\begin{table}%t2
\caption{Abundances for each ion for all five targets.
\label{tab:4abu}} 
%\centerline
 {
\begin{tabular}{l|cr|cr|cr|cr|cr}
\hline\hline
 & Feige 66 & & \pg\ & & \cd\ & & Feige 48 & & \cpd
  & \\
Ion  &  $\log\epsilon$ & $n$ & $\log\epsilon$ & $n$ & $\log\epsilon$ & $n$ &
$\log\epsilon$ & $n$ & $\log\epsilon$ & $n$ \\
\hline
C~\textsc{iii} &  6.93~$\pm$~0.28\rlap{$^*$} &   4 & & & & & 7.22~$\pm$~0.10 & 3 &
  7.54~$\pm$~0.22 & 2 \\
C~\textsc{iv}\rlap{$^*$} & 6.5~$\pm$~0.5 & 2 & $<$3.1 & & $<$2.7 & &
6.9~$\pm$~0.5 & & &  \\
N~\textsc{ii} & & & & & & & & & 7.87~$\pm$~0.14 & 3 \\
N~\textsc{iii} &  7.69~$\pm$~0.23 &   2 & 7.64~$\pm$~0.42 &  4 & 7.60~$\pm$~0.47 &
 6 & 7.62~$\pm$~0.38 & 3 & 7.40~$\pm$~0.00 & 2 \\
N~\textsc{iv} & 7.65~$\pm$~0.00 & 1 & & & & & & \\
N~\textsc{v}   & 7.60~$\pm$~0.11 & 2 & 7.58~$\pm$~0.21 &  2 & 8.26~$\pm$~0.15 & 2
 & & \\
Al~\textsc{iii} & $<$3.5 & & $<$3.8 & & $<$3.6 & & 5.51~$\pm$~0.10 & 3 \\
Si~\textsc{iii} & & & & & & & 6.43~$\pm$~0.31 & 8 & 6.38~$\pm$~0.37 & 3 \\
Si~\textsc{iv}\rlap{$^*$}  & $<$2.0 & & 3.63~$\pm$~0.17 &  2 & $<$2.0 & & 6.16~$\pm$~0.25 &
 3 \\
P~\textsc{iii} & & & & & & & 4.41~$\pm$~0.00 & 1 & 4.81~$\pm$~0.09 & 3 \\
P~\textsc{iv} & 3.95~$\pm$~0.00 & 1 & & & & & & \\
S~\textsc{iii} & 7.69~$\pm$~0.46 & 4 & 7.00~$\pm$~0.11 &  3 &
5.7~$\pm$~0.00 & 1 & & & 6.29~$\pm$~0.27 & 3 \\
Ar~\textsc{iii} &  7.86~$\pm$~0.24 &   4 &  7.02~$\pm$~0.00 &  1 & $<$7.0
& & $<$7.0 & & & \\
Ca~\textsc{iii} &  8.09~$\pm$~0.20 &  20 &  7.73~$\pm$~0.23 & 10 & 7.50~$\pm$~0.22
& 8 & 7.31~$\pm$~0.00 & 1 & 6.97~$\pm$~0.00 & 1 \\
Sc~\textsc{iii} & 5.17~$\pm$~0.51 & 2 & $<$5.0 & & 4.61~$\pm$~0.00 & 1 & $<$3.0 & & & \\
Ti~\textsc{iii} &  6.98~$\pm$~0.22 &   10   &    6.51~$\pm$~0.20 &  2 &
5.77~$\pm$~0.06 & 3 & 5.16~$\pm$~0.20 & 4 & 5.68~$\pm$~0.37 & 6 \\
Ti~\textsc{iv}  &  6.91~$\pm$~0.18 &   5   &    6.73~$\pm$~0.00 &  1 &
5.87~$\pm$~0.15 & 3 & 5.21~$\pm$~0.18 & 2 & 5.75~$\pm$~0.07 & 2 \\
V~\textsc{iii} &  6.42~$\pm$~0.22 &  11   &    5.80~$\pm$~0.00 &  1  & &
& & & 4.48~$\pm$~0.15 & 4 \\
V~\textsc{iv}  &  6.29~$\pm$~0.14 &   7   &    6.37~$\pm$~0.34 &  2 &
5.77~$\pm$~0.37 & 9 & & & & \\
Cr~\textsc{iii} &  7.29~$\pm$~0.19 &  65   &    7.23~$\pm$~0.17 & 44 &
6.96~$\pm$~0.23 & 44 & 5.90~$\pm$~0.18 & 29 & 6.20~$\pm$~0.30 & 33 \\
Cr~\textsc{iv}  &  7.31~$\pm$~0.23 &  25	&   7.46~$\pm$~0.14  & 17 &
7.24~$\pm$~0.47 & 28 & 6.41~$\pm$~0.28 & 7 & 6.54~$\pm$~0.20 & 10 \\
Mn~\textsc{iii} &  6.02~$\pm$~0.19 &  12	&   7.25~$\pm$~0.22 & 46  &
6.89~$\pm$~0.36  & 19 & 5.62~$\pm$~0.21 & 13 & 5.54~$\pm$~0.21 & 15 \\
Mn~\textsc{iv}  &  5.99~$\pm$~0.51 &   2	&   7.72~$\pm$~0.11 &  3  &
7.12~$\pm$~0.54  & 7 & & & 5.86~$\pm$~0.18 & 2 \\
Fe~\textsc{iii} &  6.46~$\pm$~0.17 &  26	&   7.16~$\pm$~0.22 & 69  &
6.66~$\pm$~0.26  & 23 & 7.68~$\pm$~0.19 & 107 & 7.38~$\pm$~0.33 & 20 \\
Fe~\textsc{iv}  &  6.40~$\pm$~0.10 &  2	&   7.43~$\pm$~0.22 & 23  &
7.03~$\pm$~0.25  & 23 & 7.73~$\pm$~0.21 & 10 & 7.52~$\pm$~0.23 & 11 \\
Fe~\textsc{v}   & & & 7.38~$\pm$~0.41 &  2  & &  & & & & \\
Co~\textsc{iii} &  6.46~$\pm$~0.33 &  39 &  6.73~$\pm$~0.20 & 20  &
6.13~$\pm$~0.39  & 20 & 5.73~$\pm$~0.25 & 5 & & \\
Co~\textsc{iv}  &  6.32~$\pm$~0.22 &   20 &  6.72~$\pm$~0.13 & 7  &
6.28~$\pm$~0.21  & 11 & 6.05~$\pm$~0.25 & 3 & & \\
Ni~\textsc{iii} &  6.86~$\pm$~0.15 &  32 &  7.39~$\pm$~0.18 & 32  &
6.20~$\pm$~0.48  & 12 & 6.63~$\pm$~0.22 & 28 & 6.39~$\pm$~0.25 & 6 \\
Ni~\textsc{iv}  & 6.81~$\pm$~0.25 & 32 &  7.41~$\pm$~0.27 & 19  & 6.28~$\pm$~0.28 &
14 & 6.75~$\pm$~0.21 & 7 & 6.50~$\pm$~0.26 & 9 \\
Ni~\textsc{v}   & 6.91~$\pm$~0.55 & 10 &  7.60~$\pm$~0.14 & 5  & & & & & & \\
Cu~\textsc{iii} & 6.27~$\pm$~0.38 & 8 & 6.36~$\pm$~0.36 & 5 & & &5.25~$\pm$~0.40 &
3 & & \\
Zn~\textsc{iii} &  6.64~$\pm$~0.35 &   15 &  6.68~$\pm$~0.36 &  5  &
5.97~$\pm$~0.50 & 2 & 5.30~$\pm$~0.22 & 6 & 5.33~$\pm$~0.34 & 6 \\
Ga~\textsc{iii} & 5.53~$\pm$~0.06 & 2 & 5.75~$\pm$~0.04 & 2 & 5.23~$\pm$~0.21 & 2 &
4.70~$\pm$~0.00 & 1 & 3.63~$\pm$~0.00 & 1 \\
Ge~\textsc{iv}  & 5.21~$\pm$~0.05 & 2 & 4.99~$\pm$~0.03 & 2 & 4.98~$\pm$~0.01 & 2 &
4.02~$\pm$~0.08 & 2 & 3.57~$\pm$~0.10 & 2 \\
Sn~\textsc{iv}  & 4.12~$\pm$~0.00 & 1 & 4.08~$\pm$~0.00 & 1 & 3.11~$\pm$~0.00 & 1 &
2.94~$\pm$~0.00 & 1 & 2.86~$\pm$~0.00 & 1 \\
Pb~\textsc{iv}  & 4.7~$\pm$~0.00 & 1 & 4.6~$\pm$~0.00 & 1 & 4.3~$\pm$~0.00 & 1 &
3.8~$\pm$~0.00 & 1 & 3.43~$\pm$~0.00 & 1 \\
\hline
\end{tabular}}
\smallskip
$^*$ Based on non-LTE-affected resonance lines; see Sect.~\ref{sub:nlte}.
\end{table}