\begin{table}%t13
\caption{(Continued) Preliminary set of \ion{O}{ii} lines selected for the analysis, divided by multiplets. The spectrum of the low \vsini~star $\tau$~Sco was used to identify the lines. The log~{\em gf}~values are from the NIST~database.}\label{LinesO}
%\centering
\par
\begin{tabular}{c c r c}    
\hline
\hline
Label & $\lambda$ ({\rm \AA}) & log~{\em gf} & Notes \\
\hline
\multicolumn{4}{l}{2s$^2$ 2p$^2$ (1D) 3s--2s$^2$ 2p$^2$ (1D) 3p}\\
\hline
 & & \multicolumn{2}{r}{NIST 99 (2D--2F$_0$)} \\
\hline
\ion{O}{ii}~4590 & 4590.974 & 0.350  &  \\
\ion{O}{ii}~4596 & 4595.957 & --1.032 &  \\
                  & 4596.177 & 0.200  &  \\
\hline
\multicolumn{4}{l}{2s$^2$ 2p$^2$ (1D) 3p--2s$^2$ 2p$^2$ (1D) 3d}\\
\hline
 & & \multicolumn{2}{r}{NIST 161 (2F$_0$--2G)} \\
\hline
\ion{O}{ii}~4185 & 4185.440 & 0.604  & + \ion{C}{iii} \\
\ion{O}{ii}~4189 & 4189.788 & 0.716  &  \\
                  & 4189.581 & --0.828 &  \\
\hline
 & & \multicolumn{2}{r}{NIST 188 (2P$_0$--2P)} \\
\hline
\ion{O}{ii}~4691 & 4690.888 & --0.610 &  \\
                  & 4691.419 & --0.309 &  \\
\ion{O}{ii}~4701 & 4701.179 & 0.088  &  \\
                  & 4701.712 & --0.611 &  \\
                  & 4700.441 & --3.298 &  \\
\hline
 & & \multicolumn{2}{r}{NIST 172 (2D$_0$--2F)}\\
\hline
\ion{O}{ii}~4703 & 4703.161 & 0.263 &  \\
\hline
\end{tabular}
\end{table}