\begin{table}%T9
\caption{\label{tab9}List of miscellaneous~stars.}
\small%\centerline
{
\begin{tabular}{lccrcl}
\hline\hline
MACHO ID&$\nu_{0}$&$\nu_{MI}$& {\it SNR} &Source&Comments \\
\hline
10.3916.849  & 3.1389921 & 1.2070180 & 6.61 & SAM~&                           \\  
11.8745.899  & 3.3176002 & 4.7867033 & 6.79 & SAM~& $\nu_{0}/\nu_{\rm MI}=0.6931$ \\
13.5719.713  & 3.0220610 & 3.9155071 & 6.96 & SAM~& $\nu_{0}/\nu_{\rm MI}=0.7718$ \\
18.2717.787  & 2.8643249 & 4.9297051 & 6.55 & SAM~& $\nu_{0}/\nu_{\rm MI}=0.5810$ \\
18.3202.956  & 2.2855398 & 5.1908177 & 6.96 & r   &                           \\
19.3575.541  & 3.3698536 & 0.5856270 & 7.91 & SAM~&                           \\
3.7451.484   & 3.3048194 & 2.7630866 & 7.85 & b   & $\nu_{\rm MI}/\nu_{0}=0.8361$ \\
80.6348.2470 & 2.9571188 & 1.2069597 & 6.65 & SAM~&                           \\
80.7558.650  & 2.7828759 & 0.8240633 & 6.99 & r   &                           \\
81.8519.1395 & 2.9463890 & 0.8372214 & 6.96 & r   &                           \\
9.5004.750   & 3.2877325 & 0.1604569 & 7.42 & SAM~&                           \\
9.5122.363   & 3.1033541 & 4.1679579 & 6.82 & SAM~& $\nu_{0}/\nu_{\rm MI}=0.7446$ \\
9.5241.382   & 3.1777911 & 1.3826455 & 6.79 & SAM~&                           \\
\hline
\end{tabular}}
\smallskip
 {Note:} 
$\nu_{0}$ denotes the frequency (in [d$^{-1}$]) of the main pulsation 
component; $\nu_{\rm MI}$ stands for the frequency of the miscellaneous 
component with the SNR given in the next column. Period ratios, suggesting 
some forms of double-mode pulsations, are given in the comment lines. 
\end{table}