\begin{table}
\label{tab:9}
\caption{Overview of the oscillations found in JOP83 in the 171~\AA \hspace{0.05in} bandpass of TRACE observed during the period between April 23rd 2003 and May 3rd 2003; ${\it v}$ is the projected speed of propagation of the wave, $A_{\min}{-} A_{\max}$ is the range of amplitudes relative to the background intensity, $P_{\min}{-}P_{\max}$ is the minimum period and maximum period found over all the positions using the wavelet analysis, $P_{\rm prop}$ is the dominant period at which the oscillations propagates, $P_{fft}$ is the period identified using the Fast Fourier Transform, sunspot $Y$ indicates a loop above a sunspot region and $N$ indicates there is no sunspot observed, $L_{\rm d}$ is the length along the loop that the oscillation is detected and $F$ is the estimated energy flux of the wave.}
%\centering
\par
\begin{tabular}{c c c c c c c c c}
\hline\hline
Loop & $v$ & $A_{\min}{-}A_{\max}$ & $P_{\min} {-} P_{\max}$ & $P_{\rm prop}$ & $P_{fft}$ & Sunspot & $L_{\rm d}$ & F \\
 & k~ms$^{-1}$ & (\%) & (s) & (s) & (s) & Y/N & (Mm) & ($10^{2}$ erg cm$^{-2}$~s$^{-1}$) \\
\hline
1 & ${\it O}(65)$ & 2.0--5.3 & 250--410 & 340 & 400 & N & 4.2 & 2.8\\
2 & ${\it O}(60)$ & 3.8--13.4 & 200--375 & 250 & 250 & N & 3.0 & 15.6\\
3 & ${\it O}(140)$ & 2.0--5.9 & 150--330 & 190 & 180 & N & 3.5 & 3.3\\
4 & ${\it O}(120)$ & 1.6--5.4 & 350--550 & 420 & 400 & N & 6.5 & 2.6\\
5 & ${\it O}(120)$ & 2.6--6.9 & 275--450 & 440 & 420 & N & 18.1 & 4.8\\
6 & ${\it O}(100)$ & 1.5--4.6 & 175--250 & 200 & 210 & N & 2.9 & 2.0\\
7 & ${\it O}(85)$ & 0.8--2.8 & 275--400 & 330 & 315 & N & 9.5 & 0.7\\
8 & ${\it O}(90)$ & 1.8--3.8 & 225--250 & 360 & 340 & N & 3.8 & 1.7\\
9 & ${\it O}(105)$ & 0.7--3.9 & 200--250 & 215 & 200 & N & 7.1 & 1.1\\
10 & ${\it O}(100)$ & 1.0--3.8 & 175--250 & 225 & 250 & N & 6.0 & 1.0\\
11 & ${\it O}(85)$ & 1.3--3.5 & 175--250 & 220 & 225 & N & 5.7 & 1.0\\
12 & ${\it O}(145)$ & 0.9--5.0 & 250--450 & 290 & 300 & N & 15.6 & 1.8\\
13 & ${\it O}(110)$ & 1.5--3.9 & 175--450 & 300 & 300 & N & 11.2 & 1.5\\
14 & ${\it O}(130)$ & 1.1--4.2 & 175--300 & 225 & 225 & N & 5.5 & 1.5\\
15 & ${\it O}(100)$ & 2.1--5.3 & 150--310 & 175 & 175 & N & 4.3 & 2.9\\
16 & ${\it O}(85)$ & 1.1--4.7 & 175--375 & 220 & 240 & N & 8.9 & 1.8\\
17 & ${\it O}(130)$ & 1.1--5.6 & 275--370 & 360 & 360 & N & 16.2 & 2.4\\
18 & ${\it O}(115)$ & 1.4--4.1 & 200--400 & 300 & 290 & N & 7.2 & 1.6\\
19 & ${\it O}(60)$ & 1.3--5.2  & 275--325 & 300 & 280 & N & 6.4 & 2.2\\
20 & ${\it O}(80)$ & 1.7--6.4 & 200--340 & 310 & 320 & N & 5.8 & 3.5\\
21 & ${\it O}(85)$ & 1.5--5.6 & 225--340 & 310 & 340 & N & 6.0 & 2.7\\
22 & ${\it O}(90)$ & 1.6--6.0 & 200--370 & 330 & 350 & N & 6.9 & 3.0\\
23 & ${\it O}(80)$ & 1.1--4.2 & 200 --340 & 300 & 310 & N & 18.2 & 1.5\\
24 & ${\it O}(60)$ & 1.6--4.6 & 200--325 & 300 & 300 & N & 9.3 & 2.0\\
25 & ${\it O}(145)$ & 1.8--4.6 & 175--375 & 300 & 300 & N & 7.1 & 2.2\\
\hline
\end{tabular}
\end{table}