\begin{table}%t3
\par
      \caption{Default initial conditions.      \label{Table:default}}
%\centerline
{      \begin{tabular}{lcc}
        \hline\hline
        \noalign{\smallskip} 
      	\multicolumn{2}{c}{Low-metal abundance} & Other parameters \\
        \noalign{\smallskip} \hline
        \noalign{\smallskip}
	He       & 6.00(--2) 			 & 		\\ 
	N    	 & 2.14(--5)     		 &           	\\
	O     	 & 1.76(--4)	   		 &           	\\
	H$_2$ 	 & 5.00(--1)	  		 & Temperature = 10 K \\ 
	C$^+$    & 7.30(--5)	  		 & $n_{\rm H}$ = $2\times10$$^{4}$ cm$^{-3}$	\\
	S$^+$    & 8.00(--8)	  		 & $\zeta$ = $1.3\times10$$^{-17}$ s$^{-1}$	\\
	Si$^+$   & 8.00(--9)	  		 & C/O ratio = 0.41   	\\
	Fe$^+$   & 3.00(--9)	  		 & $A_{\rm v}$ = 10\ mag \\ 
	Na$^+$   & 2.00(--9)	  		 &           	\\
	Mg$^+$   & 7.00(--9)	  		 & C$_3$H$_3^+$ + e $\xrightarrow{0.5\ k_2}$ C$_3$H$_2$ + H\\
	P$^+$    & 3.00(--9)	  		 & \hspace{36pt}$\xrightarrow {0.5\ k_2}$ C$_3$H + ...\\
	Cl$^+$   & 4.00(--9)	  		 &              \\ 
	e 	 & 7.3107(--5)	  		 &           	\\
	\hline
      \end{tabular}}
\par
      \smallskip
	  Note: $a(-b)$ = $a \times 10^{-b}$, with respect to H abundance. 
   \end{table}