\begin{table}%T4
    %\centering
\small
    \caption{\twCO(\Jtwo) fluxes in Jy\kms{} integrated over the main
    structures in our map. Estimated accuracy is  20\% for the largest fluxes.}
    \begin{tabular}{lccc}
      \hline\hline
      Source & Red & Blue & Red+Blue\\
      \hline
      \RWAur{A} & $+$1.7 & $+$1.5 & $+$3.2 \\
      \RWAur{B} & $+$0.05 & $+$0.55 & $+$0.59 \\
      Arm       & $+$2.1 & $+$1.6 & $+$3.7 \\
      Total     & $+$4.2 & $+$3.3 & $+$7.5 \\
      \hline
    \end{tabular}
    \label{tab:source-fluxes}
  \end{table}