\begin{table}%t11
%\centering
\par
\caption{Local standard of rest (LSR) velocity $v$ (km s$^{-1}$), column density $N$ (cm$^{-2}$) and Gaussian width $g$ (km s$^{-1}$) for
the atomic species \ion{Na}{i}~D, \ion{Ca}{ii}, \ion{Ti}{ii}, \ion{K}{i} and \ion{H}{i} observed toward \object{Sk~--69 243}.
* = Not optical depth corrected due to problematic data.
The bottom two lines give the total LMC column densities for the respective atoms.\label{tb:IScomp_Sk69_243}}
{
\begin{tabular}{llllllllllllllll}\hline\hline
\multicolumn{16}{c}{\object{Sk --69 243}} \\ \hline %
\multicolumn{3}{c}{\ion{Na}{i}~D}  &     & \multicolumn{3}{c}{\ion{Ca}{ii}}    & \multicolumn{3}{c}{\ion{Ti}{ii}}    & \multicolumn{3}{c}{\ion{K}{i}} & \multicolumn{3}{c}{\ion{H}{i}}     \\
%\hline
   $v$	 &    $N$       &  $g$	    &     & $v$     &   $N$        & $g$        &   $v$     &   $N$        &  $g$     &    $v$  &   $N$       &  $g$   &  $v$     &   $N$        &   $g$    \\
\kms	 & $10^{10}$ cm$^{-2}$  &\kms	    &	  & \kms    & $10^{10}$ cm$^{-2}$  &	\kms	&	\kms& $10^{10}$ cm$^{-2}$  &\kms      &	\kms	& $10^{10}$ cm$^{-2}$ &	 \kms  &\kms	  &  $10^{19}$ cm$^{-2}$ &\kms	    \\
\hline
	 & 		& 	    & 	  & 	    &   	   & 	  	& 	    &		   &	      & 	&	      &        &	  &		 &          \\      
	 & 		& 	    & 	  &  --6.5   &  +36.3	   &	 14.7	&	    &		   &	      & 	&	      &        &	  &		 &	    \\      
0.8	 & +15.2	&    7.2    &  *  &  1.4    &  +22.5	   &	 6.6	&     0.9   &	+77.6	   &   11.2   & 	&	      &        &	  &		 &	    \\      
6.0	 & +34.2	&    4.9    &  *  &  6.8    &  +29.2	   &	 8.1	&     6.0   &	--59.3	   &   9.9    & 	&	      &        &	  &		 &	    \\      
11.0	 & +100.0	&    4.8    &  *  & 	    &       	   &		&     8.9   &	+75.5	   &   6.6    & 	&	      &        &	  &		 &	    \\      
14.5	 & +5.92    	&    4.3    &  *  &  16.7   &  +11.6	   &	 5.7	&	    &		   &	      & 	&	      &        &	  &		 &	    \\      
	 & 		& 	    & 	  &  24.3   &  +13.4	   &	 3.4	&	    &		   &	      & 	&	      &        &	  &		 &	    \\      
	 & 		& 	    & 	  &  48.8   &  +43.8	   &	 27.1	&	    &		   &	      & 	&	      &        &	  &		 &	    \\      
	 & 		& 	    & 	  &  85.6   &  +2.75       & 	 3.3	& 	    &	     	   &	      & 	&	      &        &	  &		 &	    \\      
	 & 		& 	    & 	  &  104.5  &  +21.2       & 	 4.6	& 	    &	     	   &	      & 	&	      &        &	  &		 &	    \\      
	 & 		& 	    & 	  &  127.3  &  +8.95       & 	 7.9	& 	    &	     	   &	      & 	&	      &        &	  &		 &	    \\      
	 & 		& 	    & 	  &  184.7  &  +50.4	   &	 32.4	&	    &		   &	      & 	&	      &        &	  &		 &	    \\      
	 & 		& 	    & 	  & 	    &       	   &		&	    &		   &	      & 	&	      &        &	  &		 &	    \\      
	 & 		& 	    & 	  & 	    &       	   &		&	    &		   &	      & 	&	      &        &	  &		 &	    \\      
	 & 		& 	    & 	  &  218.6  &  +31.3	   &	 13.2	&	    &		   &	      & 	&	      &        &	  &		 &	    \\      
228.6	 & +20.5	&    11.8   & 	  &  228.0  &  +36.9	   &	 8.2	&	    &		   &	      & 	&	      &        &    226.5 &   +37.5	 &    37.5  \\      
240.2	 & +6.80    	&    4.8    & 	  &  236.7  &  +25.0	   &	 3.8	&     233.8 &	+62.7	   &   34.4   & 	&	      &        &	  &		 &	    \\      
247.8	 & +12.5	&    3.4    &	  &  243.1  &  +27.4	   &	 7.4	&	    &		   &	      & 	&	      &        &    244.2 &   +12.5	 &    9.3   \\      
249.6	 & +28.6	&    2.2    &	  &  250.4  &  +66.4	   &	 5.9	&	    &		   &	      & 	&	      &        &    249.1 &   +107.0	 &    24.5  \\      
252.5	 & +173.0	&    5.0    &	  &  256.6  &  +23.8	   &	 4.2	&     254.2 &	+56.9	   &   10.1   &  251.7  &  +8.85      &   4.8  &	  &		 &	    \\      
264.3	 & +53.0	&    9.3    &	  &  264.3  &  +57.7	   &	 6.7	&	    &		   &	      &  268.5  &  +1.39      &   2.4  &	  &		 &	    \\      
272.4	 & +308.0	&    7.0    &	  &  273.1  &  +210.0	   &	 8.5	&	    &		   &	      &  272.9  &  +6.44      &   4.4  &    272.4 &   +80.5	 &    19.5  \\      
274.1	 & +19.5	&    3.3    &	  &	    &		   &		&     275.7 &	+280.0     &   18.6   & 	&	      &        &    274.8 &   +157.0	 &    32.6  \\      
278.7	 & +43.7	&    7.8    &	  &  281.6  &  +47.3	   &	 5.4	&	    &		   &	      & 	&	      &        &	  &		 &	    \\      
292.3	 & +34.0	&    6.4    &	  &  289.7  &  +110.0	   &	 6.6	&     285.1 &	+115.0     &   15.7   & 	&	      &        &	  &		 &	    \\      
	 & 		& 	    & 	  &  295.7  &  +59.7       & 	 9.1	&     295.8 &	+36.1	   &   6.0    & 	&	      &        &	  &		 &	    \\      
	 & 		& 	    & 	  &  303.2  &  +15.9       & 	 4.0	&     303.8 &	+26.1	   &   7.2    & 	&	      &        &	  &		 &	    \\      
	 & 	   	& 	    & 	  & 	    &   	   & 	  	& 	    &	     	   &	      & 	&	      &        &	  &		 &	    \\      
	 & 	   	& 	    & 	  & 	    &   	   & 	  	& 	    &	     	   &	      & 	&	      &        &	  &		 &	    \\      
$N$	 &  +699.0  	& 	    & 	  & 	    &  +711.0      & 	  	& 	    &	+576.0	   &	      & 	&  +16.7      &        &	  &   +395.0	 &	    \\      
log($N$) &  12.84	& 	    & 	  & 	    &  12.85	   & 	  	&   	    &	12.76	   &	      & 	&  11.22      &        &	  &    21.60	 &          \\      
	 & 		& 	    & 	  & 	    & 		   & 		& 	    &		   &	      & 	&	      &        &	  &		 &          \\      
\hline				    			            	    	    						             				 
\end{tabular}
}																	    				
\end{table}