\begin{table}%t3
\caption{\label{tab3} Parameters of the newly observed galaxies.} 
%\centering
\par
\begin{tabular}{llccccccccc}
\hline\hline
Obj. & RA & Dec & $V_{\rm opt}$ & $\sigma$ & $S_{\rm p}$ & $V_{\rm HI}$ & $W_{50}$ & $W_{20}$ & $I_{\rm HI}$ & Qual. \\ 
 & \multicolumn{2}{c}{J2000.0} & km~s$^{-1}$ & mJy/beam & mJy/beam & km~s$^{-1}$  &  km~s$^{-1}$ & km~s$^{-1}$ & Jy km~s$^{-1}$\\   
\hline
\multicolumn{10}{l}{Coma Supercluster} \\   
CGCG 97-078  & 114316.24 & 194455.6 & 7560~$\pm$~70  & 0.54 &   -- &   --         &  -- &  -- &   --&  --\\ 
CGCG 127-018 & 113944.62 & 224107.7 &         --   & 0.56 & 17.0 &  6922~$\pm$~2  & 147 & 168 & 2.09~$\pm$~0.06  & 1 \\  
CGCG 127-039 & 114330.88 & 230043.3 & 6908~$\pm$~60  & 0.62 & 22.4 &  6911~$\pm$~1  &  37 &  58 & 0.82~$\pm$~0.04  & 2 \\ % det     OK
CGCG 97-124  & 114456.97 & 194353.9 & 7771~$\pm$~60  & 0.66 &   -- &   --  &   --  &  -- &  --  &  --\\ %  <       OK-     merda.....: continuo spaventoso
CGCG 127-055 & 114646.66 & 211616.9 & 6615~$\pm$~52  & 0.67 &  9.3 &  6626~$\pm$~3  & 215 & 242 & 1.86~$\pm$~0.08  & 1 \\ % det     OK
CGCG 127-067 & 115039.40 & 205426.1 & 6349~$\pm$~39  & 0.43 & 3.8  &  6400~$\pm$~16 & 283 & 304 & 0.73~$\pm$~0.10& 1  \\ %   S?
CGCG 157-044 & 115123.19 & 264703.6 & 6624~$\pm$~44  & 0.64 &  5.1 &  6607~$\pm$~4  & 240 & 260 & 0.84~$\pm$~0.08  & 1 \\ % det     OK
CGCG 97-172  & 115214.30 & 183905.7 & 7650~$\pm$~56  & 0.36 & 1.6  &  7826~$\pm$~16 & 214 & 227 & 0.21~$\pm$~0.10& 3  \\ %   S?
CGCG 127-137W & 120141.90 & 202417.3 & 6794         & 0.49 & 3.4  &  6871~$\pm$~16 & 357 & 398 & 1.07~$\pm$~0.10& 1  \\ %   S?
CGCG 98-023  & 120144.40 & 175353.8 & 6905~$\pm$~48  & 0.38 & 5.8  &  6905~$\pm$~16 & 262 & 282 & 1.01~$\pm$~0.10& 1  \\ %   Sb
CGCG 127-136 & 120147.40 & 210506.7 & 6930         & 0.29 & 17.5 &  6675~$\pm$~16 & 173 & 228 & 2.36~$\pm$~0.10& 2  \\ %   S?
CGCG 127-138 & 120155.47 & 204452.1 & 7192~$\pm$~46  & 0.60 &   -- &   --         &  -- &  -- &   --& -- \\ %  <  --   OK
CGCG 128-015 & 120456.20 & 211427.5 & 6729~$\pm$~16  & 0.44 & 19.0 &  6741~$\pm$~16 & 102 & 124 & 1.64~$\pm$~0.10& 2  \\ %   Sb
CGCG 99-002  & 121755.86 & 182357.8 & 7640~$\pm$~59  & 0.90 &  2.7 &  (7605) &  --&  --&  --  & 4 \\ % det?    OK      se det:F=0.45,v=7605,D20=308,D50=285,rms=0.89
CGCG 128-072 & 121808.27 & 244118.5 & 6838~$\pm$~51  & 0.63 &  8.3 &  6795~$\pm$~6  & 119 & 174 & 0.82~$\pm$~0.07  & 1 \\ % det     OK
CGCG 99-013  & 121910.00 & 191626.9 & 7297~$\pm$~16  & 0.36 & 7.2  &  7336~$\pm$~16 & 235 & 251 & 1.41~$\pm$~0.10& 1  \\ %   Sc
CGCG 128-081 & 122052.50 & 252547.2 & 7112         & 0.42 & 5.0  &  7204~$\pm$~16 & 290 & 312 & 1.00~$\pm$~0.10& 1  \\ %   S?
CGCG 129-004 & 122949.40 & 222219.4 & 6847~$\pm$~70  & 0.57 &  5.5 &  6736~$\pm$~7  & 275 & 317 & 1.09~$\pm$~0.08  & 1 \\ % det     OK
CGCG 159-048 & 124011.35 & 311038.1 & 7096~$\pm$~44  & 0.65 &  7.0 &  7064~$\pm$~8  & 309 & 363 & 1.60~$\pm$~0.10    & 1\\ % det     OK
CGCG 159-071 & 124543.41 & 292558.5 & 6936~$\pm$~44  & 1.06 & 17.1 &  6971~$\pm$~1  & 189 & 202 & 2.60~$\pm$~0.10    & 1\\ % det     OK
CGCG 159-097 & 125206.77 & 270134.3 & 6573~$\pm$~190 & 0.65 &  3.2 &  6424~$\pm$~30 & 260 & 357 & 0.60~$\pm$~0.10    & 3 \\ % det         2 scan su 5 buttati via perche merda forte
CGCG 160-009 & 125432.95 & 282234.7 & 7079~$\pm$~63  & 0.70 &   -- &   --         &  -- &  -- &   --& --\\ %  <   --  OK
FOCA 636     & 125756.70 & 275930.0 & 4649         & 0.40 &  1.8 &  4605~$\pm$~30 & 130 & 219 & 0.18~$\pm$~0.05  & 3 \\ % det
FOCA 610     & 125757.70 & 280342.0 & 8299         & 0.38 &  1.7 &  8125~$\pm$~8  & 211 & 236 & 0.19~$\pm$~0.05  & 3  \\ % det    OK      sega
CGCG 130-003 & 125947.24 & 214845.7 & 7094~$\pm$~32  & 0.55 &  4.4 &  7140~$\pm$~4  & 335 & 357 & 0.51~$\pm$~0.08  & 3 \\ % det
CGCG 160-261 & 130059.10 & 275358.6 & 6896~$\pm$~7   & 0.37 & --	 &	--	&   -- &  --  &	--	   & --	 \\ %
CGCG 160-128 & 130422.57 & 284838.5 & 8054~$\pm$~36  & 0.74 & 25.7 &  7920~$\pm$~1  & 115 & 137 & 2.46~$\pm$~0.07  & 1 \\ % det     OK      fanale
CGCG 160-138 & 130635.52 & 271006.2 & 7852~$\pm$~60  & 0.37 &   -- &   --         &  -- &  -- &   --&  --\\ %  <  --   OK
CGCG 160-146 & 130814.00 & 273055.3 & 7337~$\pm$~23  & 0.25 & --	 &   --		&  -- &  -- &	-- &  --	\\ %
CGCG 160-169 & 131440.60 & 295951.8 & 6960~$\pm$~60  & 0.69 &  6.2 &  6850~$\pm$~4  & 298 & 318 & 1.26~$\pm$~0.10   & 1 \\ % det     OK
CGCG 130-029 & 131730.80 & 203555.1 & 6671~$\pm$~71  & 0.36 & 4.6  &  6560~$\pm$~16 & 317 & 325 & 1.30~$\pm$~0.10& 1  \\ %   Sc
CGCG 160-195 & 131947.60 & 304931.9 & 7297~$\pm$~15  & 0.34 & 5.0  &  7247~$\pm$~16 & 158 & 223 & 0.63~$\pm$~0.10& 2  \\ %   S?
CGCG 161-048 & 132557.14 & 313703.6 & 7268~$\pm$~44  & 0.66 &   -- &   --         &  -- &  -- &   --&  --\\ %  <
CGCG 161-051 & 132643.29 & 303026.7 & 7150~$\pm$~60  & 1.52 &   -- &   --         &  -- &  -- &   --&  --\\ %  <  --   OK      continuo
CGCG 161-054 & 132703.07 & 305834.3 & 7668~$\pm$~44  & 0.62 &  7.0 &  6756~$\pm$~3  & 284 & 303 & 1.34~$\pm$~0.09  & 1 \\ % det    OK      fanale
\multicolumn{10}{l}{Virgo Cluster} \\   
VCC  30      & 121054.50 & 155654.6 &   --         & 0.92 &  9.5 & 2084 ~$\pm$~16 & 116 & 148 & 0.83~$\pm$~0.10 & 2 \\ %  S?  17.2
VCC  85      & 121336.50 & 130201.1 &   --         & 0.32 &  2.4 & 1932 ~$\pm$~16 & 74  &  84 & 0.14~$\pm$~0.10 & 2 \\ %  S?  17.5
VCC  113     & 121432.90 & 120612.0 & 2155         & 0.33 & 17.5 & 2091 ~$\pm$~16 & 148 & 171 & 2.12~$\pm$~0.10 & 2 \\ %  S?  17
VCC  137     & 121508.60 & 145819.5 &   --         & 0.56 &  --  &    (4000)	&  -- &  -- &	--    & 4 \\ %  S?  17.4
VCC  429     & 122044.20 & 143803.3 &   --         & 0.39 &  4.0 & 600  ~$\pm$~16 & 87  & 109 & 0.27~$\pm$~0.10 & 2 \\ %  S?  17.2
VCC  578     & 122243.60 & 183252.1 &   --         & 0.39 &  4.0 & 6490 ~$\pm$~16 & 161 & 178 & 0.48~$\pm$~0.10 & 1 \\ %  S?  17.6
VCC  1574    & 123432.90 & 151052.3 &   --         & 0.17 &  2.3 & 639  ~$\pm$~16 & 127 & 161 & 0.22~$\pm$~0.10 & 2 \\ %  S?  17.3
VCC  1623    & 123531.90 & 163646.9 &   --         & 0.30 &  1.9 & 2108 ~$\pm$~16 & 78  & 91  & 0.13~$\pm$~0.10 & 2 \\ %  S?  16.7
VCC  1821    & 124008.90 & 065302.1 &   --         & 0.31 &  2.5 & 1007 ~$\pm$~16 & 75  & 87  & 0.16~$\pm$~0.10 & 2 \\ %  S?  17.2
VCC  1873    & 124118.60 & 063127.0 &   --         & 0.26 & 17.0 & 1692 ~$\pm$~16 & 112 & 134 & 1.37~$\pm$~0.10 & 2 \\ %  S?  16.4
VCC  1898    & 124157.50 & 034909.4 & 881 ~$\pm$~23  & 0.50 &  --  &	--	&  --  &  --  &		--     & --\\ %  S?  16.2
VCC  2071    & 124825.40 & 091856.8 &   --         & 0.32 &  2.7 & 6484 ~$\pm$~16 & 185 & 196 & 0.40~$\pm$~0.10 & 2 \\ %  S?  17.8
CGCG 43066   & 125515.40 & 025348.4 & 2798~$\pm$~23  & 0.47 & 21.0 & 2802 ~$\pm$~16 & 382 & 403 & 6.09~$\pm$~0.10 & 1 \\ 
\hline
\end{tabular}
\end{table}