\begin{table}%t1
%\centering
\par
\caption{Radial velocity measurements (in the barycentric frame) and CCF
parameters. The first 3 measurements were made with FLAMES \citep{pon05b}, and 
the last 4 with HARPS.} 
\label{tablevr}
\begin{tabular}{r r r r r r} 
\hline \hline
BJD & {\it RV} & depth & {\it FWHM} &  {\it SNR} & $\sigma_{\it RV}$  \\ 
{d} & {\kms} & \% & {\kms} & & {\kms} \\ \hline 
2453081.68998  &  0.234  & 5.97  & 44.9 & 10.7 &  0.317 \\
2453084.57979  & $-$6.208  & 6.13  & 43.4 & 15.2 &  0.215 \\
2453085.67893  & 12.276  & 6.14  & 43.9 & 11.9 &  0.274 \\
2453371.84388 &  $-$8.874 &  5.10  & 51.0 &  3.97 &  1.050 \\
2453406.79455 &  12.447 &  6.23  & 43.3 & 6.15  & 0.515   \\
2453408.77633 &  10.371 &  6.17  & 45.8 & 4.89  & 0.673  \\
2453409.82831 &  $-$7.139 &  6.65  & 45.5 & 3.95  & 0.770  \\ \hline
\end{tabular}
\end{table}