\begin{table}%t3
\caption{Best values of the S\'ersic and de~Vaucouleurs (dVc) profiles fitted to the lensing galaxy (see Sect.~\ref{sec:fit4} for details). Quoted errors are the 1$\sigma$~dispersion of the results on the NExp~individual frames. The number of~d.o.f. is about~3120 for~$F555W$ and $F814W$~frames, and about~1100 for F160~frames.}
\label{tab:lensphot}
%\centering
\small
\begin{tabular}{cccccccc}
\hline \hline
\noalign{\smallskip}
Filter & Model  & $\mu_{\rm e}(z)$ (mag/arcsec$^2$) & $q_{\rm s}$ & $\varphi$(PA) & $R_{\rm e}$ (kpc $h^{-1}_{50}$) & $n$ & $\chi^2$/d.o.f. \\
\noalign{\smallskip}
\hline
$F555W$  & S\'ersic  & $21.84\pm0.38$ & $0.96\pm0.01$ & $-22^\circ\pm20$  & $4.69\pm0.77$ & $2.19\pm 0.22$ & 2.53 \\
       & dVc  & $23.35\pm0.21$ & $0.96\pm0.02$ & $-60^\circ\pm32$  & $10.48\pm0.88$ & $4$ & 2.76 \\
$F814W$ &S\'ersic  & $20.36\pm0.17$ & $0.94\pm0.01$ & $-56^\circ.1\pm2.6$ & $5.05\pm0.37$ & $2.67\pm 0.12$ & 3.62 \\
      & dVc & $21.49\pm0.05$ & $0.93\pm0.01$ & $-64^\circ.2\pm1.9$ & $9.33\pm0.18$ & $4$ & 3.98 \\
$F160W$ & S\'ersic  & $18.09\pm0.22$ & $0.92\pm0.01$ & $-62^\circ.2\pm4.1$& $4.16\pm0.41$ & $2.71\pm 0.16$ & 18.8 \\
      & dVc  & $19.28\pm0.14$ & $0.91\pm0.01$ & $-65^\circ.3\pm3.8$& $8.33\pm0.51$ & $4$ & 19.9 \\
\hline
\end{tabular}
\end{table}