\begin{table}%t4
%\centering
\par
\caption{Phase-resolved spectroscopy with all the spectral modeling parameters
         of model CTT except normalisations equal to the values of the average
         spectrum (see Table~\ref{TabSpec}). Only pn data were used for the
         phase-resolved spectral analysis.
        \label{TabPhaseSpec}   }   
\begin{tabular}{l c c c c c} 
\hline\hline       
phase & $N_{\tty{H}}$ & $F_{\tty{line}}$ & $F_{1-2\ {\rm keV}}$ & unabsorbed $F_{2-10\ {\rm keV}}$ & $\chi^{2}$/d.o.f. \\
                 & $10^{22}\ \unit{cm}{-2}$ & $10^{-4}\ \tr{ph}~\unit{cm}{-2}~\unit{s}{-1}$ & $10^{-14}\ \tr{erg}~\unit{cm}{-2}~\unit{s}{-1}$ & $10^{-10}\ \tr{erg}~\unit{cm}{-2}~\unit{s}{-1}$ & \\
\hline                    
low intensity & $\rm 15.3_{-0.7}^{+0.7}$ & $\rm 2.1_{-0.3}^{+0.4}$ & $\rm 1.5_{-1.2}^{+1.5}$ & 0.9 & 147/164 \\
pulse wings   & $\rm 15.8_{-0.7}^{+1.3}$ & $\rm 1.5_{-0.6}^{+0.7}$ & $\rm 6.8_{-4.9}^{+0.4}$ & 1.4 & 214/221 \\
pulse core    & $\rm 15.5_{-0.5}^{+0.5}$ & $\rm 1.6_{-0.7}^{+0.5}$ & $\rm 2.8_{-2.2}^{+2.2}$ & 2.4 & 181/201 \\
\hline                  
\end{tabular}
\end{table}