\begin{table}%t5
\caption{Photometric membership results.}\label{Photometric}
\small%\centerline
{
\begin{tabular}{rcccllll}
\hline \hline
Star  &  $CE$  &  $\sigma_{\rm CE}$  &  $LC$  &  $MKK$  &   \multicolumn{2}{c}{Criteria}    & Mem  \\
      &     (mag)       &   (mag)        & (Pred) & (DDO)  &  (A)  &   (B)   &             \\
\hline
NGC~6192 &&&&&&& \\
4   &  0.28  &    0.04  &  II-III  &  K1~III    &  NM &  M &  NM    \\
9   &  0.60  &    0.06  &  II-III  &  G8~III    &  M  &  M &  M    \\
28  &  0.55  &    0.04  &  II      &  K3/4~III  &  NM &  PM&  NM   \\
45  &  0.63  &    0.05  &  II-III  &  G5~II     &  M  &  M &  M    \\
91  &  0.62  &    0.04  &  II-III  &  G5/8~II   &  M  &  M &  M    \\
96  &  0.63\rlap{$^a$} & --     &  II-III  &  G2~III   &  -- &  M &  M    \\
137 &  0.67  &  0.03    &  II-III  &  G8/K0~III &  M  &  M &  M    \\
253 &  0.27  &  0.04    &  II-III  &  G5/8III-IV &  NM & PM &  NM   \\
255 &  0.70  &  0.04    &  II-III  &  K0IV-V     &  PM & NM &  NM   \\
265 &  0.41  &  0.02    &  II-III  &  K2~IV     &  NM & NM &  NM   \\
274 &  0.56  &  0.04    &  II-III  &  K1~III    &  NM & M  &  NM   \\
NGC~6208  &&&&&&& \\
19   &  0.31  &  0.05  &  III      &  K0/1~III-IV  &  PM &   M   &  M   \\
27   &  0.40  &  0.02  &  III      &  G5~III       &  NM &   M   &  NM  \\
31   &  0.29  &  0.04  &  III      &  G5/8~III     &  PM &   M   &  M   \\
48   &  0.33  &  0.06  &  III      &  K0/1~III     &  PM &   M   &  M   \\
133  &  0.24  &  0.03  &  III      &  K1/2~III     &  M  &   M   &  M   \\
NGC~6268 &&&&&&& \\
13   &  0.36  &  0.04  &  III      &  G9~IV-V      &  M  &  NM  &  NM   \\
22   &  0.53  &  0.03  &  III      &  G8/9~III-IV  &  NM &   PM  &  NM   \\
44   &  0.41  &  0.03  &  III      &  G8~II-III    &  M  &   M   &  M    \\
48   &  0.22  &  0.03  &  III      &  K0/1~IV      &  NM &   PM  &  NM   \\
73   &  0.46  &  0.03  &  III      &  K0~II-III    &  NM &   M   &  NM   \\
76   &  0.46  &  0.04  &  III      &  G8~III       &  PM &   M   &  M    \\
\hline
\end{tabular}}
\medskip
$^a$ Outside the range of \citet{j77} calibration.
\end{table}