\begin{table}%t2
\caption{\label{table:sizew30}Effective radius of NGC~7252:W30 for various models as
determined from the $F555W$ WFPC2 image (PC chip).  See text for details.  The
best fitting model (lowest $\chi^2$) is shown in bold.}
%\centering
\par
\begin{tabular}{c c c c c}
\hline\hline
{\bf WFPC2} & Type & Index & $R_{\rm eff}$(pc) & $\chi^2 / \chi^2_{\rm best}$ \\
\hline
 & Gauss & -- & 13.2  &   3.67\\
 & King & 5 &  12.5  &    2.93\\
 & King & 15 & 11.0 &     1.82\\
 & King & 30 & 10.2   &   1.31\\
 & {\bf King} & {\bf 100} & {\bf 8.3}  &  {\bf 1.00} \\
 & Moffat & 1.5 & 11.0  &  1.21\\
 & Moffat & 2.5 & 12.0  &  2.19\\
\hline
\end{tabular}
\end{table}