\begin{table}%T8
\small
\caption{Frequencies detected close to $f_0$. Only peaks with 
${\it S/N}\geq4.0$ are listed. }\label{t8} 
%\centerline
{\small
\begin{tabular}{clll}  \hline\hline
Year  &   $\sim$25.25 & $\sim$25.65 & $\sim$25.92 \\
~     &   ~(cd$^{-1}$)	& ~(cd$^{-1}$) & ~(cd$^{-1}$) \\ \hline
1995  &     25.2213     &  ~            & ~         \\
1996  &     25.2735     &  25.6441      & 25.9377   \\
1999  &     25.2469     &  25.6653      & 25.9122   \\
2000  &     25.239      &  ~            & ~         \\
2001  &     ~           &  24.633(*)    & ~         \\
2003  &     ~           &  ~            & 23.904(*) \\
~     &       ~         &  ~            & ~         \\
$\Delta V$(mmag) & $\sim$8 to 34 & $\sim$5 to 12 & $\sim$5 to 21 \\
\hline
\end{tabular}}
\medskip
(*)~Possible alias (see Notes a), 
b) in Table~\ref{t7}).
\end{table}