\begin{table}%t1
%\setlength{\tabcolsep}{3pt}
\caption{Observations of six sdB stars using \emph{HST/STIS}. Note that
  \cpd\ was observed only in the FUV and using the E140H grating.
\label{tab:obs}}
%\centerline
{\begin{tabular}{lcccccccccc}
\hline\hline
\noalign{\smallskip}
Target & $\alpha$ & $\delta$ & $V$ & $T_{{\rm eff}}$ & $\log g$ & log(He/H)
& Ref. & Pulsator? & $T_{\rm exp}^{\rm NUV}$ & $T_{\rm exp}^{\rm FUV}$ \\
       & (2000)   & (2000)   & (mag) & (K) & & & & & (s) & (s) \\
\hline
\pg & 12 21 29.1 & +53 04 37 & 13.2 & 33~500 & 5.87 & $-$1.6
& 4 & yes & 3100/3100 & 2160/3100 \\
Feige~48     & 11 47 14.5 & +61 15 32 & 13.5 & 29~500 & 5.54 & $-$2.9
& 2 & yes & 3500/3511 & 3600/3600 \\
\cpd & 05 47 59.3 & -64 23 03 & 11.3 & 27~500 & 5.60 & $-$2.5 & 3 & no & --- &
1440 \\
Feige~66     & 12 37 23.5 & +25 03 60 & 10.6 & 34~500 & 5.83 & $-$1.6 & 4
& no & 824 & 875 \\
\cd       & 01 43 48.6 & $-$24 05 10 & 11.0 & 35~400  & 5.90 & $-$2.9 & 4
& no & 800 & 878 \\
\hline
\end{tabular}}
\par
\smallskip
References: (1) \citet{HRW99}; (2) \citet{HRW00}; (3) \citet{OJF05}; (4) this
work.
\end{table}