\begin{table}%t1
%\centering
\par
  \caption{rms noise in images.\label{Noisetab}}
%\vspace{0.5cm}
%
\begin{tabular}{lrrrrrr}
%
\hline\hline
              &          & 0.06\arcsec\    &          &          & 0.12\arcsec\\\
   $\lambda$  & $I$        &  $Q$        & $U$        & $I$        &  $Q$       & $U$ \\
      cm     & $\mu$Jy  & $\mu$Jy   & $\mu$Jy  & $\mu$Jy  & $\mu$Jy  & $\mu$Jy  \\
\hline
6    & 170    & 130  & 140  & 450    & 160  & 150 \\
3.6  &        &      &      & 91   & 45 & 48 \\
2    & 110  & 51 & 51 &  130 & 48 & 49 \\
1.3  &  86  & 65 & 65 &  119 & 73 & 72 \\
\hline
\end{tabular}
\end{table}