\begin{table}%t4
\caption{Overview of the averages and ranges of the physical parameters of the 25 oscillating coronal loop footpoints observed in this study from April 21st 2003 until May 3rd 2003. Note that the uncertainty in the parameters is taken to be the standard error in the mean, $\sigma_{M}$.}
\label{tab:4}
%\centering
\par
\begin{tabular}{c c c}
\hline\hline
Parameter & Average & Range \\
\hline
Footpoint Length, $L$ & $30.7 \pm 2.8$~Mm& $7.0{-}54.6$~Mm  \\
Footpoint Width, ${\it w}$ & $9.3 \pm 0.1$~Mm& $3.5{-}14.9$~Mm \\
Footpoint Divergence ${\it w_{\rm d}}$ & $0.18 \pm 0.02$ & $0.05{-}0.48$ \\
Oscillation Period, $P$ & $287.0 \pm 17.3$~s& $150{-}550$~s \\
Propagation Speed, $v$ & $98.4 \pm 6.0$~km~s$^{-1}$ & ${\it O}(60){-}{\it O}(145)$~km~s$^{-1}$  \\
Relative Amplitude, $A$ & $3.4\% \pm 0.2\%$ & $0.7{-}13.4\%$ \\
Detection Length, $L_{\rm d}$ & $8.0 \pm 1.2$~Mm & $2.9{-}18.1$~Mm \\
Energy Flux, $F$ & $268 \pm 79$~erg~cm$^{-2}$~s$^{-1}$ & $68{-}1560$~erg~cm$^{-2}$~s$^{-1}$\\
\hline
\end{tabular}
\end{table}