\begin{table}%T2
%\centering
\par
\caption{High-energy spectral parameters of Magnetars as measured by \integral.
The distances are taken from Woods \& Thompson (\cite{woodsrew}) and references therein.}
\begin{tabular}{ccccccc}
 \hline\hline
 Source & Exposure time & Obs. start & Obs. end & Photon index & 20$-$100~keV luminosity & Distance \\
 & [Ms] & UTC & UTC & & [10$^{34}$ erg s$^{-1}$] & [kpc] \\
 \hline
 SGR 1900+14& 2.5 & 2003-03-06 & 2004-06-08 & 3.1 $\pm$ 0.5 & 40 $\pm$ 8 & 15\\
 SGR 1806--20& 2.0 & 2003-03-12 & 2003-10-15 & 1.8 $\pm$ 0.2 & 124 $\pm$ 11 (35 $\pm$ 3) & 15 (8)\\
 %\hline
 4U 0142+61 & 0.33 & 2002-12-28 & 2004-06-09 & 1.3 $\pm$ 0.4 & 5 $\pm$ 0.5 &3\\
 1E 1841--045 & 1.5 & 2003-03-10 & 2004-05-02 & 1.5 $\pm$ 0.2 & 26 $\pm$ 2 & 7\\
 1RXS J170849.0--400910& 1.8 & 2003-02-01 & 2004-04-20 &1.4 $\pm$ 0.4& 7 $\pm$ 1 &5\\
 \hline
\end{tabular}
\label{magtab}
\end{table}