\begin{table}%t1
\caption{A summary of the photometric data of the GOODS-South field
used in this work.}\label{summaryGOODS}
%\centerline
{
\begin{tabular}{p{2cm}cccccccc}
\hline
\hline
FILTER & $\lambda_{\rm c}$ & $\Delta \lambda$ & EXPTIME & {\it FWHM}$^a$ & PIXSCALE & ZP
& AREA & MAGLIM$^b$ \\
 & \AA & \AA & s & arcsec & arcsec/px & AB & $\rm arcmin^2$ & 90$\%$ \\
\hline
$U_{35}$     &  3590 &   222 & 53~654 & 0.90 & 0.23 & 28.520   & 143.2 & 25.5 \\
$U_{38}$     &  3680 &   170 & 75~100 & 1.10 & 0.23 & 28.755   & 143.2 & 24.5 \\
$U_{VIMOS}$  &  3780 &   197 & 10~000 & 0.80 & 0.20 & 32.500   &  90.2 & 26.5 \\
$B$ ($F435W$)    &  4330 &   508 &  7200 & 0.12 & 0.03 & 25.65288 & 143.2 & 27.5 \\
$V$ ($F606W$)    &  5940 &  1168 &  6000 & 0.12 & 0.03 & 26.49341 & 143.2 & 27.5 \\
$i$ ($F775W$)    &  7710 &   710 &  6000 & 0.12 & 0.03 & 25.64053 & 143.2 & 26.5 \\
$z$ ($F850LP$)   &  8860 &   554 & 12~000 & 0.12 & 0.03 & 24.84315 & 143.2 & 26.0 \\
$J_{\rm ISAAC}$  & 12~550 &  1499 & 12~600$^c$ & 0.45$^c$ & 0.15 & 26.000 & 143.2 & 24.5 \\
$H_{\rm ISAAC}$  & 16~560 &  1479 & 18~000$^c$ & 0.45$^c$ & 0.15 & 26.000 &  78.0 & 24.3 \\
$Ks_{\rm ISAAC}$ & 21~630 &  1383 & 23~400$^c$ & 0.45$^c$ & 0.15 & 26.000 & 143.2 & 23.8 \\
$CH1_{\rm IRAC}$ & 35~620 &  3797 & 82~800 & 1.60 & 0.60 & 22.416 & 143.2 & 24.0 \\
$CH2_{\rm IRAC}$ & 45~120 &  5043 & 82~800 & 1.70 & 0.60 & 22.195 & 143.2 & 23.4 \\
$CH3_{\rm IRAC}$ & 56~860 &  6846 & 82~800 & 1.90 & 0.60 & 20.603 & 143.2 & 22.0 \\
$CH4_{\rm IRAC}$ & 79~360 & 14~797 & 82~800 & 2.00 & 0.60 & 21.781 & 143.2 & 22.0 \\
\hline
\end{tabular}}
\medskip
$^a$ For ground-based images, $\it FWHM$ corresponds to the seeing, while for
space-based data it is the PSF of the instrument.\\
$^b$ The limiting magnitudes (at 90\% completeness)
are the mean values on the field, averaged on the positions and areas
of every object. \\
$^c$ For $J$, $H$, and $K$s filters, we report only the mean value of seeing and exposure
time: detailed values can be found in Vandame et~al. (in~preparation).
\end{table}