\begin{table}%t2
\caption{\label{Table:Minima}Photoelectric minima observed at the Leopold-Figl-Observatory with $\rm O{-}C$ residuals (in days) computed from the linear ephemeris (1).}
\small%\centering
\par
 \begin{tabular}{lclrcc} 
  \hline \hline 
HJD - 2~445~000    & &    $E$  & $\rm (O{-}C)$  &  PB  & REM  \\ 
  \hline 
359.43879 & -- &  87.0 & --0.00028 & $V$ & 2 \\ 
388.41285 & -- &   3.0 & +0.00136 & $V$ & 3 \\ 
389.27388 & -- &   0.5 & +0.00012 & $V$ & 2 \\ 
389.44551 &   &   0.0 & --0.00071 & $V$ & 2 \\ 
390.30880 & + &   2.5 & +0.00031 & $V$ & 1 \\ 
390.47963 & + &   3.0 & --0.00132 & $V$ & 3 \\ 
391.34410 & + &   5.5 & +0.00088 & $V$ & 1 \\ 
407.38116 & + &  52.0 & --0.00036 & $V$ & 1 \\ 
652.43890 & + & 762.5 & --0.00096 & $V$ & 1 \\ 
653.47520 & + & 765.5 & +0.00061 & $V$ & 1 \\ 
657.44166 & + & 777.0 & +0.00061 & $V$ & 1 \\ 
662.44219 & + & 791.5 & --0.00005 & $B$ & 1 \\ 
662.61447 & + & 792.0 & --0.00022 & $B$ & 1 \\ 
  \hline 
 \end{tabular} 
\end{table}