\begin{table}%t5
\caption{Fitted values of the parameters of best SIE~+ $\gamma$~model after introducing an~$m=4$~multipole ($\varepsilon_4, \theta_4$). The lens position is fitted. Same notations as in Table~\ref{tab:lensmod1}.}
\label{tab:multipole}
%\centering
\small
\begin{tabular}{ccccccccccccc}
\hline\hline
\noalign{\smallskip}
$\theta_{\rm E}('')$ & $\varepsilon$ & $\theta_\varepsilon$(PA) & $\gamma$ & $\theta_\gamma$(PA) & $\varepsilon_4('')$ & $\theta_4$(PA) & $\Delta_\alpha('')$ & $\Delta_\delta ('')$&$\chi_{\rm a}^2$/$\rm d.o.f._a$ & $\chi_{\rm e}^2$/$\rm d.o.f._e$ &d.o.f.$_{\rm a}$ & d.o.f.$_{\rm e}$\\
\noalign{\smallskip}
\hline
1.848 & 0.177 & --60.78 & 0.124 & --85.01 & --0.03 & 11.05 & $<$0.001 & $<$0.001 & 21.9 & 38.9 & 1 & 670 \\
\hline
\end{tabular}
\end{table}