 & 5.0 &0.6 $\pm$ 0.2 &87.4 $\pm$ 28.6 &154.6 $\pm$ 55.6 &1.2 & 2.8\\
11& (--52, 63) &5.9 $\pm$ 0.9 & 6.5 &0.3 $\pm$ 0.1 &358.6 $\pm$ 24.0 &52.9 $\pm$ 81.6 &0.6 & \\
12& (--39, --52) &6.1 $\pm$ 0.9 & 6.2 &0.8 $\pm$ 0.3 &347.4 $\pm$ 20.2 &123.9 $\pm$ 38.9 &1.5 & \\
13& (--39, --16) &4.1 $\pm$ 1.0 & 4.0 &1.5 $\pm$ 0.2 &47.9 $\pm$ 23.8 &349.1 $\pm$ 75.2 &2.8 & \\
14& (--39, 9) &7.4 $\pm$ 1.0 & 7.2 &1.9 $\pm$ 0.3 &52.7 $\pm$ 16.4 &248.3 $\pm$ 35.2 &3.6 & \\
15& (--33, --33) &7 $\pm$ 1.6 & 4.3 &0.7 $\pm$ 0.2 &324.0 $\pm$ 11.5 &105.4 $\pm$ 21.8 &1.4 & \\
16& (--33, 9) &10.3 $\pm$ 1.3 & 7.5 &3.7 $\pm$ 0.5 &--20.0 $\pm$ 20.7 &343.9 $\pm$ 74.4 &7.0 & \\
17& (--28, --9) &5.5 $\pm$ 1.0 & 5.4 &2.9 $\pm$ 0.3 &49.1 $\pm$ 30.0 &498.4 $\pm$ 70.5 &5.4 & \\
18& (--28, 3) &11.9 $\pm$ 1.3 & 8.7 &3.5 $\pm$ 0.3 &--33.3 $\pm$ 15.3 &276.9 $\pm$ 32.4 &6.5 & \\
19& (--28, 9) &15.3 $\pm$ 1.4 & 10.7 &3.6 $\pm$ 0.3 &--50.9 $\pm$ 11.0 &225.9 $\pm$ 28.1 &6.8 & \\
20& (--28, 15) &12.8 $\pm$ 0.9 & 13.8 &2.4 $\pm$ 0.2 &--33.8 $\pm$ 7.9 &179.3 $\pm$ 20.4 &4.5 & \\
21& (--28, 21) &9.9 $\pm$ 0.6 & 16.1 &1.9 $\pm$ 0.3 &20.6 $\pm$ 16.8 &183.1 $\pm$ 40.1 &3.5 & 17.8\\
22& (--28, 33) &7.9 $\pm$ 0.9 & 8.8 &1.0 $\pm$ 0.2 &42 $\pm$ 16.0 &126.8 $\pm$ 37.2 &2 & \\
23& (--28, 39) &3.6 $\pm$ 0.8 & 4.3 &1.6 $\pm$ 0.2 &--138.4 $\pm$ 31.3 &421.4 $\pm$ 70.5 &3.0 & 6.9\\
24& (--28, 51) &4.1 $\pm$ 0.8 & 5.0 &0.5 $\pm$ 0.2 &104.1 $\pm$ 18.5 &123.2 $\pm$ 35.8 &1.0 & \\
25& (--28, 63) &3.5 $\pm$ 0.8 & 4.0 &0.6 $\pm$ 0.2 &--103.5 $\pm$ 30.2 &162.6 $\pm$ 44.1 &1.1 & \\
26& (--22, --70) &7.8 $\pm$ 1.5 & 4.9 &1.5 $\pm$ 0.5 &--200.2 $\pm$ 33.7 &188.6 $\pm$ 93.5 &2.94 & 8.4\\
27& (--22, --63) &3.3 $\pm$ 0.4 & 6.9 &0.7 $\pm$ 0.3 &292.4 $\pm$ 45.3 &201.2 $\pm$ 136.5 &1.3 & 21.2\\
28& (--22, --4) &14.5 $\pm$ 3.3 & 4.3 &2.4 $\pm$ 0.4 &--107.3 $\pm$ 12.3 &156.9 $\pm$ 29.9 &4.5 & \\
29& (--22, 3) &19.4$\pm$ 2.9 & 6.6 &5.0 $\pm$ 0.4 &--74.7 $\pm$ 10.0 &245.9 $\pm$ 21 &9.4 & \\
30& (--22, 9) &15.4 $\pm$ 1.6 & 9.1 &3.0 $\pm$ 0.3 &--43.1 $\pm$ 9.2 &186.4 $\pm$ 20.0 &5.6 & \\
31& (--22, 15) &12.4 $\pm$ 1 & 12.3 &2.7 $\pm$ 0.3 &--87.4 $\pm$ 13.6 &210.6 $\pm$ 24.8 &5.2 & \\
32& (--22, 21) &6.3 $\pm$ 0.7 & 8.0 &1.7 $\pm$ 0.3 &--31.8 $\pm$ 22.4 &258.4 $\pm$ 45.7 &3.2 & 17.8\\
33& (--22, 33) &7.1 $\pm$ 1.0 & 6.5 &1.1 $\pm$ 0.3 &154.9 $\pm$ 22.0 &153.5 $\pm$ 52.8 &2.1 & \\
34& (--16, --46) &8.9 $\pm$ 1.4 & 6.0 &1.3 $\pm$ 0.5 &346.3 $\pm$ 24.4 &142.8 $\pm$ 63.7 &2.5 & \\
35& (--16, --22) &7.2 $\pm$ 1.3 & 5.4 &0.9 $\pm$ 0.4 &--56.9 $\pm$ 26.6 &128.1 $\pm$ 76.1 &1.8 & 13.2\\
36& (--16, --16) &6.3 $\pm$ 1.1 & 5.6 &1.5 $\pm$ 0.2 &--51.0 $\pm$ 18.7 &232.3 $\pm$ 35.8 &2.9 & \\
37& (--16, --9) &8.0 $\pm$ 1.6 & 4.7 &1.7 $\pm$ 0.4 &--46.5 $\pm$ 22.5 &200.1 $\pm$ 52.7 &3.1 & \\
38& (--16, --4) &23.9 $\pm$ 1.3 & 17.7 &6.1 $\pm$ 0.4 &--84.3 $\pm$ 7.5 &244.1 $\pm$ 17.8 &11.56& \\
39& (--16, 3) &29.5 $\pm$ 2.1 & 13.7 &7.5 $\pm$ 0.4 &--95.4 $\pm$ 6.2 &241.8 $\pm$ 14.5 &14.1 & \\
40& (--16, 9) &22.6 $\pm$ 1.4 & 15.3 &6.3 $\pm$ 0.5 &--54.0 $\pm$ 10.4 &266.1 $\pm$ 29.2 &11.9 & \\
41& (--16, 15) &13.9 $\pm$ 1.7 & 7.8 &3.5 $\pm$ 0.4 &--32.9 $\pm$ 12.0 &241.2 $\pm$ 30.8 &6.6 & \\
42& (--9, --39) &4.7 $\pm$ 0.7 & 6.2 &1.8 $\pm$ 0.3 &44.0 $\pm$ 37.0 &370.3 $\pm$ 61.2 &3.5 & \\
43& (--10, --16) &10.0 $\pm$ 2.3 & 4.3 &2.9 $\pm$ 0.5 &--43.8 $\pm$ 25.4 &280.3 $\pm$ 53.6 &5.5 & \\
44& (--9, --4) &25.8 $\pm$ 1.4 & 18.2 &7.6 $\pm$ 0.4 &--57.8 $\pm$ 7.6 &280.5 $\pm$ 21.7 &14.3 & \\
45& (--10, 3) &25.1 $\pm$ 1.9 & 13.1 &7.9 $\pm$ 0.5 &--64.0 $\pm$ 9.8 &296.8 $\pm$ 22.3 &14.7 & \\
46& (--10, 9) &19.8 $\pm$ 0.6 & 31.5 &4.4 $\pm$ 0.2 &--75.1 $\pm$ 5.8 &210.2 $\pm$ 13.1 &8.2 & \\
47& (--10, 15) &7.4 $\pm$ 1.2 & 6.0 &1.7 $\pm$ 0.4 &--104.9 $\pm$ 27.1 &224.5 $\pm$ 64.6 &3.3 & \\
48& (--4, --9) &9.1 $\pm$ 1.8 & 4.9 &4.5 $\pm$ 0.4 &--20.0 $\pm$ 21.0 &473.5 $\pm$ 43.5 &8.5 & \\
49& (--4, --4) &31.9 $\pm$ 1.4 & 21.5 &9.7 $\pm$ 0.3 &--20.6 $\pm$ 4.4 &288.5 $\pm$ 11.7 &18.2 & \\
50& (--4, 3) &26.3 $\pm$ 1.4 & 17.6 &6.7 $\pm$ 0.2 &--35.3 $\pm$ 4.2 &240.3 $\pm$ 9.9 &12.5 & \\
51& (--4, 9) &13.7 $\pm$ 1.4 & 9.5 &4.9 $\pm$ 0.3 &--61.4 $\pm$ 10.0 &342.2 $\pm$ 23.2 &9.3 & \\
52& (--4, 15) &8.7 $\pm$ 1.5 & 5.7 &2.4 $\pm$ 0.3 &--68.0 $\pm$ 17.4 &260.8 $\pm$ 48.5 &4.5 & \\
53& (--4, 21) &3.4 $\pm$ 0.8 & 4.0 &0.1 $\pm$ 0.2 &255.3 $\pm$ 20.92 &13.2 $\pm$ 29.8 &0.1 & \\
54& (3, --33) &9.1 $\pm$ 1.4 & 6.2 &0.6 $\pm$ 0.2 &134.2 $\pm$ 10.8 &69.0 $\pm$ 26.9 &1.2 & 7.3\\
55& (3, --4) &26.9 $\pm$ 2.1 & 12.2 &7.6 $\pm$ 0.3 &7.3 $\pm$ 5.7 &268.8 $\pm$ 15.2 &14.3 & \\
56& (3, 3) &13.4 $\pm$ 2.2 & 6 &3.6 $\pm$ 0.4 &--1.1 $\pm$ 14.7 &254.7 $\pm$ 33.8 &6.7 & \\
57& (3, 9) &10.5 $\pm$ 1.8 & 5.5 &4.4 $\pm$ 0.4 &95.0 $\pm$ 17.9 &396.0$\pm$ 39.0 &8.2 & \\
58& (3, 51) &4.8 $\pm$ 0.8 & 5.6 &0.8 $\pm$ 0.2 &78 $\pm$ 18.8 &168.2 $\pm$ 48.1 &1.6 & 7.0\\
59& (3, 69) &10.0 $\pm$ 2.1 & 4.6 &1.3 $\pm$ 0.3 &--40.9 $\pm$ 14.8 &126.9 $\pm$ 29.5 &2.51 & 16.7\\
60& (9, --16) &8.1 $\pm$ 0.7 & 10.8 &2.4 $\pm$ 0.1 &38.0 $\pm$ 8.6 &278.1 $\pm$ 16.4 &4.5 & \\
\hline
61& (9, --4)    &12.4 $\pm$ 1.7 & 7.0 &5.4 $\pm$ 0.3 &--54.0 $\pm$ 16.3 &411.6 $\pm$ 37 &10.1 & \\
62& (9, 3)     &13.1 $\pm$ 2.9 & 4.4 &2.8 $\pm$ 0.5 &--70.8 $\pm$ 21.1 &205.9 $\pm$ 48.2 &5.3 & \\
63& (15, --70 ) &6.4 $\pm$ 1.2 & 5.0 &3.4 $\pm$ 0.4 &170.3 $\pm$ 31.5 &501.9 $\pm$ 66.1 &6.4 & 4.1\\
64& (15, --4  ) &15.9 $\pm$ 1.9 & 7.9 &4.2 $\pm$ 0.5 &--97.8 $\pm$ 14.6 &250.0 $\pm$ 34.2 &7.8 & \\
65& (15, 3)    &19.6 $\pm$ 2.5 & 7.7 &2.2 $\pm$ 0.2 &--65.6 $\pm$ 5.4 &108.5 $\pm$ 11.4 &4.2 & \\
66& (15, 15)   &12.6 $\pm$ 1.3 & 9.3 &0.8 $\pm$ 0.2 &286.4 $\pm$ 16.7 &61 $\pm$ 179.0 &1.5 & \\
67& (15, 21)   &9.6 $\pm$ 1.9 & 4.9 &0.5 $\pm$ 0.2 &328.4 $\pm$ 7.5 &52.9 $\pm$ 761.6 &1 & 10.7\\
68& (15, 57)   &6.1 $\pm$ 1.4 & 4.6 &0.2 $\pm$ 0.3 &--62.2 $\pm$ 19.0 &37.0 $\pm$ 31.4 &0.4 & 8.9\\
69& (21, --9)   &12.8 $\pm$ 2.3 & 5.3 &0.7 $\pm$ 0.2 &331.2 $\pm$ 4.6 &52.9 $\pm$ 179.6 &1.3 & 4.0\\
70& (21, 9)    &18.2 $\pm$ 3.2 & 5.6 &2.8 $\pm$ 0.4 &--75.7 $\pm$ 9.8 &145.8 $\pm$ 28.9 &5.2 & \\
71& (21, 15)   &5.9 $\pm$ 1.4 & 4.1 &3 $\pm$ 0.6 &47.4 $\pm$ 40.8 &473.2 $\pm$ 87.4 &5.6 & \\
72& (21, 21)   &13.0 $\pm$ 2.2 & 5.7 &2.8 $\pm$ 0.5 &--78.6 $\pm$ 14.1 &203.5 $\pm$ 46.9 &5.2 & 10.7\\
73& (21, 45)   &5.5 $\pm$ 1.2 & 4.6 &4.1 $\pm$ 0.8 &80.7 $\pm$ 16.1 &704.6 $\pm$ 135.3 &7.7 & \\
74& (21, 63)   &7.0 $\pm$ 1.4 & 4.7 &1.7 $\pm$ 0.3 &--48 $\pm$ 22.0 &232.5 $\pm$ 37.5 &3.2 & \\
75& (27, --58)  &7.0 $\pm$ 1.1 & 5.9 &1.1 $\pm$ 0.2 &334.5 $\pm$ 17.0 &147.8 $\pm$ 32.1 &2.0 & 14.2\\
76& (27, 3)    &17.9 $\pm$ 1.5 & 11.2 &2.3 $\pm$ 0.3 &--74.3 $\pm$ 7.2 &124.9 $\pm$ 16.4 &4.4 & 4.0\\
77& (27, 9)    &20.7 $\pm$ 2.2 & 9.1 &2.4 $\pm$ 0.4 &--69.1 $\pm$ 7.6 &110.3 $\pm$ 21.7 &4.5 & \\
78& (27, 15)   &20.4 $\pm$ 3.9 & 5.1 &2.6 $\pm$ 0.4 &--94.6 $\pm$ 10.1 &121.6 $\pm$ 24.8 &4.9 & \\
79& (27, 21)   &8.3 $\pm$ 1.1 & 7.0 &2.1 $\pm$ 0.5 &--101.8 $\pm$ 25.2 &243.1 $\pm$ 75.0 &4 & \\
80& (27, 57)   &6.0 $\pm$ 1.2 & 4.8 &1.8 $\pm$ 0.4 &164.3 $\pm$ 29.2 &286.4 $\pm$ 61.9 &3.4 & \\
81& (33, 3)    &12.5 $\pm$ 2.8 & 4.4 &7.7 $\pm$ 0.7 &71.4 $\pm$ 25.0 &583.6 $\pm$ 54.1 &14.4 & 4.0\\
82& (33, 15)   &10.8 $\pm$ 1.6 & 6.7 &1.6 $\pm$ 0.3 &--84.6 $\pm$ 12.9 &143.4 $\pm$ 28.8 &3.0 & 12.2\\
83& (33, 51)   &6.4 $\pm$ 1.4 & 4.5 &2.9 $\pm$ 0.2 &184.8 $\pm$ 11.5 &431.6 $\pm$ 26.8 &5.5 & \\
84& (33, 57)   &10.4 $\pm$ 1.9 & 5.5 &0.5 $\pm$ 0.2 &401.7 $\pm$ 9.6 &52.9 $\pm$ 187.6 &1.0 & \\
85& (39, 9)    &5.9 $\pm$ 0.7 & 8.0 &3.0 $\pm$ 0.5 &44.1 $\pm$ 36.2 &487.9 $\pm$ 81.6 &5.7 & 12.2\\
86& (45, --4)   &7.0 $\pm$ 1.4 & 4.2 &3.7 $\pm$ 1.0 &--121.9 $\pm$ 61.7 &501.4 $\pm$ 201.3 &6.9 & 4.0\\
87& (45, 33)   &7.9 $\pm$ 1.3 & 5.7 &3.8 $\pm$ 0.3 &102.2 $\pm$ 16.8 &453.5 $\pm$ 33.0 &7.1 & \\
88& (45, 39)   &7.3 $\pm$ 1.1 & 6.4 &1.1 $\pm$ 0.3 &285.0 $\pm$ 14.2 &153.1 $\pm$ 47.2 &2.2 & \\
89& (51, --22)  &9.2 $\pm$ 1.3 & 6.5 &1.9 $\pm$ 0.4 &351.0 $\pm$ 22.7 &200.8 $\pm$ 46.6 &3.6 & \\
90& (51, 9)    &8.9 $\pm$ 1.2 & 6.8 &2.3 $\pm$ 0.3 &--49.5 $\pm$ 14.9 &245.1 $\pm$ 38.6 &4.3 & \\
91& (51, 51)   &4.3 $\pm$ 0.5 & 7.4 &0.6 $\pm$ 0.2 &229.8 $\pm$ 17.1 &143.4 $\pm$ 31.8 &1.2 & \\
92& (57, --63)  &4.7 $\pm$ 0.6 & 7.3 &1.6 $\pm$ 0.5 &--13.9 $\pm$ 64.7 &334 $\pm$ 128.5 &3.1 & \\
93& (57, --16)  &5.6 $\pm$ 0.8 & 6.1 &0.8 $\pm$ 0.3 &376.0 $\pm$ 23.7 &144.9 $\pm$ 44.7 &1.5 & \\
94& (57, 9)    &5.6 $\pm$ 1.2 & 4.4 &0.6 $\pm$ 0.2 &--202.0 $\pm$ 19.4 &106.1 $\pm$ 39.5 &1.1 & \\
95& (63, --58)  &9.2 $\pm$ 1.2 & 7.6 &0.5 $\pm$ 0.1 &389.1 $\pm$ 5.2 &52.9 $\pm$ 583.8 &0.9 & \\
96& (63, --16)  &9.4 $\pm$ 1.7 & 5.4 &0.9 $\pm$ 0.2 &267.0 $\pm$ 10.4 &94.0 $\pm$ 18.5 &1.7 & \\
97& (63, --4)   &13.3 $\pm$ 1.3 & 10.0 &0.8 $\pm$ 0.2 &128.7 $\pm$ 8.2 &61.9 $\pm$ 55.4 &1.6 & \\
98& (63, 51)   &7.5 $\pm$ 1.2 & 5.9 &1.6 $\pm$ 0.3 &302.6 $\pm$ 20.8 &200.7 $\pm$ 38.8 &3.0 & \\
99& (63, 57)   &2.2 $\pm$ 0.4 & 5.0 &1.4 $\pm$ 0.2 &--8.9 $\pm$ 37.4 &586.6 $\pm$ 83.1 &2.6 & \\
100 &(69, --39) &7.0 $\pm$ 1.3 & 5.2 &3.4 $\pm$ 0.5 &83.3 $\pm$ 29.4 &461.1 $\pm$ 73.4 &6.4 & 10.5\\
101 &(69, --4)  &8.9 $\pm$ 1.3 & 6.3 &0.7 $\pm$ 0.3 &116.2 $\pm$ 15.3 &83.1 $\pm$ 41.0 &1.4 & \\
102 &(--33, 99) &8.6 $\pm$ 1.1 & 7.1 &6.3 $\pm$ 0.9 &17.8 $\pm$ 46.9 &693.9 $\pm$ 99.6 &11.8 & \\
103 &(--33, 129 &6.3 $\pm$ 1.4 & 4.2 &1.4 $\pm$ 0.5 &--286.1 $\pm$ 38.2 &220.0 $\pm$ 79.4 &2.75 & 3.7\\
104 &(--21, 123 &7.9 $\pm$ 1.3 & 5.8 &1 $\pm$   0.2 &--58.7 $\pm$ 14.0 &119.8 $\pm$ 35.2 &1.8 & \\
105 &(--15, 75) &10.5 $\pm$ 0.9 & 10.7 &0.9 $\pm$0.3 &298.6 $\pm$ 15.4 &88.4 $\pm$ 25.3 &1.8 & \\
106 &(--15, 81) &9.8 $\pm$ 1.9 & 4.9 &1.3 $\pm$ 0.3 &89.2 $\pm$ 16.4 &128.1 $\pm$ 37.5 &2.4 & \\
107 &(--10, 81) &6.1 $\pm$ 0.3 & 15.9 &3.2 $\pm$ 0.5 &--7.4 $\pm$ 45.1 &502.9 $\pm$ 93.3 &6.1 & \\
108 &(--10, 99) &8.3 $\pm$ 0.6 & 12.6 &1.1 $\pm$ 0.23 &336.7 $\pm$ 14.2 &127.9 $\pm$ 29.1 &2.1 & \\
109 &(--3, 105) &5.6 $\pm$ 1.0 & 5.6 &3.2 $\pm$ 0.5 &3.0 $\pm$ 43.1 &534.4 $\pm$ 100.4 &6.02 & \\
110 &(3, 111)  &5.9 $\pm$ 1.4 & 4.2 &1.7 $\pm$ 0.4 &293.2 $\pm$ 28.2 &280.6 $\pm$ 55.6 &3.3 & \\
111 &(20, 75)  &7.5$\pm$ 1.6 & 4.6 &0.8 $\pm$ 0.3 &295.0 $\pm$ 26.6 &108.2 $\pm$ 59.7 &1.6 & \\
112 &(20, 81)  &8.7 $\pm$ 1.2 & 7.0 &0.5 $\pm$ 0.4 &106.6 $\pm$ 33.1 &61.7 $\pm$ 97.8 &1.0 & \\
113 &(26, 75)  &7.61 $\pm$ 1.3 & 5.8 &2.0 $\pm$ 0.4 &--73.7 $\pm$ 23.5 &249.6 $\pm$ 42.8 &3.7 & \\
114 &(26, 87)  &6.1$\pm$ 1.4 & 4.3 &0.3 $\pm$ 0.1 &353.2 $\pm$ 19.0 &52.9 $\pm$ 130.1 &0.6 & \\
115 &(33, 129) &12.7 $\pm$ 2.8& 4.4 &1.7 $\pm$ 0.4 &--306.6 $\pm$ 14.9 &130.7 $\pm$ 30.0 &3.3 & \\
\hline 
\end{tabular} 
\end{table}