\begin{table}%t1
\caption{Emission line fluxes and X-ray properties of type-II AGNs.}\label{lines}
\small%\centerline
{
{{
\begin{tabular}{lccccccccccccc}
\hline \hline
Object &
$z$ &
$\log{ L_{2-10}} $ &
$N_{\rm H}$ &
$\Gamma_{2-10}$ &
\Lya$^a$& 
\civ\ &
\heii\ &
\CIIIb\ &
\MgII\ &
\oii\ &
\neiii\ &
\hb\ &
\oiii\ \\
\hline
CDF-S-10 & 0.424 & 42.66 &    1.5 & 1.17 &           &      &           &      &    &  43.0 &       &           &               \\
CDF-S-18 & 0.979 & 44.05 &    1.9 & 1.74 &           &      &           &      &    &  82.1 &       &           &               \\
CDF-S-20 & 1.016 & 43.27 &    5.6 & 1.78 &           &      &           &      &    &  21.4 &       &           &               \\
CDF-S-27 & 3.064 & 44.33 &   28.1 & 1.22 &  12       &  6.2 &           &      &    &       &       &           &               \\
CDF-S-41 & 0.667 & 43.16 &    5.6 & 1.45 &           &      &           &      &    &  122  &  46.4 &           &  425          \\
CDF-S-43 & 0.737 & 42.87 &    1.7 & 1.43 &           &      &           &      &    &  9.18 &       &           &               \\
CDF-S-45 & 2.291 & 44.04 &    8.2 & 1.46 &  12.5     &      &           &      &    &       &       &           &               \\
CDF-S-47 & 0.733 & 43.02 &    8.0 & 1.80 &           &      &           &      &    &  22.7 &       &           &               \\
CDF-S-51 & 1.097 & 44.01 &   22.4 & 1.72 &           &      &           &      &    &  36.7 &       &           &               \\
CDF-S-54 & 2.561 & 43.94 &   10.7 & 1.38 &  24.9     &  5.19&           &      &    &       &       &           &               \\
CDF-S-56 & 0.605 & 43.31 &    1.6 & 1.25 &           &      &           &      &    &  347  &       &  190      &  841          \\
CDF-S-57 & 2.562 & 44.20 &   19.3 & 1.69 &  109       & 16.6&  5.66     &  12.2&    &       &       &           &               \\
CDF-S-66 & 0.574 & 43.20 &    6.6 & 1.46 &           &      &           &      &    &  34.6 &       &           &               \\
CDF-S-75 & 0.737 & 43.43 &    3.7 & 1.21 &            &      &          &      &    &       &       &           &  35.5         \\
CDF-S-76 & 2.394 & 44.39 &   15.4 & 1.66 &  11.66     &      &          &      &    &       &       &           &               \\
CDF-S-85 & 2.593 & 43.74 &    8.7 & 1.80 &  22.3      &      &          &      &    &       &       &           &               \\
CDF-S-112 & 2.940 & 44.06 &   29.0 & 1.80 &  50.8     & 12.1 &  6.38    &      &    &       &       &           &               \\
CDF-S-117 & 2.573 & 43.77 &    3.1 & 1.80 &  27.6     &      &           &     &    &       &       &           &               \\
CDF-S-132 & 0.908 & 42.60 &    2.4 & 1.80 &           &      &           &     &    &  6.97 &       &           &               \\
CDF-S-151 & 0.604 & 43.07 &   23.2 & 1.80 &           &      &           &     &    &  14.2 &       &           &               \\
CDF-S-155 & 0.545 & 42.27 &    3.6 & 1.80 &           &      &           &     &    &  66.1 &       &  45.2     &  333          \\
CDF-S-176 & 0.786 & 42.95 &    2.2 & 1.80 &           &      &           &     &    &  16.4 &       &           &               \\
CDF-S-188 & 0.734 & 42.15 &    4.4 & 1.80 &           &      &           &     &    &  8.44 &       &           &               \\
CDF-S-189 & 0.755 & 42.60 &    7.5 & 1.80 &           &      &           &     &    &  5.44 &       &           &               \\
CDF-S-190 & 0.733 & 43.01 &   12.5 & 1.80 &           &      &           &     &    &  125  &       &           &  176          \\
CDF-S-201 & 0.679 & 42.59 &    2.6 & 1.80 &           &      &           &     &    &  25.7 &  8.63 &           &  114          \\
CDF-S-204 & 1.223 & 42.43 &    7.5 & 1.80 &           &      &           &     &    &  18.4 &       &           &               \\
CDF-S-252 & 1.172 & 43.21 &   15.8 & 1.80 &           &      &           &     &    &  29.6 &       &           &               \\
CDF-S-260 & 1.043 & 43.01 &   36.7 & 1.80 &           &      &           &     &    &  21.4 &       &           &               \\
CDF-S-264 & 1.316 & 43.23 &   21.6 & 1.80 &           &      &           &     &    &  16.8 &       &           &               \\
CDF-S-266 & 0.735 & 43.33 &   88.8 & 1.80 &           &      &           &     &    &  38.5 &       &           &  97.6        \\
CDF-S-267 & 0.720 & 43.17 &   14.2 & 1.80 &           &      &           &     &5.97&       &       &           &               \\
CDF-S-268 & 1.222 & 44.10 &   80.4 & 1.80 &           &      &           & 13.1&    &       &       &           &               \\
CDF-S-516 & 0.667 & 42.14 &    2.8 & 1.80 &           &      &           &     &    &  39.0 &       &           &               \\
CDF-S-519 & 1.034 & 42.41 &    1.1 & 1.80 &           &      &           &     &    &  17.7 &       &           &                \\
CDF-S-534 & 0.676 & 42.27 &    6.6 & 1.80 &           &      &           &     &    &  16.0 &       &           &                \\
CDF-S-535 & 0.575 & 42.19 &    2.9 & 1.80 &           &      &           &     &    &  50.0 &       &           &                \\
CDF-S-547 & 2.316 & 44.03 &   56.9 & 1.80 &  17.9 &          &           &     &    &       &       &           &                \\
CDF-S-580 & 0.664 & 42.09 &   10.5 & 1.80 &           &      &           &     &    &       &       &           &  43.7          \\
CDF-S-585 & 1.212 & 42.56 &    1.5 & 1.80 &           &      &           &     &    &  13.8 &       &           &                 \\
CDF-S-606 & 1.037 & 42.94 &   18.8 & 1.80 &           &      &           &     &    &  9.39 &       &           &                 \\
CDF-S-611 & 0.979 & 43.20 &   62.3 & 1.80 &           &      &           &     &    &  11.2 &       &           &                 \\
CDF-S-612 & 0.736 & 43.08 &   63.3 & 1.80 &           &      &           &     &    &  23.7 &       &           &                \\
CDF-S-615 & 0.759 & 42.17 &    7.4 & 1.80 &           &      &           &     &    &  11.7 &       &           &                 \\
CDF-S-633 & 1.374 & 43.72 &   86.7 & 1.80 &           &      &           & 31.3&18.0&       &       &           &               \\
H05370043 & 1.797 & 44.77 &   10.5 & 1.90 &           &  119 &           &     &    &       &       &           &                  \\
H05370164 & 1.824 & 44.48 &0.0$^b$ & 1.90 &           &  16.6 &          &     &    &       &       &           &                 \\
H05370016 & 0.995 & 44.35 &    1.3 & 1.90 &           &       &          &     &    &  91.8 &       &           &                 \\
H05370123 & 1.153 & 44.72 &    6.6 & 1.90 &           &       &          & 51.6&    &  90.5 &       &           &                 \\
H15800062 & 1.568 & 44.80 &   26.3 & 1.90 &           &  51.6 &          & 26.8&    &       &       &           &                 \\
H15800019 & 1.957 & 44.84 &    7.3 & 1.90 &           &  451 &           &     &    &       &       &           &                 \\
H50900013 & 1.261 & 44.55 &    2.5 & 1.90 &           &       &          & 31.5&    &  70.1 &       &           &                 \\
\hline
\end{tabular}}}}
\medskip
$^a$ All line intensities are in units of $10^{-18}~{\rm erg}~{\rm s}^{-1}~{\rm cm}^{-2}$.\\
$\Gamma=1.80$ or $\Gamma=1.90$ means a~guess of the 2--10~keV slope.\\
Column density in units of $10^{22}~{\rm cm}^{-2}$. \\
X-ray luminosities are corrected for intrinsic absorption.\\
$^b$ X-ray spectral parameters not available, classification based on optical spectrum.
\end{table}