\begin{table}%T1
%\centering
\par
\caption{Parameters of Gaussian fits of the SiO(2$-$1), H$^{13}$CO$^+$(1$-$0) and HCO(1$-$0) lines of
  Fig.~\ref{figspe}. Errors (in brackets) are 1$\sigma$ values.
}
\label{tabgau}
\input{4033tab1}
\end{table}