\begin{table}%T2
%\centering
\par
\caption{Identification, intensity and radial velocity of the line components measured in the 1995, 1999 and 2001$-$2002 AURELIE spectra of HD 45677. For each line, the successive rows give the narrow and broad emissions, and the central absorption, when present. The successive columns give for each line component the rest wavelength, the atomic specie and multiplet number, the flux in 10$^{-13}$~erg~cm$^{-2}$~s$^{-1}$, {\it FWHM} in~\AA, and heliocentric radial velocity in km~s$^{-1}$ units (for each year) in the three observation epochs. For the absorption components intensities are given as negative fluxes.}
\begin{tabular}{llrrrrrrrrrr}
\hline\hline
IDENT&&&F95&W95&V95&F99&W99&V99&F01&W01&V01\\
\hline
\par
4068.62&S II&1F&9.86&0.8&29&10.38&0.8&18& & & \\
\par
4076.22&S II&1F&1.71&0.7&42&1.51&0.6&31& & & \\
\par
4101.737&H $\delta$& &--24.&1.6&--53&--14.0&1.6&--44& & & \\
\par
4101.737&H $\delta$& &--84.&17.&24&--90.8&17.&23& & & \\
\par
4101.737&H $\delta$& &35.&3.1&24&33.4&3.0&23& & & \\
\par
4101.737&H $\delta$& &--12.&1.0&29&--13.0&1.0&29& & & \\
\par
4114.48&Fe II&23F&0.85&0.6&31&0.89&0.6&20& & & \\
\par
4114.48&Fe II&23F&0.40&1.6&31&0.97&1.3&20& & & \\
\par
4120.991&He I&16&--3.41&1.6&17&--3.51&1.7&12& & & \\
\par
4128.054&Si II&3&--2.43&1.4&8&--2.28&1.0&26& & & \\
\par
4128.748&Fe II&27&0.18&0.9&23&0.18&0.9&24& & & \\
\par
4128.748&Fe II&27&0.15&2.5&23&0.19&2.5&24& & & \\
\par
4128.748&Fe II&27&--0.04&0.7&26&--0.04&0.7&28& & & \\
\par
4130.894&Si II&3&--2.31&1.4&12&--2.38&1.0&25& & & \\
\par
4143.761&He I&53&--10.5&3.3&25&--10.6&3.6&23& & & \\
\par
4173.461&Fe II&27&1.78&0.9&27&2.45&0.9&40& & & \\
\par
4173.461&Fe II&27&1.28&2.5&27&2.48&2.5&40& & & \\
\par
4173.461&Fe II&27&--0.83&0.7&29&--1.20&0.5&45& & & \\
\par
4177.21&Fe II&21F&1.32&0.7&27&1.54&0.7&26& & & \\
\par
4177.21&Fe II&21F&0.36&1.6&27&0.80&1.5&26& & & \\
\par
4178.862&Fe II&28&2.50&0.9&26&3.12&0.9&18& & & \\
\par
4178.862&Fe II&28&2.35&2.5&26&2.48&2.5&18& & & \\
\par
4178.862&Fe II&28&--0.25&0.5&29&--0.12&0.5&21& & & \\
\par
4179.421&Cr II&26&0.31&0.9&27&0.27&0.9&26& & & \\
\par
4179.421&Cr II&26&0.10&2.5&27&0.62&2.5&26& & & \\
\par
4179.421&Cr II&26&--0.12&0.5&30&--0.11&0.5&30& & & \\
\par
4201.74&Ni II&3F&0.94&0.6&--14&1.14&0.8&--1& & & \\
\par
4205.473&Fe II&22&0.25&0.6&22&0.27&0.6&23& & & \\
\par
4211.099&Fe II&23F&0.35&0.6&23&0.45&0.6&12& & & \\
\par
4231.56&Fe II&21F&0.17&0.7&28&0.36&0.7&26& & & \\
\par
4233.172&Fe II&27&5.11&0.9&28&4.15&0.9&25& & & \\
\par
4233.172&Fe II&27&6.19&2.5&28&9.66&2.5&25& & & \\
\par
4233.172&Fe II&27&--1.07&0.6&32&--0.83&0.6&32& & & \\
\par
4242.364&Cr II&31& & & &0.60&0.7&18& & & \\
\par
4242.364&Cr II&31& & & &0.80&2.7&18& & & \\
\par
4242.364&Cr II&31& & & &--0.59&0.4&20& & & \\
\par
4243.98&Fe II&21F&5.45&0.7&25&6.39&0.7&22& & & \\
\par
4243.98&Fe II&21F&2.56&1.6&23&1.80&1.4&22& & & \\
\par
4244.81&Fe II&21F&1.48&0.7&27&1.37&0.7&24& & & \\
\par
4244.81&Fe II&21F&0.50&1.6&27&1.15&1.4&24& & & \\
\par
4267.259&C II& &--2.21&1.5&28&--2.66&1.8&24& & & \\
\par
4276.83&Fe II&21F&4.28&0.7&25&4.78&0.8&22& & & \\
\par
4276.83&Fe II&21F&1.29&1.6&25&1.25&1.4&22& & & \\
\par
4287.4&Fe II&7F&10.28&0.7&24&10.46&0.7&21& & & \\
\par
4287.4&Fe II&7F&3.37&1.6&24&4.01&1.4&22& & & \\
\par
4296.572&Fe II&28&1.48&0.9&31&1.61&0.9&24& & & \\
\par
4296.572&Fe II&28&0.56&2.5&31&1.36&2.5&24& & & \\
\par
4296.572&Fe II&28&--0.63&0.7&32&--0.72&0.5&25& & & \\
\par
4303.176&Fe II&27&1.16&0.9&30&1.35&0.9&23& & & \\
\par
4303.176&Fe II&27&0.95&2.5&30&1.49&2.5&23& & & \\
\par
4303.176&Fe II&27&--0.39&0.6&32&--0.62&0.6&28& & & \\
\par
4305.9&Fe II&21F&1.35&0.7&24&1.77&0.7&20& & & \\
\par
4305.9&Fe II&21F&0.48&1.6&24&0.35&1.4&20& & & \\
4314.31&Fe II&32&0.31&0.8&35&0.85&0.9&41& & & \\
\par
4319.62&Fe II&21F&3.06&0.7&24&3.25&0.7&22& & & \\
\par
4319.62&Fe II&21F&0.85&1.6&25&0.87&1.4&22& & & \\
4326.85&Ni II&3F&1.34&0.8&--17&1.40&0.7&--18& & & \\
\par
4340.468&H $\gamma$& &--33.2&1.6&--54&--23.6&1.6&--43& & & \\
\par
4340.468&H $\gamma$& &--58.9&17.0&24&--57.2&17.0&24& & & \\
\par
4340.468&H $\gamma$& &84.6&3.1&24&73.7&3.0&24& & & \\
\par
4340.468&H $\gamma$& &--22.6&1.0&29&--22.6&1.0&28& & & \\
\par
4346.85&Fe II&21F&1.19&0.7&26&1.32&0.7&23& & & \\
\par
4346.85&Fe II&21F&0.40&1.6&26&0.42&1.5&23& & & \\
\par
4351.769&Fe II&27&3.04&0.9&23&2.43&0.9&23& & & \\
\par
4351.769&Fe II&27&2.23&2.5&23&3.53&2.5&23& & & \\
\par
4351.769&Fe II&27&--0.94&0.7&26&--0.85&0.6&29& & & \\
\par
4352.78&Fe II&21F&2.01&0.7&21&2.19&0.7&22& & & \\
\par
4352.78&Fe II&21F&0.95&1.6&21&0.69&1.4&22& & & \\
\par
4358.37&Fe II&21F&3.42&0.7&23&3.08&0.7&17& & & \\
\par
4358.37&Fe II&21F&1.19&1.6&23&1.58&1.4&17& & & \\
\par
4359.34&Fe II&7F&7.64&0.7&23&7.14&0.7&21& & & \\
\par
4359.34&Fe II&7F&1.35&1.6&23&3.24&1.4&21& & & \\
\par
4372.43&Fe II&21F&1.48&0.7&21&1.40&0.7&21& & & \\
\par
4372.43&Fe II&21F&0.43&1.6&21&0.69&1.4&21& & & \\
\par
4375.71&CuII&1F&0.66&0.8&19&0.92&0.8&23& & & \\
\par
4382.75&Fe II&6F&0.76&0.7&23&0.50&0.7&23& & & \\
\par
4382.75&Fe II&6F&0.24&1.6&23&0.26&1.6&23& & & \\
\par
4384.319&Fe II&32&0.58&0.9&23&0.94&0.9&18& & & \\
\par
4384.319&Fe II&32&0.99&2.5&23&1.61&2.5&18& & & \\
\par
4385.387&Fe II&27&0.89&0.9&26&1.11&0.9&29& & & \\
\par
4385.387&Fe II&27&0.87&2.5&26&1.24&2.5&29& & & \\
\par
4385.387&Fe II&27&--0.30&0.6&29&--0.78&0.6&36& & & \\
\par
4387.929&He I&51&--6.73&2.4&28&--6.17&2.0&27& & & \\
\par
4413.601&Fe II&32&0.22&0.9&26&0.36&0.9&26&0.41&0.7&26\\
\par
4413.601&Fe II&32&0.27&2.7&26&0.13&2.7&26&0.26&2.7&26\\
\par
4413.601&Fe II&32&--0.27&0.6&28&--0.15&0.6&27&--0.66&0.5&27\\
\par
4413.78&Fe II&7F&5.95&0.8&22&5.26&0.7&24&5.33&0.5&20\\
\par
4413.78&Fe II&7F&2.22&1.6&22&2.60&1.5&24&1.09&1.6&20\\
\par
4416.27&Fe II&6F&5.42&0.8&24&5.43&0.8&23&4.50&0.5&20\\
\par
4416.27&Fe II&6F&1.59&1.6&24&1.74&1.6&23&1.87&1.6&20\\
\par
4416.83&Fe II&27&1.07&0.9&24&2.35&0.9&22&1.50&0.7&25\\
\par
4416.83&Fe II&27&1.86&2.5&24&1.24&2.5&22&0.56&2.6&25\\
\par
4416.83&Fe II&27&--0.88&0.6&26&--1.61&0.6&25&--1.30&0.5&26\\
\par
4432.45&Fe II&6F&0.59&0.7&23&0.59&0.8&22&0.49&0.5&22\\
\par
4432.45&Fe II&6F&0.28&1.6&23&0.20&1.6&22&0.23&1.6&22\\
\par
4437.551&He I&50&--0.93&1.3&28&--0.77&1.3&26& & & \\
\par
4452.11&Fe II&7F&3.25&0.7&21&3.86&0.7&22&3.02&0.5&20\\
\par
4452.11&Fe II&7F&1.35&1.6&23&1.38&1.4&22&0.78&1.6&20\\
\par
4457.95&Fe II&6F&2.91&0.7&22&2.82&0.6&24&2.63&0.5&20\\
\par
4457.95&Fe II&6F&0.56&1.6&23&1.39&1.4&24&0.62&1.6&20\\
\par
4471.473&He I&14&--10.3&2.6&27&--8.81&2.3&33& & & \\
\par
4474.91&Fe II&7F&1.65&0.7&20&1.67&0.6&23&1.52&0.5&21\\
\par
4474.91&Fe II&7F&0.41&1.6&22&0.29&1.5&23&0.55&1.6&21\\
\par
4481.126&Mg II&4&--12.0&2.3&16&11.49&4.1&28&--11.1&2.0&40\\
\par
4481.126&Mg II&4&16.26&3.5&15&--8.34&1.9&25&16.49&4.2&40\\
\par
4488.75&Fe II&6F&1.25&0.6&18&1.16&0.4&23&1.21&0.5&19\\
\par
4488.75&Fe II&6F&0.32&1.6&22&0.49&1.6&23&0.31&1.6&19\\
\par
4489.183&Fe II&37&0.89&0.9&25&0.91&0.9&24&0.70&0.7&25\\
\par
4489.183&Fe II&37&0.50&2.5&25&1.14&2.5&24&0.53&2.7&25\\
\par
4489.183&Fe II&37&--0.14&0.6&29&--0.14&0.8&27&--0.24&0.4&28\\
4491.405&Fe II&37&2.17&0.9&22&1.82&0.8&22&1.84&0.7&16\\
\par
4491.405&Fe II&37&1.05&2.5&22&0.84&2.6&22&1.84&2.7&16\\
\par
4491.405&Fe II&37&--1.02&0.8&26&--0.41&0.3&25&--1.07&0.5&19\\
\par
4492.64&Fe II&6F&0.79&0.7&19&0.91&0.5&23&0.49&0.4&23\\
\par
4492.64&Fe II&6F&0.12&1.6&19&0.30&1.4&23&0.33&1.6&23\\
\par
4508.288&Fe II&38&1.67&0.9&24&1.52&0.8&21&1.84&0.7&15\\
\par
4508.288&Fe II&38&2.23&2.5&24&2.63&2.6&21&2.76&2.7&15\\
\par
4508.288&Fe II&38&--0.79&0.8&29&--0.67&0.3&24&--1.58&0.5&19\\
\par
4509.61&Fe II&6F&0.42&0.7&19&0.45&0.5&19&0.20&0.4&19\\
\par
4509.61&Fe II&6F&0.16&1.6&19&0.31&1.4&19&0.21&1.6&19\\
\par
4514.9&Fe II&6F&0.82&0.7&21&0.87&0.4&22&0.76&0.4&20\\
\par
4514.9&Fe II&6F&0.16&1.6&21&0.28&1.4&22&0.98&1.6&20\\
\par
4515.339&Fe II&37&1.90&0.9&21&1.92&0.6&23&1.61&0.7&26\\
\par
4515.339&Fe II&37&2.27&2.7&21&2.50&2.6&23&2.24&2.7&26\\
\par
4515.339&Fe II&37&--0.48&0.6&24&--0.76&0.3&25&--0.87&0.5&27\\
\par
4520.224&Fe II&37&2.56&0.9&20&1.61&0.7&21&1.72&0.7&14\\
\par
4520.224&Fe II&37&2.06&2.7&20&2.58&2.7&21&1.75&2.7&14\\
\par
4520.224&Fe II&37&--1.05&0.8&24&--0.30&0.4&24&--0.61&0.5&18\\
\par
4522.634&Fe II&38&3.12&0.9&22&2.28&0.7&24&3.12&0.8&13\\
\par
4522.634&Fe II&38&2.41&2.7&22&3.41&2.7&24&2.24&2.7&13\\
\par
4522.634&Fe II&38&--1.64&0.8&24&--1.27&0.4&26&--2.40&0.6&18\\
\par
4528.39&Fe II&6F&0.41&0.7&14&0.48&0.5&21&0.27&0.5&21\\
\par
4528.39&Fe II&6F&0.08&1.6&14&0.08&1.6&21&0.09&1.6&21\\
\par
4533.0&Fe II&6F&0.09&0.7&21&0.12&0.5&21&0.10&0.4&24\\
\par
4533.0&Fe II&6F&0.14&1.6&21&0.16&1.6&21&0.12&1.6&25\\
\par
4534.168&Fe II&37&0.45&0.9&23&0.43&0.7&23&0.34&0.7&23\\
\par
4534.168&Fe II&37&0.74&2.7&23&0.96&2.7&23&0.21&2.7&23\\
\par
4534.168&Fe II&37&--0.09&0.6&25&--0.25&0.5&25&--0.19&0.5&23\\
\par
4541.524&Fe II&38&0.55&1.0&24&0.58&0.6&24&0.68&0.7&22\\
\par
4541.524&Fe II&38&0.53&2.7&24&0.84&2.5&24&0.53&2.7&22\\
\par
4541.524&Fe II&38&--0.24&0.7&31&--0.33&0.3&25&--0.49&0.5&26\\
\par
4548.208&Mn II& &0.08&0.9&3&0.27&0.9&23&0.31&0.9&23\\
\par
4549.474&Fe II&38&4.91&0.9&20&3.11&0.8&19&4.80&1.0&19\\
\par
4549.474&Fe II&38&2.81&2.7&20&4.37&2.7&19&2.11&2.7&19\\
\par
4549.474&Fe II&38&--2.64&0.7&23&--1.19&0.4&22&--4.05&0.7&27\\
\par
4549.617&Ti II&82&0.67&0.9&21&0.35&0.7&24&1.36&0.7&24\\
\par
4549.617&Ti II&82&0.80&2.7&21&0.55&2.7&24&0.51&2.7&24\\
\par
4554.988&Cr II&44&0.33&1.0&21&0.45&0.7&21&0.70&0.8&19\\
\par
4554.988&Cr II&44&0.51&2.7&21&0.68&2.7&21&0.40&2.7&19\\
\par
4554.988&Cr II&44&--0.39&0.7&23&--0.47&0.4&23&--0.48&0.4&21\\
\par
4555.893&Fe II&37&3.32&1.0&20&3.12&0.7&24&3.04&0.8&22\\
\par
4555.893&Fe II&37&1.67&2.7&20&3.28&2.7&24&2.24&2.7&22\\
\par
4555.893&Fe II&37&--0.62&0.7&24&--1.04&0.4&25&--1.14&0.5&25\\
\par
4558.65&Cr II&44&0.85&0.9&18&2.51&0.6&20&2.73&0.8&12\\
\par
4558.65&Cr II&44&0.95&2.5&18&3.73&3.5&20&1.05&2.7&12\\
\par
4558.65&Cr II&44&--0.78&0.6&20&--2.64&0.4&23&--2.90&0.6&20\\
\par
4571.096&Mg I&1&1.55&1.3&32&1.74&1.0&29&1.16&1.0&27\\
\par
4571.096&Mg I&1&--0.27&0.7&44&--0.34&0.3&35&--0.01&0.2&28\\
\par
4576.34&Fe II&38&1.06&1.0&20&0.95&0.7&22&1.02&1.0&23\\
\par
4576.34&Fe II&38&0.43&2.7&20&0.97&2.7&22&0.25&2.7&23\\
\par
4576.34&Fe II&38&--0.10&0.7&24&--0.24&0.4&24&--0.08&0.4&28\\
\par
4581.395&Ca I& &--0.67&0.7&31&--0.44&0.3&--7&--0.14&0.5&--6\\
\par
4581.395&Ca I& &1.78&1.5&26&1.04&0.6&--5&0.66&0.9&--5\\
\par
4582.835&Fe II&37&0.69&1.0&20&0.78&0.7&23&1.03&0.8&22\\
\par
4582.835&Fe II&37&0.13&2.7&20&0.41&2.7&23&1.33&2.7&22\\
\par
4582.835&Fe II&37&--0.62&0.8&22&--0.34&0.4&26&--0.35&0.6&25\\
4583.409&Ti II&39&0.74&1.0&21&0.57&0.7&20&0.96&0.8&22\\
\par
4583.837&Fe II&38&4.71&1.0&20&4.68&0.7&23&5.28&0.8&22\\
\par
4583.837&Fe II&38&5.83&2.7&20&6.83&2.7&23&5.26&2.7&22\\
\par
4583.837&Fe II&38&--0.79&0.8&24&--1.25&0.3&25&--2.95&0.6&23\\
\par
4588.199&Cr II&44&0.86&1.1&19&1.51&0.6&24&1.71&0.8&18\\
\par
4588.199&Cr II&44&0.71&2.6&19&2.93&3.5&24&1.45&2.7&18\\
\par
4588.199&Cr II&44&--0.52&0.6&21&--1.66&0.4&26&--1.93&0.5&22\\
\par
4616.629&Cr II&44&0.29&1.0&25&0.43&0.7&23& & & \\
\par
4616.629&Cr II&44&0.26&2.7&25&0.82&2.7&23& & & \\
\par
4616.629&Cr II&44&--0.27&0.7&29&--0.32&0.4&26& & & \\
\par
4618.803&Cr II&44&0.47&1.0&17&1.39&0.6&28& & & \\
\par
4618.803&Cr II&44&0.83&2.7&17&1.83&2.7&28& & & \\
\par
4618.803&Cr II&44&--0.47&0.7&22&--1.59&0.5&31& & & \\
\par
4620.521&Fe II&38&0.38&1.0&18&0.46&0.6&27& & & \\
\par
4620.521&Fe II&38&0.52&2.7&18&0.37&2.7&27& & & \\
\par
4620.521&Fe II&38&--0.29&0.7&27&--0.20&0.4&32& & & \\
\par
4628.77&Ni II&3F&0.38&0.7&--27&0.47&0.4&--16& & & \\
\par
4629.279&Ti II&38&1.12&1.0&21&0.88&0.7&29& & & \\
\par
4629.339&Fe II&37&3.55&1.0&20&3.38&0.7&32& & & \\
\par
4629.339&Fe II&37&1.53&2.7&20&3.13&2.7&32& & & \\
\par
4629.339&Fe II&37&--0.55&0.9&24&--0.91&0.3&34& & & \\
\par
4634.07&Cr II&44&0.74&1.0&27&0.81&1.0&27& & & \\
\par
4634.07&Cr II&44&0.34&2.7&23&0.82&2.7&27& & & \\
\par
4634.07&Cr II&44&--0.69&0.8&25&--0.55&0.4&34& & & \\
\par
4639.68&Fe II&4F&1.38&0.7&16&1.37&0.4&30& & & \\
\par
4639.68&Fe II&4F&0.40&1.6&16&0.62&1.6&30& & & \\
\par
4664.45&Fe II&4F&0.40&0.7&16&0.54&0.7&16& & & \\
\par
4664.45&Fe II&4F&0.31&1.6&16&0.24&1.6&16& & & \\
\par
4666.758&Fe II&37&0.69&1.0&18&0.99&1.0&17& & & \\
\par
4666.758&Fe II&37&0.27&2.7&18&0.67&2.7&17& & & \\
\par
4666.758&Fe II&37&--0.11&0.8&20&--0.18&0.8&20& & & \\
\par
4713.139&He I&12&--2.19&1.9&30&--2.14&1.6&41& & & \\
\par
4728.07&Fe II&4F&2.82&0.7&21&2.65&0.8&22& & & \\
\par
4728.07&Fe II&4F&0.32&1.6&22&1.19&1.6&22& & & \\
\par
4731.453&Fe II&43&0.22&0.9&21& & & & & & \\
\par
4731.453&Fe II&43&0.28&1.8&24& & & & & & \\
\par
4772.07&Fe II&4F&0.16&0.7&20& & & & & & \\
\par
4774.74&Fe II&20F&1.10&0.7&19&1.55&0.7&18& & & \\
\par
4774.74&Fe II&20F&0.36&1.6&19&0.56&1.6&18& & & \\
\par
4798.28&Fe II&4F&0.36&0.7&18&0.71&0.8&29& & & \\
\par
4798.28&Fe II&4F&0.16&1.6&18&0.28&1.6&29& & & \\
\par
4814.55&Fe II&20F&3.54&0.7&20&4.04&0.8&19& & & \\
\par
4814.55&Fe II&20F&1.32&1.6&20&1.98&1.6&20& & & \\
\par
4824.127&Cr II&30&0.76&1.0&24&1.56&0.9&19& & & \\
\par
4824.127&Cr II&30&0.97&2.8&24&2.48&2.5&19& & & \\
\par
4824.127&Cr II&30&--0.45&0.6&29&--1.53&0.8&23& & & \\
\par
4848.235&Cr II&30&0.69&1.0&30&1.04&1.0&14& & & \\
\par
4848.235&Cr II&30&0.42&2.8&30&1.01&2.5&14& & & \\
\par
4848.235&Cr II&30&--0.40&0.7&31&--0.85&0.6&18& & & \\
\par
4861.332&H $\beta$& &--49.5&1.6&--51&--50.1&1.8&--45& & & \\
\par
4861.332&H $\beta$& &--16.0&17.0&23&--8.4&17.&24& & & \\
\par
4861.332&H $\beta$& &237.&3.1&23&224&3.2&24& & & \\
\par
4861.332&H $\beta$& &--78.&1.3&25&--75&1.4&28& & & \\
\hline
4874.49&Fe II&20F&1.23&0.7&20&1.68&0.7&23& & & \\
\par
4874.49&Fe II&20F&0.66&1.6&20&0.24&1.6&23& & & \\
\par
4889.63&Fe II&4F&3.30&0.7&17&3.46&0.8&21& & & \\
\par
4889.63&Fe II&4F&0.48&1.6&18&0.71&1.6&21& & & \\
\par
4898.607&Fe II&97F&0.95&0.7&16&1.25&0.8&26& & & \\
\par
4905.35&Fe II&20F&1.76&0.7&17&2.67&0.8&23& & & \\
\par
4905.35&Fe II&20F&0.79&1.6&17&0.88&1.6&24& & & \\
\par
4921.931&He I&48&--6.39&3.9&32&--2.07&2.5&23& & & \\
\par
4923.927&Fe II&42&10.45&1.0&25&5.55&1.0&30& & & \\
\par
4923.927&Fe II&42&8.30&2.9&25&10.01&2.5&30& & & \\
\par
4923.927&Fe II&42&--3.66&0.8&28&--2.25&0.7&37& & & \\
\par
4947.38&Fe II&20F&0.83&1.2&21&0.74&0.7&23& & & \\
\par
4950.74&Fe II&20F&1.33&0.8&20&1.21&0.7&24& & & \\
\par
4973.39&Fe II&20F&1.41&0.8&20&1.25&0.8&19& & & \\
\par
5005.52&Fe II&20F&0.74&0.8&20&1.19&0.8&22& & & \\
\par
5005.52&Fe II&20F& & & &0.32&1.6&22& & & \\
\par
5006.65&Fe II&4F&0.22&0.8&14&0.48&0.8&29& & & \\
\par
5006.65&Fe II&4F& & & &0.24&1.6&29& & & \\
\par
5015.678&He I&4&--4.52&3.4&29&--1.99&2.8&28& & & \\
\par
5018.44&Fe II&42&9.99&1.0&25&8.32&1.1&31& & & \\
\par
5018.44&Fe II&42&11.83&2.5&25&15.09&2.9&31& & & \\
\par
5018.44&Fe II&42&--3.79&0.8&25&--3.20&0.7&37& & & \\
\par
5020.24&Fe II&20F&1.20&0.7&20&1.06&0.8&22& & & \\
\par
5043.53&Fe II&20F&0.79&1.0&17&0.66&0.7&16& & & \\
\par
5047.738&He I&47&--0.75&1.4&--7&--1.19&1.6&28& & & \\
\par
5107.95&Fe II&18F&0.99&0.9&20& & & & & & \\
\par
5111.63&Fe II&19F&1.50&0.9&19& & & & & & \\
\par
5158.0&Fe II&18F&1.50&0.8&21&1.39&0.4&23&1.15&0.5&23\\
\par
5158.0&Fe II&18F&0.51&1.7&21&0.82&1.6&23&0.63&1.6&18\\
\par
5158.81&Fe II&19F&4.63&0.8&22&4.74&0.5&21&3.36&0.5&20\\
\par
5158.81&Fe II&19F&1.35&1.7&22&1.64&1.6&21&0.95&1.6&28\\
\par
5163.951&Fe II&35F&1.48&0.8&24&1.38&0.4&22&0.80&0.5&23\\
\par
5163.951&Fe II&35F&0.34&1.7&24&0.46&1.5&22&0.39&1.6&23\\
\par
5167.321&Mg I&2&0.45&0.9&27&0.36&0.7&27&0.41&0.7&28\\
\par
5167.321&Mg I&2&1.55&3.1&27&1.59&3.1&27&1.22&3.1&28\\
\par
5169.033&Fe II&42&7.60&0.9&27&7.17&0.7&26&7.99&0.9&13\\
\par
5169.033&Fe II&42&10.77&3.1&27&12.70&3.1&26&8.25&3.1&13\\
\par
5169.033&Fe II&42&--3.13&0.7&28&--4.18&0.5&28&--8.51&0.8&15\\
\par
5172.684&Mg I&2&0.40&0.9&27&0.43&0.7&26&0.14&0.7&25\\
\par
5172.684&Mg I&2&0.92&3.1&27&1.90&3.1&26&1.22&3.1&25\\
\par
5181.97&Fe II&18F&0.88&0.8&22&1.32&0.6&21&0.77&0.6&22\\
\par
5181.97&Fe II&18F&0.42&1.7&22&0.39&1.6&21&0.31&1.6&22\\
\par
5183.604&Mg I&2&0.78&1.1&25&1.69&1.1&21&1.63&1.1&17\\
\par
5183.604&Mg I&2&0.31&3.1&25&0.63&3.1&21&0.61&3.1&17\\
\par
5183.604&Mg I&2&--0.27&0.8&28&--0.85&0.6&25&--1.14&0.7&22\\
\par
5184.788&Fe II&19F&0.38&0.8&17&0.46&0.6&23&0.22&0.6&21\\
\par
5184.788&Fe II&19F&0.10&1.7&17&0.12&1.6&23&0.08&1.6&21\\
\par
5197.577&Fe II&49&2.19&0.9&23&2.86&0.8&23&2.32&0.9&20\\
\par
5197.577&Fe II&49&3.58&3.1&23&2.00&3.1&23&2.35&3.1&20\\
\par
5197.577&Fe II&49&--0.40&0.7&26&--0.61&0.4&24&--0.67&0.4&22\\
\par
5199.173&Fe II&35F&0.36&0.7&22&0.57&0.5&21&0.44&0.6&23\\
\par
5199.173&Fe II&35F&0.32&1.6&22&0.16&1.6&21&0.25&1.7&23\\
\par
5214.489&Fe II& & & & & & & &0.14&1.1&13\\
\par
5214.489&Fe II& & & & & & & &0.45&3.1&13\\
\par
5216.863&Fe II& & & & & & & &0.14&1.1&23\\
\par
5216.863&Fe II& & & & & & & &0.60&3.1&23\\
\hline
5220.06&Fe II&19F&1.18&0.8&20&1.18&0.5&22&0.82&0.6&22\\
\par
5220.06&Fe II&19F&0.34&1.7&20&0.52&1.7&22&0.47&1.6&22\\
\par
5234.625&Fe II&49&2.69&0.9&27&3.12&0.9&23&2.36&0.9&18\\
\par
5234.625&Fe II&49&2.77&3.1&27&2.77&3.0&23&2.60&3.1&18\\
\par
5234.625&Fe II&49&--0.64&0.8&27&--0.64&0.4&25&--0.87&0.6&22\\
\par
5237.329&Cr II&43&0.38&0.9&24&0.83&0.9&23&0.56&0.9&24\\
\par
5237.329&Cr II&43&0.77&3.1&24&0.62&3.0&23&0.71&3.1&24\\
\par
5237.329&Cr II&43&--0.26&0.8&26&--0.40&0.4&25&--0.37&0.5&24\\
\par
5247.952&Fe II& & & & & & & &0.69&3.1&22\\
\par
5247.952&Fe II& & & & & & & &0.14&1.1&22\\
\par
5251.233&Fe II& & & & & & & &0.39&3.1&25\\
\par
5251.233&Fe II& & & & & & & &0.11&1.1&25\\
\par
5254.929&Fe II&49&0.48&1.1&30&0.58&1.1&26&0.54&1.1&24\\
\par
5254.929&Fe II&49&0.30&3.1&30&0.41&3.1&26&0.24&3.1&24\\
\par
5254.929&Fe II&49&--0.13&0.9&35&--0.14&0.6&29&--0.14&0.5&26\\
\par
5261.61&Fe II&19F&3.35&0.7&25&3.65&0.5&23&2.45&0.5&23\\
\par
5261.61&Fe II&19F&0.84&1.7&25&1.54&1.5&23&1.08&1.5&28\\
\par
5264.177&Fe II& & & & & & & &0.15&3.1&24\\
\par
5268.88&Fe II&18F&0.92&0.7&25&1.09&0.5&22&1.14&0.6&19\\
\par
5268.88&Fe II&18F&0.17&1.7&25&0.31&1.5&35&0.16&1.6&19\\
\par
5273.38&Fe II&18F&3.05&0.8&23&3.61&0.6&22&2.14&0.5&20\\
\par
5273.38&Fe II&18F&0.81&1.7&23&1.15&1.6&22&0.69&1.6&20\\
\par
5276.002&Fe II&49&4.79&1.0&29&5.06&0.9&24&3.94&0.9&19\\
\par
5276.002&Fe II&49&2.46&3.1&29&2.86&3.1&24&1.99&3.1&19\\
\par
5276.002&Fe II&49&--1.60&0.8&35&--1.52&0.6&27&--1.72&0.7&22\\
\par
5278.374&Fe II&35F&0.11&0.8&3&0.26&0.6&26&0.14&0.6&19\\
\par
5278.374&Fe II&35F&0.08&1.7&3&0.16&1.6&26&0.11&1.6&19\\
\par
5283.109&Fe II&35F&0.23&0.7&28&0.34&0.5&22&0.25&0.5&23\\
\par
5283.109&Fe II&35F&0.07&1.7&28&0.09&1.6&21&0.09&1.6&23\\
\par
5284.109&Fe II&41&0.65&1.1&30&0.57&0.9&21&0.59&0.9&23\\
\par
5284.109&Fe II&41&0.31&3.1&30&0.32&3.1&21&0.28&3.1&23\\
\par
5284.109&Fe II&41&--0.18&0.8&31&--0.18&0.6&23&--0.30&0.6&23\\
\par
5296.84&Fe II&19F&0.64&0.6&25&1.03&0.5&22&0.69&0.5&22\\
\par
5296.84&Fe II&19F&0.25&1.7&25&0.25&1.6&22&0.21&1.6&22\\
\par
5316.615&Fe II&49&7.30&1.1&39&8.67&0.9&24&6.11&1.0&18\\
\par
5316.615&Fe II&49&3.83&3.1&39&4.45&3.1&24&3.36&3.1&18\\
\par
5316.615&Fe II&49&--0.67&0.9&40&--1.83&0.5&26&--0.66&0.5&19\\
\par
5316.784&Fe II&48&1.90&1.1&32&1.74&0.9&22&1.33&0.9&22\\
\par
5316.784&Fe II&48&1.30&3.1&32&1.59&3.1&22&1.53&3.1&22\\
\par
5316.784&Fe II&48&--0.31&0.9&35&--0.59&0.5&24&--0.58&0.5&23\\
\par
5325.553&Fe II&49& & & &0.87&0.9&26&0.98&0.9&22\\
\par
5325.553&Fe II&49& & & &0.38&3.1&26&0.31&3.1&22\\
\par
5325.553&Fe II&49& & & &--0.44&0.5&30&--0.59&0.6&25\\
\par
5333.65&Fe II&19F&2.54&0.7&24&2.92&0.5&23&1.88&0.5&21\\
\par
5333.65&Fe II&19F&0.76&1.7&24&0.82&1.6&23&0.67&1.6&21\\
\par
5347.67&Fe II&18F&0.34&0.8&17&0.39&0.6&18&0.31&0.6&19\\
\par
5347.67&Fe II&18F&0.34&1.7&17&0.25&1.6&21& & & \\
\par
5362.869&Fe II&48&1.23&1.1&25&1.19&1.1&27& & & \\
\par
5362.869&Fe II&48&0.77&3.1&25&0.88&3.2&27& & & \\
\par
5362.869&Fe II&48&--0.24&0.8&28&--0.24&0.8&30& & & \\
\par
5366.208&Fe II&97&0.16&1.1&36&0.50&1.5&26& & & \\
\par
5376.47&Fe II&19F&2.43&0.7&20&2.36&0.7&22& & & \\
\par
5376.47&Fe II&19F&0.59&1.7&21&0.58&1.6&22& & & \\
\par
5412.641&Fe II&17F&0.86&0.7&22&0.88&0.7&24& & & \\
\par
5412.641&Fe II&17F&0.32&1.7&22&0.35&1.6&24& & & \\
\par
5414.862&Cr II& &0.44&0.8&26& & & & & & \\
\par
5425.257&Fe II&49&0.59&1.1&27&0.60&1.1&23& & & \\
\par
5425.257&Fe II&49&0.08&3.2&27&0.24&3.2&23& & & \\
\par
5425.257&Fe II&49&--0.12&0.8&33&--0.16&0.8&23& & & \\
\par
5433.15&Fe II&18F&0.93&0.7&19&0.82&0.6&22& & & \\
\par
5433.15&Fe II&18F&0.21&1.7&19&0.24&1.6&24& & & \\
\par
5453.855&S II&6&--0.81&2.2&27&--0.52&1.3&22& & & \\
\par
5456.442&Si II& &--0.14&2.2&26&--0.26&1.3&25& & & \\
\par
5473.596&V I& &0.19&0.9&8& & & & & & \\
\par
5477.25&Fe II&34F&0.56&0.8&20&0.52&0.7&21& & & \\
\par
5477.25&Fe II&34F&0.21&1.7&20&0.29&1.6&20& & & \\
\par
5492.399&Fe II& &0.22&1.1&26& & & & & & \\
\par
5492.399&Fe II& &0.11&3.2&26& & & & & & \\
\par
5494.569&Ca I& &0.22&0.9&29&0.22&0.9&29& & & \\
\par
5495.82&Fe II&17F&0.40&0.7&25&0.43&0.7&26& & & \\
\par
5495.82&Fe II&17F&0.27&1.8&25&0.10&1.8&26& & & \\
\par
5527.331&Fe II&17F&1.77&0.8&24&1.68&0.8&25& & & \\
\par
5527.331&Fe II&17F&0.54&1.8&24&0.72&1.6&25& & & \\
\par
5534.847&Fe II&55&1.30&1.1&24&1.23&1.1&22& & & \\
\par
5534.847&Fe II&55&1.02&3.2&25&0.80&3.2&22& & & \\
\par
5534.847&Fe II&55&--0.21&0.8&28&--0.12&0.8&25& & & \\
\par
5551.31&Fe II&39F&0.50&0.9&23&0.38&0.9&22& & & \\
\par
5556.31&Fe II&18F&0.22&0.8&21&0.19&0.8&27& & & \\
\par
5577.35&O I&F&1.21&1.2&15&1.43&1.5&14& & & \\
\par
5580.82&Fe II&39F&0.41&0.9&23&0.33&0.8&12& & & \\
\par
5587.114&Fe II&224&0.21&2.0&24& & & & & & \\
\par
5588.15&Fe II&39F&0.17&0.8&23&0.18&0.8&9& & & \\
\par
5613.268&Fe II&39F&0.30&1.0&24&0.21&0.8&29& & & \\
\par
5627.249&Fe II&98F&0.27&1.2&23&0.24&0.8&28& & & \\
\par
5639.477&Si II&9&--0.34&1.7&24&--0.26&1.3&24& & &\\
\par
5639.977&S II&14&--0.17&1.7&22&--0.13&1.3&24& & &\\
\par
5640.346&S II&11&--0.17&1.7&24&--0.13&1.3&24& & &\\
\par
5640.554&C II& &--0.42&1.7&25&--0.32&1.30&24& & &\\
\par
5645.681&S II&6&--0.22&2.2&25&--0.30&2.0&25& & &\\
\par
5648.072&C II& &--0.11&2.2&26& --0.40&2.0&26& & &\\
\par
5654.850&Fe II&17F&0.20&0.8&20&0.27&0.8&31& & & \\
\par
5673.211&Fe II&97F&0.75&1.0&19&0.65&0.8&15& & & \\
\par
5718.215&Fe II&39F&0.15&0.8&18&0.11&0.8&36& & & \\
\par
5718.215&Fe II&39F&0.05&1.8&18&0.05&1.8&36& & & \\
\par
5745.7&Fe II&17F&0.12&0.8&25&0.06&0.8&26& & & \\
\par
5745.7&Fe II&17F&0.04&1.8&25&0.04&1.6&26& & & \\
\par
5746.96&Fe II&34F&1.09&0.7&21&1.25&0.8&22& & & \\
\par
5746.96&Fe II&34F&0.35&2.0&21&0.04&1.6&21& & & \\
\par
5754.8&Ni II&3F&1.26&1.0&11&1.37&1.0&12& & & \\
\par
5835.449&Fe II&44F&0.30&1.2&28&0.49&0.9&22&0.35&0.5&23\\
\par
5835.449&Fe II&44F&0.23&1.9&28&0.21&1.7&22&0.16&1.6&22\\
\par
5870.02&Fe II&44F&0.49&1.2&25&0.34&0.8&19&0.20&0.5&22\\
\par
5870.02&Fe II&44F&0.12&1.9&25&0.09&1.7&19&0.16&1.6&22\\
\par
5875.615&He I&11&--10.9&4.9&34&--4.63&3.8&36&--4.97&2.8&15\\
\par
5889.953&Na I& &3.67&3.2&48&4.57&3.5&5&2.52&3.0&6\\
\par
5889.953&Na I& &--1.33&1.2&31&--1.76&0.6&22&--2.41&0.5&22\\
\par
5895.923&Na I& &3.14&3.2&48&4.41&3.5&4&2.79&2.3&9\\
\par
5895.923&Na I& &--0.96&1.2&31&--1.65&0.6&24&--2.56&0.5&24\\
\par
5955.802&O II& &1.26&5.3&61&0.79&1.8&21& & & \\
\par
5978.93&Si II&4&1.59&4.26&21&0.80&2.0&16&0.72&1.4&19\\
\par
6122.45&Mn II&13&0.53&1.2&28&0.78&1.2&23&0.72&1.2&19\\
\par
6122.45&Mn II&13&0.74&3.0&28&0.45&3.0&23&0.08&3.0&19\\
\par
6125.861&Mn II&13&0.36&1.2&25&0.51&1.2&25&0.56&1.2&22\\
\par
6125.861&Mn II&13&0.67&3.0&25&0.60&3.0&25&0.21&3.0&22\\
\par
6128.733&Mn II&13&0.30&1.2&28&0.39&1.2&28&0.43&1.2&26\\
\par
6128.733&Mn II&13&0.59&3.0&28&0.52&3.0&28&0.18&3.0&26\\
\par
6130.801&Mn II&13&0.24&1.2&39&0.27&1.2&38&0.40&1.2&36\\
\par
6130.801&Mn II&13&0.52&3.0&39&0.45&3.0&38&0.15&3.0&36\\
\par
6147.741&Fe II&74&0.07&1.3&18&0.21&1.3&23& & & \\
\par
6147.741&Fe II&74&0.39&3.6&18&0.29&3.6&23& & & \\
\par
6147.741&Fe II&74&--0.06&0.9&30&--0.07&0.9&30& & & \\
\par
6149.258&Fe II&74&0.09&1.3&24&0.11&1.3&21& & & \\
\par
6149.258&Fe II&74&0.65&3.6&24&0.21&3.6&21& & & \\
\par
6149.258&Fe II&74&--0.06&0.9&41&--0.07&0.9&25& & & \\
\par
6158.019&Fe II&200&0.49&1.3&34&0.35&1.3&30&0.38&1.2&38\\
\par
6158.019&Fe II&200&0.51&3.6&34&0.13&3.6&30&0.26&3.6&38\\
\par
6158.019&Fe II&200&--0.20&0.9&38&--0.07&0.9&40& & & \\
\par
6160.755&Fe II&161&0.24&1.3&30&0.28&1.3&32& & & \\
\par
6160.755&Fe II&161&0.37&3.6&30&0.08&3.6&32& & & \\
\par
6160.755&Fe II&161&--0.10&0.9&39&--0.07&0.9&41& & & \\
\par
6161.086&Fe II& & & & & & & &0.17&1.2&16\\
\par
6161.086&Fe II& & & & & & & &0.09&3.6&16\\
\par
6172.6&Fe II&98&0.24&1.3&29&0.29&1.3&29&0.18&1.2&24\\
\par
6172.6&Fe II&98&0.55&3.7&29&0.28&3.7&29&0.35&2.3&24\\
\par
6172.6&Fe II&98&--0.11&1.0&32&--0.07&0.8&37& & & \\
\par
6188.552&Fe II&44F&0.30&1.6&28&0.20&0.7&22&0.24&0.6&21\\
\par
6233.534&Fe II&93&0.46&1.3&25&0.34&1.3&20&0.29&1.2&27\\
\par
6233.534&Fe II&93&0.88&3.7&25&0.24&3.7&20&0.29&3.0&27\\
\par
6233.534&Fe II&93&--0.32&1.0&28&--0.08&1.0&23&--0.09&0.6&32\\
\par
6238.392&Fe II&74&0.06&1.3&26&0.16&1.3&28& & & \\
\par
6238.392&Fe II&74&0.43&3.6&26&0.21&3.7&28& & & \\
\par
6238.392&Fe II&74&--0.04&0.9&39&--0.08&1.0&31& & & \\
\par
6239.953&Fe II&74&0.03&1.3&29&0.11&1.3&26& & & \\
\par
6239.953&Fe II&74&0.29&3.6&29&0.12&3.7&26& & & \\
\par
6239.953&Fe II&74&--0.04&0.9&35&--0.08&1.0&31& & & \\
\par
6247.557&Fe II&74&0.32&1.3&21&0.52&1.3&22&0.40&1.3&21\\
\par
6247.557&Fe II&74&0.32&3.7&21&0.37&3.7&22&0.19&3.7&21\\
\par
6247.557&Fe II&74&--0.17&0.9&23&--0.27&0.9&25&--0.18&0.5&22\\
\par
6248.898&Fe II&92&0.90&1.3&24&0.84&1.3&27&0.92&1.3&24\\
\par
6248.898&Fe II&92&1.46&3.7&24&0.55&3.7&27&0.37&3.7&24\\
\par
6248.898&Fe II&92&--0.41&0.9&27&--0.25&0.9&32&--0.10&0.5&26\\
\par
6300.23&O I&F&18.76&1.5&34&17.26&0.9&27&15.20&0.8&27\\
\par
6317.394&Fe II&200&0.38&1.3&25& & & &0.39&1.3&25\\
\par
6317.394&Fe II&200&0.46&3.7&25& & & &0.56&3.7&25\\
\par
6317.983&Fe II&92&0.79&1.3&25&1.89&1.3&27&1.57&1.3&25\\
\par
6317.983&Fe II&92&0.64&3.7&25&2.65&3.7&27&1.67&3.7&25\\
\par
6318.717&Mg I&23&--0.14&0.9&18&--0.25&0.8&4&--0.36&0.6&16\\
\par
6318.717&Mg I&23&0.79&1.3&16& & & &0.46&1.3&16\\
\par
6318.717&Mg I&23&2.13&3.7&16& & & &0.37&3.7&16\\
\par
6346.742&Mg II&16&1.48&3.7&--10&1.50&3.0&0&1.21&3.0&0\\
\par
6346.742&Mg II&16&1.15&5.8&--10&0.87&5.8&0&0.53&5.8&0\\
\par
6346.742&Mg II&16&--0.60&1.9&--22&--0.54&1.2&0&--0.36&1.2&2\\
\par
6363.88&O I&1F&6.95&1.7&28&5.92&1.0&18&4.76&0.8&17\\
\par
6369.462&Fe II&40&0.19&1.3&23&0.33&1.3&24&0.17&1.3&24\\
\par
6369.462&Fe II&40&0.27&3.7&23&0.55&3.7&24&0.23&3.7&24\\
\par
6371.125&Fe II&93&0.08&1.3&23&0.08&1.3&24&0.09&1.3&24\\
\par
6371.125&Fe II&93&0.14&3.7&23&0.09&3.7&24&0.15&3.7&24\\
\par
6371.371&Si II&2&0.26&1.3&23&0.04&1.3&23&0.07&1.3&24\\
\par
6371.371&Si II&2&0.23&3.7&23&0.11&3.7&23&0.75&3.7&24\\
\par
\hline
6383.722&Fe II&92&0.95&1.3&27&1.38&1.2&27&1.24&1.3&22\\
\par
6383.722&Fe II&92&1.67&3.6&27&0.92&3.8&27&1.64&3.7&22\\
\par
6383.722&Fe II&92&--0.22&0.9&30&--0.23&0.8&31& & & \\
\par
6385.451&Fe II&92&0.61&1.3&28&0.92&1.2&23&0.85&1.3&23\\
\par
6385.451&Fe II&92&1.73&3.6&28&0.62&3.8&23&0.82&3.7&23\\
\par
6385.451&Fe II&92&--0.22&0.9&32&--0.16&0.8&28& & & \\
\par
6416.919&Fe II&74&0.16&1.3&33&0.32&1.3&28&0.47&1.3&25\\
\par
6416.919&Fe II&74&0.74&3.7&33&0.18&3.7&28&0.19&3.7&25\\
\par
6416.919&Fe II&74&--0.03&1.0&53&--0.06&0.8&26&--0.15&0.6&26\\
\par
6440.4&Fe II&15F&0.19&1.3&32&0.27&1.1&26&0.17&0.7&24\\
\par
6442.955&Fe II&93&0.43&1.3&30&0.53&1.2&24&0.71&1.3&22\\
\par
6442.955&Fe II&93&1.24&3.7&30&0.67&3.7&24&0.60&3.7&22\\
\par
6442.955&Fe II&93&--0.10&1.0&36&--0.11&1.0&30&--0.06&0.6&28\\
\par
6455.837&Fe II&92&0.15&1.3&29&0.56&1.3&29&0.39&1.3&25\\
\par
6455.837&Fe II&92&0.20&3.7&29&0.28&3.7&29&0.37&3.7&25\\
\par
6455.837&Fe II&92&--0.27&1.0&34&--0.10&0.9&33&--0.04&0.5&29\\
\par
6456.383&Fe II&74&1.12&1.3&28&1.13&1.3&29&1.18&1.3&22\\
\par
6456.383&Fe II&74&1.93&3.7&28&0.40&3.7&29&0.75&3.7&22\\
\par
6456.383&Fe II&74&--0.27&1.0&34&--0.39&0.9&32&--0.34&0.5&23\\
\par
6482.204&Fe II&199&0.30&1.3&28&0.41&1.3&--3& & & \\
\par
6482.204&Fe II&199&0.52&3.7&28&0.56&3.6&--3& & & \\
\par
6482.204&Fe II&199&--0.11&1.0&30&--0.12&1.0&--3& & & \\
\par
6485.282&Fe II&90F&0.55&1.6&18&0.46&1.1&16& & & \\
\par
6491.246&Fe II&92&0.33&1.3&30&0.70&1.2&22&0.79&1.3&24\\
\par
6491.246&Fe II&92&0.64&3.7&30&0.27&3.8&22&0.37&3.7&24\\
\par
6491.246&Fe II&92&--0.06&1.0&33&--0.19&0.8&29&--0.10&0.5&27\\
\par
6493.035&Fe II&92&0.37&1.3&28&0.83&1.2&28&0.72&1.3&27\\
\par
6493.035&Fe II&92&1.32&3.7&28&0.27&3.8&28&0.37&3.7&27\\
\par
6493.035&Fe II&92&--0.06&1.0&33&--0.19&0.8&36&--0.05&0.5&30\\
\par
6506.333&Fe II&93&0.40&1.9&29&0.46&1.3&24&0.37&1.3&22\\
\par
6506.333&Fe II&93&0.31&3.7&29&0.22&3.7&24&0.08&3.7&22\\
\par
6506.333&Fe II&93&--0.06&1.0&29&--0.20&0.8&28&--0.06&0.6&24\\
\par
6517.018&Fe II&92&0.63&1.3&29&0.92&1.3&27&0.66&1.3&21\\
\par
6517.018&Fe II&92&0.86&3.7&28&0.45&3.7&27&0.22&3.7&21\\
\par
6517.018&Fe II&92& & & &--0.20&0.7&31&--0.06&0.6&25\\
\hline
\end{tabular} 
\end{table}