\begin{table}%t1
 \caption{Comparison of the estimates of the projected rotational velocities
 found using goodness-of-fit (GOF) and Fourier transform~(FT) techniques. For
 both cases, the ranges of the estimates and their medians are listed. Also 
 tabulated are the maximum possible values of~\vsini\ taken directly from
 Ryans et~al. together with the number~(n) of lines considered in the current
 comparison.}
\label{comp_vsini}
%\centering
\par
 \begin{tabular}{@{}lrccrcl}
\hline \hline
Star		& \multicolumn{3}{c}{Goodness-of-fit}
                & \multicolumn{2}{c}{Fourier Transform} & $n$
\\
		& Range & Median & Max. & Range & Median  \\
\hline
\par
HD~2905 	& 1--22  & 20 & $\leq$60 & 51--59 & 52 & 4 \\
HD~13854 	& 11--15 & 13 & $\leq$40 & 31--34 & 32 & 3 \\
HD~21291 	& 5--8   & 7  & $\leq$20 & 16--18 & 17 & 2 \\
HD~24398 	& 4--19  & 9  & $\leq$40 & 34--39 & 36 & 4 \\
HD~34085 	& 4--15  & 10 & $\leq$30 & 20--26 & 25 & 6 \\
HD~38771 	& 5--21  & 9  & $\leq$50 & 46--55 & 50 & 4 \\
HD~41117 	& 3--24  & 14 & $\leq$40 & 40--42 & 41 & 2 \\
HD~193183 	& 2--47  & 20 & $\leq$50 & 40--50 & 45 & 11\\
HD~204172	& 3--71  & 57 & $\leq$60 & 57--70 & 62 & 8 \\
HD~206165 	& 3--41  & 11 & $\leq$40 & 25--41 & 35 & 7 \\
HD~208501 	& 9--11  & 11 & $\leq$30 & 25--30 & 28 & 4 \\
\hline
\end{tabular}
\end{table}