\begin{table}%T5
%\centering
\par
\caption{8.6~$\mu$m flux densities:
flux densities are given in mJy.
{\it FWHM} is given in acrseconds.
The flux densities are dereddened using $A_{8.6} = 1.75$.
The calibration is described in the text.
\label{VISIRfluxes}}
\begin{tabular}{ccccc} \hline\hline
MIR&  date   &    time  &    flux  & seeing   \\
ID &         &          &   density  &{\it FWHM}   \\
   &         &          &   (mJy)    &(pixel)   \\
 \hline
001& 2004-05-08& 09:07:47&   25.2&    0.27   \\
002& 2004-05-08& 09:09:52&   23.2&    0.27   \\
003& 2004-05-08& 09:10:27&   24.2&    0.27   \\
004& 2004-05-08& 09:12:35&   23.3&    0.25   \\
005& 2004-05-08& 09:13:10&   24.8&    0.25   \\
006& 2004-05-08& 09:21:12&   21.6&    0.27   \\
007& 2004-05-08& 09:23:15&   24.5&    0.28   \\
008& 2004-05-08& 09:23:51&   24.2&    0.23   \\
009& 2004-05-08& 09:25:56&   24.5&    0.25   \\
010& 2004-05-08& 09:46:54&   25.6&    0.24   \\
011& 2004-05-08& 09:51:53&   31.4&    0.28   \\
012& 2004-05-08& 09:53:57&   32.0&    0.29   \\
013& 2004-05-08& 09:54:34&   20.6&    0.27   \\
014& 2004-05-08& 09:56:40&   32.3&    0.30   \\
015& 2004-05-08& 09:57:15&   27.3&    0.27   \\
016& 2004-05-09& 08:16:59&   30.8&    0.33   \\
017& 2004-05-09& 08:19:08&   47.4&    0.43   \\
018& 2004-05-09& 08:19:46&   46.4&    0.37   \\
019& 2004-05-09& 08:21:52&   56.9&    0.38   \\
020& 2004-05-09& 08:22:26&   56.7&    0.38   \\
021& 2004-05-10& 05:59:04&   23.7&    0.38   \\\hline
\end{tabular}
\end{table}