\begin{table}%TA.2
\caption{\label{tab-list1}Main characteristics of the 32 YSO candidates
detected at 7 and 15\mic: $J$ and $K$ DENIS magnitudes, ISO--DENIS 
association quality flag $q_{\rm ID}$
and separation; magnitudes, uncertainties and quality flags at 7 and
15\mic, 7$-$15\mic\ association quality flag $q_{\rm II}$ and separation;
aperture magnitude at 15\mic; MSX: this column contains a "+'' if
the source is associated (within 8$''$) with an MSX source with
$F_{E}/F_{D}>2$, and a "X'' if there is an association,
but with $F_{E}/F_{D}<2$.}
%\centerline
\small
\begin{tabular}{lllllllllllllll}
\hline
\hline
ISOGAL name     &   $J$   &   $K$   & $q_{\rm ID}$ & sep. & [7] & $\sigma_7$ & $q_7$ &
[15] & $\sigma_{15}$ & $q_{15}$ & $q_{\rm II}$ & sep. & $ap_{15}$ & MSX \\
ISOGAL-PJ       & mag   &  mag  & $\leq$5 & $''$ & mag & mag & $\leq$4 &
mag  & mag & $\leq$4 & $\leq$4 & $''$ & mag & \\
\hline
\input{2891cat1.tex}
\hline
\end{tabular}
\par
\medskip
{Note}: $^{(\dagger)}$ These two 7\mic\ sources correspond to a
single source at 15\mic.
\end{table}