\begin{table}%t1
\caption{Overview of the measured and observed parameters from the data taken on June 13th 2001 as part of JOP144 in the 171~\AA\ passband. $L$~is the length of the observed footpoint, ${\it w}$ is the average footpoint width,  ${\it w_{\rm d}}$ is the divergence rate of the loop footpoint, $A_{\min}{-} A_{\max}$ is the range of intensity variation in amplitude above the background, $P_{\rm prop}$ indicates the dominant period found by wavelet analysis, $v$ is an estimate of the propagation speed of the oscillation (where ${\it O}$ indicates the order of the propagation speed) and $L_{\rm d}$ is the length along each footpoint that the oscillation could be detected.}
\label{tab:1}
%\centering
\par
\begin{tabular}{c c c c c c c c c c}
\hline\hline
No. & Time (UT) & ($x,y$) & $L$ (Mm) & ${{\it w}}$ (Mm) & ${{\it w}}_{\rm d}$ & $A_{\min}{-}A_{\max} (\%)$ & $P_{\rm prop}$ (s) & $v$ (km s$^{-1}$) & $L_{\rm d}$ (Mm)\\
\hline
1 & 0057 & (270,196) & 13.7 & 3.1 & 0.114 & 2.8--9.2 & 350 & ${\it O}(95)$ & 5.7 \\
2 & 0138 & (276,198) & 12.8 & 3.4 & 0.132 & 2.8--11.4 & 390 & ${\it O}(105)$ & 7.2 \\
\hline
\end{tabular}
\end{table}