\begin{table}%t5
\caption{\label{tab:5}Statistical overview of the averages and ranges of the physical properties of the 63 oscillations in coronal loop footpoints found in this study combined with that in \citet{dm2002}. Note that the uncertainty in the parameters is taken to be the standard error in the mean,~$\sigma_{M}$.}
%\centering
\par
\begin{tabular}{c c c}
\hline\hline
Parameter & Average & Range \\
\hline
Footpoint Length, $L$ & $28.1 \pm 1.3$~Mm& $7.0{-}54.6$~Mm  \\
Footpoint Width, ${\it w}$ & $8.6 \pm 0.3$~Mm& $3.5{-}14.9$~Mm \\
Footpoint Divergence ${\it w_{\rm d}}$ & $0.24 \pm 0.02$ & $0.05{-}0.71$ \\
Oscillation Period, $P$ & $284.0 \pm 10.4$~s& $145{-}550$~s \\
Propagation Speed, $v$ & $99.7 \pm 3.9$~km~s$^{-1}$ & ${\it O}(45){-}{\it O}(205)$~km~s$^{-1}$ \\
Relative Amplitude, $A$ & $3.7\% \pm 0.2\%$ & $0.7{-}14.6\%$ \\
Detection Length, $L_{\rm d}$ & $8.3 \pm 0.6$~Mm & $2.9{-}23.2$~Mm \\
Energy Flux, $F$ & $313 \pm 26$~erg~cm$^{-2}$~s$^{-1}$ & $68{-}1560$~erg~cm$^{-2}$~s$^{-1}$\\
\hline
\end{tabular}
\end{table}