\begin{table}%t1
%\centering
\par
  \caption{Collection of those {\sf WR123} models with periods around
           $0.5~$days. The first five columns show the values of the
           initial hydrostatic models. Note that~$\Teff$ and~$\Rp$
           refer to model structures devoid of a wind. Starting with
           the sixth column, results of the non-linear computations
           are given such as the period~$P$ in days, the relative
           changes of the photospheric radius $\Rp$, the velocity
           difference at the photosphere in km~s$^{-1}$; the last column
           lists the bolometric amplitudes in magnitudes as achieved
           in the limit cycles.
  \label{t.mod}}
   \begin{tabular}{lccccccccl}
   \hline\hline
   Name & $M$      & $L$          & $\Teff$ & $\Rp$    & $P$   & $\Del\Rp/\Rp$ & $\Del u$&$\Dl{bol}$ \\
        & $[\Msol]$& $[10^5\Lsol]$& [K]     & $[\Rsol]$ & [days]&           & [km~s$^{-1}$]     & [mag] \\
   \hline
  %{\sf WR123A} & 22    & 3.16    & 38~000 & 12.97   & 0.517 & 0.23 &  375 & 0.49 \\
   {\sf WR123B} & 22    & 3.16    & 39~000 & 12.31   & 0.482 & 0.29 &  386 & 0.51 \\
  % {\sf WR123C} & 20    & 3.16    & 38~000 & 13.97   & 0.768 & 0.65 &  669 & 1.64 \\
   {\sf WR123D} & 23    & 3.16    & 38~000 & 12.97   & 0.499 & 0.22 &  385 & 0.50 \\
  % {\sf WR123E} & 23    & 3.16    & 36~000 & 14.45   & 0.594 & 0.22 &  364 & 0.46 \\
   {\sf WR123F} & 23    & 3.16    & 40~000 & 11.70   & 0.423 & 0.22 &  408 & 0.54 \\
   {\sf WR123G} & 22    & 3.16    & 40~000 & 11.70   & 0.446 & 0.23 &  403 & 0.54 \\
   {\sf WR123H} & 25    & 3.16    & 38~000 & 12.97   & 0.427 & 0.19 &  425 & 0.72 \\
  % {\sf WR123I} & 25    & 3.16    & 28~000 & 23.88   & 1.295 & 0.24 &  340 & 0.47 \\
  % {\sf WR123J} & 25    & 3.00    & 28~000 & 23.26   & 1.183 & 0.22 &  329 & 0.52 \\
  %{\sf WR123K} & 22    & 1.60    & 28~000 & 16.99   &  &  &   &  \\
   {\sf WR123L} & 27    & 3.16    & 38~000 & 12.97   & 0.344 & 0.02 & $\phantom{0}$58  & 0.10 \\
   {\sf WR123M} & 26    & 3.16    & 38~000 & 12.97   & 0.391 & 0.07 & 158  & 0.27 \\
   {\sf WR123N} & 25    & 3.00    & 38~000 & 12.63   & 0.377 & 0.10 & 288  & 0.46 \\
   {\sf WR123P} & 23    & 3.00    & 38~000 & 12.63   & 0.457 & 0.21 & 406  & 0.61 \\   
  % {\sf WR123Q} & 27    & 4.00    & 38~000 & 14.48   & 0.766 & 0.43 & 551  & 1.17 \\ 
  % {\sf WR123R} & 25    & 3.16    & 33~000 & 17.19   & 0.719 & 0.22 & 377  & 0.56 \\
  % {\sf WR123S} & 25    & 3.16    & 31~000 & 19.48   & 0.901 & 0.22 & 358  & 0.51 \\
   {\sf WR123U} & 25    & 2.82    & 33~900 & 15.38   & 0.493 & 0.10 & 261  & 0.39 \\
\hline
   \end{tabular}
\end{table}