\begin{table}%t4
%\centering
\par
\caption{IRAS and 2MASS parameters. The two parts of the table give
out the detected and un-detected sources respectively.\label{tab4}}  
\begin{tabular}{lrccclrrr}
\par
\hline\hline
\par
Source Name& $T_{\rm d}$(K)& $\rm log[25/12]$ & $\log[60/12]$ &
$L_{\rm bol}$($L_{\odot}$) &\ 2MASS name & $J$ & $J-H$ &\ $H-K$ \\
\par
\hline
\par
%  Source           Td     LOG[25/12]  LOG[60/12]    Lbol
02485+6902        &     39.51  &     1.03  &     1.79   & 1.3E+02  &02530631+6914366      &16.120&1.882  &1.944\\
%                  &            &           &            & no 2MASS source in the core     &      &       &     \\
03035+5819        &     42.71  &     1.11  &     1.53   & 5.8E+04  &03072452+5830433      &12.757&1.876  &1.361\\
06306+0437        &     31.27  &     0.60  &     1.47   & 9.4E+02  &06331621+0434530      &16.383&1.463  &2.060\\
06501+0143        &     34.53  &     0.71  &     1.64   & 8.7E+03  &06524617+0140190      &16.337&1.259  &1.701\\
%                  &            &           &            &          &06524556+0140225      &16.411&1.424  &1.750\\
18196-1331        &     43.37  &     0.57  &     1.49   & 6.6E+04  &18222658-1330157      &13.986&3.098  &2.341\\
%                  &            &           &            &          &18222692-1329404      &15.263&1.581  &0.728\\
18265+0028$^{m}$  &     30.20  &     1.21  &     2.01   & 7.4E+01  &18290669+0030312      &17.589&1.831  &0.904\\
%                  &            &           &            &          &18290015+0030406      &18.191&1.417  &1.668\\
18308-0503        &     35.51  &     0.76  &     1.38   & 2.2E+04  &18333054-0501020      &14.529&1.731  &2.815\\
%                  &            &           &            &          &18332847-0500325      &17.241&1.179  &1.586\\
18352-0148        &     29.17  &     0.53  &     1.65   & 5.6E+03  &18375052-0145444      &12.614&1.235  &0.741\\
%                  &            &           &            &          &18375135-0145475      &16.664&1.522  &0.938\\
18361-0627        &     27.40  &     1.10  &     1.63   & 5.4E+04  &18385227-0625141      &14.644&1.501  &0.639\\
%                  &            &           &            &          &18385638-0624530      &15.107&2.056  &2.308\\
18414-0339        &     28.47  &     0.60  &     1.79   & 2.9E+04  &18440642-0336348      &12.495&2.401  &1.099\\
19363+2018        &     35.55  &     0.63  &     1.59   & 7.2E+03  &19383146+2025220      &15.080&1.419  &2.125\\
19471+2641        &     25.21  &     0.58  &     1.57   & 9.2E+03  &19490938+2649082      &16.195&0.734  &1.426\\
%                  &            &           &            &          &19491090+2649418      &15.761&0.900  &1.641\\
19474+2637        &     29.21  &     0.55  &     1.34   & 9.7E+03  &19493223+2645264      &15.186&0.618  &1.088\\
20215+3725$^{m}$  &     31.56  &     0.61  &     1.79   & 3.7E+02  &20232729+3734539      &16.982&2.094  &3.058\\
%                  &            &           &            &          &20232844+3734213      &18.755&3.268  &2.648\\
%                  &            &           &            &          &20232376+3735342      &16.847&1.568  &0.608\\
23139+5939        &     35.97  &     1.23  &     2.09   & 2.0E+04  &23161002+5955312      &17.594&2.140  &1.227\\
23151+5912        &     49.48  &     0.60  &     1.34   & 9.0E+04  &23172102+5928480      &14.104&2.832  &1.712\\
18355-0650\degr        &     29.733 &     0.93  &     1.27   & 7.4E+05  &18381218-0647413      &14.51 &1.21   &0.74 \\
%                  &            &           &            &          &18381119-0647448      &12.19 &2.21   &1.86 \\
20160+3911\degr        &     30.90  &     0.67  &     1.78   & 2.5E+04  &20175373+3920452      &11.88 &1.39   &0.67 \\
                  &            &           &            &          &20174748+3920524      &16.18 &0.99   &0.57 \\
\hline
\par
01133+6434  &     50.74  &     1.05  &     1.48   & 3.7E+02  &01163754+6450408      &13.947&0.822  &0.736\\
06001+3014  &     38.06  &     0.33  &     1.58   & 4.4E+02  &06032391+3014112      &13.161&1.310  &0.424\\
06446+0029  &     43.21  &     1.07  &     1.75   & 6.4E+02  &06471336+0026065      &14.302&2.323  &2.000\\
07207-1435  &     42.80  &     1.24  &     2.20   & 4.6E+02  &07230189-1441382      &13.339&1.430  &1.333\\
07427-2400  &     43.07  &     1.49  &     2.50   & 1.4E+03  &07445196-2407399      &15.857&2.032  &2.497\\
18061-1927  &     27.68  &     0.70  &     1.60   & 1.0E+03  &18090717-1927327      &13.724&2.448  &1.027\\
18403-0440  &     35.95  &     0.49  &     1.59   & 3.7E+02  &18430155-0437010      &14.834&0.865  &1.164\\
%19081+0903  &     30.04  &     1.10  &     2.27   & 2.4E+03  &19103474+0908151      &13.646&2.564  &1.003\\
19303+1651  &     38.19  &     0.64  &     1.77   & 2.0E+02  &19323229+1657340      &13.012&2.364  &1.094\\
19560+3135  &     40.72  &     0.90  &     1.63   & 2.9E+02  &19580326+3144068      &14.909&1.736  &1.091\\
20110+3321  &     37.82  &     0.68  &     1.28   & 9.6E+02  &20130258+3330079      &14.451&1.682  &0.838\\
20144+3726  &     32.53  &     0.72  &     1.44   & 2.4E+02  &20161456+3735295      &13.802&1.072  &0.740\\
20306+3749  &     37.38  &     0.57  &     1.78   & 4.8E+02  &20323519+3759243      &16.612&0.690  &1.010\\
21008+4700  &     32.81  &     0.56  &     1.68   & 2.7E+02  &21023019+4712232      &14.351&1.774  &0.664\\
21144+5430  &     42.87  &     1.09  &     1.80   & 2.0E+02  &21155563+5443310      &15.488&1.105  &0.700\\
21334+5039  &     43.33  &     1.02  &     1.86   & 9.4E+02  &21350991+5053048      &15.093&0.618  &2.285\\
21379+5106  &     37.98  &     1.07  &     2.13   & 1.5E+02  &21394014+5120327      &16.152&0.820  &1.655\\
21391+5026  &     35.24  &     0.74  &     1.56   & 1.7E+02  &21405742+5039583      &15.244&1.556  &0.781\\
21413+5442  &     44.44  &     0.74  &     1.40   & 3.2E+03  &21430143+5456183      &14.407&1.227  &3.140\\
23004+5642  &     33.73  &     0.77  &     1.55   & 2.5E+02  &23023471+5659170      &16.206&1.004  &0.558\\
05327-0457\degr  &     34.02  &     0.42  &     2.00   & 4.9E+03  &05351438-0455226      &12.856&0.765  &0.600\\
20144+3526\degr  &     51.34  &     0.86  &     1.25   & 1.4E+03  &20162196+3536062      &13.943&2.473  &1.903\\
\hline
\par
\end{tabular}
\par
\begin{list}{}{}
\par
\item[]Note: 
$^m$ Indicates the NH$_3$ emission region has a minor peak; 
$\degr$ denotes the sources associated with HII region and not included in
the analysis.
\end{list}
\end{table}