\begin{table}%t3
%\centering
\par
\caption{NEATM fits to the available thermal-infrared data: the MIRSI data as given in 
Table~\ref{tab1}, and the five IRAS sightings (Tedesco \cite{IRAS}). No attempt at lightcurve-correction was made. 
 \label{tab:NEATM}}
\begin{tabular}{c c c r}
\hline \hline 
 & $\eta$ & $p_V$ & $D$ (km) \\
\hline
MIRSI & 0.93
& 0.188 & 103.8 \\
IRAS 1 & 0.93
& 0.178 & 106.6 \\
IRAS 2 & 0.94
 & 0.226 & 94.7 \\
IRAS 3 & 1.06
 & 0.161 & 112.2 \\
IRAS 4 & 0.96
& 0.191 & 103.0 \\
IRAS 5 & 0.82
 & 0.231 & 93.6 \\
\hline
\end{tabular}
\end{table}